Copyright: (c) Copyright 1996-1997 Novell, Inc.


-001  FFFFFFFFF  INSUFFICIENT SPACE

Explanation

The station does not have sufficient disk space.

Action

See Reporting Error Code Problems to Novell.


-1000  0xFFFFFC18  NWDP OE BK OUT OF MEMORY

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker is out of memory.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the Broker by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1001  0xFFFFFC17  NWDP OE BK BAD NETWARE VERSION

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The server is running a version of NetWare* that is older than the minimum required by the Broker.

Action

Upgrade the server to NetWare 4.11 or later.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1002  0xFFFFFC16  NWDP OE BK WRONG CMD LINE ARGS

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The arguments provided in the command line that loaded the Broker were incorrect.

Action

To get the correct syntax for the Broker NLM program, type the following at the server console:

load Broker /?

Note: This command works only if a Broker is not currently loaded on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1003  0xFFFFFC15  NWDP OE BK Broker NAME NOT GIVN

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker did not receive a name.

Possible Cause

The console operator failed to provide a Broker name when prompted.

Action

Type a valid Broker name in the command line that loads the Broker, or enter a valid name when prompted by the Broker.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1004  0xFFFFFC14  NWDP OE BK NOT Broker CLASS

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The name provided when loading the Broker identifies an NDS* object whose type is not NDPS Broker.

Action

Make sure the name provided identifies a Broker object.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1005  0xFFFFFC13  NWDP OE BK INVALID Broker PWORD

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The password provided by the console operator when loading the Broker is incorrect.

Possible Cause

Occasionally this error is reported when a discrepancy exists in NDS*. When this is the case, the error is reported before the operator is even prompted to enter a password.

Action

If the console operator entered a password and it failed, try reloading the Broker with the correct password.

If the error was reported before the operator was prompted for a password, allow some time for NDS to synchronize and try again.

If the problem persists, run DSREPAIR on the server and then try again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1006  0xFFFFFC12  NWDP OE BK INVALID Broker NAME

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The name provided when loading the Broker does not identify an NDS* object.

Action

Make sure the fully qualified name of the Broker object is provided.  The name should contain a dot (.) as its first character.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1007  0xFFFFFC11  NWDP OE BK FAILED TO CRTE THRED

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker failed to spawn the threads needed to handle incoming requests.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the Broker by adding more memory to the server or unloading unnecessary NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1008  0xFFFFFC10  NWDP OE BK FAILED TO INIT NUT

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker was unable to initialize the modules that support the user interface, NUT.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the Broker by adding more memory to the server or unloading unnecessary NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1009  0xFFFFFC0F  NWDP OE BK FAILED TO GET MSGS

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker NLM program could not find its message file, Broker.MSG, while loading.

Possible Cause

The Broker.MSG file does not exist or was deleted from the appropriate directory on the server.

Action

Make sure the file, Broker.MSG, is located in the appropriate message directory on the server, then try reloading the Broker NLM program.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1010  0xFFFFFC0E  NWDP OE BK FAILED TO ALLOC RES

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker was unable to initialize the modules that support the user interface, NUT.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the Broker by adding more memory to the server or unloading unnecessary NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1011  0xFFFFFC0D  NWDP OE BK SVC MUST BE FULL DIS

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker must be fully unloaded.

Possible Cause

An attempt was made to restart the Broker while it was being unloaded.

Action

Wait until the Broker is fully unloaded before loading it again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1012  0xFFFFFC0C  NWDP OE BK UNINITIALIZED MODULE

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker has an uninitialized module.

Possible Cause

An error occurred while the Broker was loaded in memory.

Action

Make sure the Broker has unloaded entirely, and then try loading it again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1013  0xFFFFFC0B  NWDP OE BK DS VAL SIZE TOO LARG

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker attempted to read an NDS* attribute whose value occupies a larger buffer than supported.

Action

The Broker will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1014  0xFFFFFC0A  NWDP OE BK NO ATTRIBUTE VALUES

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker attempted to read an NDS* attribute that had no values assigned.

Action

The Broker will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1015  0xFFFFFC09  NWDP OE BK UNKNOWN SESSION

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

An application attempted to communicate with the Broker over an unknown session.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

If the problem persists, contact the application developer or a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1016  0xFFFFFC08  NWDP OE BK SERVICE DISABLED

 Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker service is disabled.

Possible Cause

An application tried to communicate with a Broker while the Broker was being unloaded.

Action

After the Broker is fully unloaded, reload it and run the application again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1017  0xFFFFFC07  NWDP OE BK UNKNOWN MODIFY OPER

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker tried to modify an NDS* object using an unsupported option.

Action

The Broker will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1018  0xFFFFFC06  NWDP OE BK INVALID ARGUMENTS

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker received an invalid list mode.

Possible Cause

A programming error might have been encountered in the application you are running. An application specified an invalid list mode when requesting a list of the services supported by the Broker.

Action

The application must specify a correct list mode while listing the Broker services. If the problem persists, contact the application developer or a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1019  0xFFFFFC05  NWDP OE BK DUPLICATE SESSION ID

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The communications layer reported two sessions with the same ID.

Action

The Broker will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1020  0xFFFFFC04  NWDP OE BK UNKNOWN SERVICE

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

 An application requested the Broker to enable a service that is already enabled or to disable an unknown service.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application should ensure that the service is currently disabled before sending the Broker's request to enable that service.

The application must also ensure that the request specifies one of the three supported services, NWDP SERVICE TYPE SRS, NWDP SERVICE TYPE ENS, or NWDP SERVICE TYPE RMS.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1021  0xFFFFFC03  NWDP OE BK SRVC ALREADY ENABLED

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

An application requested the Broker to enable a service that is already enabled.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application should determine that the service is currently disabled before sending the Broker a request to enable that service.

If the problem persists, contact the the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1022  0xFFFFFC02  NWDP OE BK SRVC ALREADY DISABLD

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

An application requested the Broker to disable a service that is already disabled.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application should determine that the service is currently enabled before sending the Broker a request to disable that service.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1023  0xFFFFFC01  NWDP OE BK INVALID CREDENTIAL

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The request submitted by an application to bind to a Broker included a defective credential.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application should make sure that all the fields in the credential are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1026  0xFFFFFBFE  NWDP OE BK NOT ADMIN TYPE SESN

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

An application without Manager access control rights requested an operation reserved for Broker Managers.

Action

Make sure the application is logged in to NDS* as an object with Broker Manager access control rights. Use NetWare* Administrator to add Managers for a Broker object.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1027  0xFFFFFBFD  NWDP OE BK OPTION NOT SUPPORTED

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The request submitted by an application to bind to a Broker included a defective credential.

Action

The application should make sure that all the fields in the credential are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1029  0xFFFFFBFB  NWDP OE BK COULD NOT FIND FILE

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker could not find the NLM program that implements one of the Brokered services.

Possible Cause

One or more of the NLM programs that implement Brokered services did not exist in the SYSTEM directory on the server.

Action

Make sure that the NLM programs that implement all Brokered services exist in the SYSTEM directory of the server. These programs are

REGSRVR.NLM

 	NTFYSRVR.NLM

 	RMANSRVR.NLM

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1030  0xFFFFFBFA  NWDP OE BK ERROR READING FILE

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker was unable to read the NLM program file that implements one of the Brokered services.

Possible Cause

One or more of the NLM programs that implement Brokered services did not exist in the SYSTEM directory on the server.

Action

Make sure that the NLM programs that implement all Brokered services exist in the SYSTEM directory of the server. These programs are

REGSRVR.NLM

 	NTFYSRVR.NLM

 	RMANSRVR.NLM

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1031  0xFFFFFBF9  NWDP OE BK NOT NLM FILE FORMAT

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The format of one of the NLM files that implement the Brokered services is corrupted.

Action

Reinstall NDPS on this server.

Action

Manually copy the three NLM programs that implement the Brokered services. These programs are

REGSRVR.NLM

 	NTFYSRVR.NLM

 	RMANSRVR.NLM

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1032  0xFFFFFBF8  NWDP OE BK WRONG NLM FILE VER

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The version of the NLM program that implements one of the Brokered services is obsolete with this version of IntranetWare*.

Action

Contact a Novell support provider for an updated version of Novell Distributed Print Services (NDPS).

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1034  0xFFFFFBF6  NWDP OE BK ALREADY IN PROGRESS

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker service is already in progress.

Possible Cause

The Broker tried to load an NLM program that implements Brokered services while it was already being loaded.

Action

Wait until the NLM program in question is fully loaded or unloaded before enabling or disabling the corresponding Brokered service.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1035  0xFFFFFBF5  NWDP OE BK INITIALIZE FAILURE

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM program

Explanation

The server failed to initialize a support NLM program as it was being loaded by the Broker.

Action

Unload and reload the Broker and try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1038  0xFFFFFBF2  NWDP OE BK AUTO MODULS NOT LOAD

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

Some of the NLM programs that the Broker needs to be able to execute cannot be found.

Action

From the server console, note the names of the support modules that could not be found.  Make sure those files exist in the SYSTEM directory of the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1039  0xFFFFFBF1  NWDP OE BK UNRESOLVED EXTERNAL

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Explanation

The Broker has received an unresolved external command.

Possible Cause

Some of the NLM programs that the Broker needs to be able to execute are outdated.

Action

Update the files by doing a complete installation of NDPS on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1041  0xFFFFFBEF  NWDP OE BK OTHER BRKR USING OBJ

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Possible Cause

The Broker failed to load because the Broker object it was given is already being used by another Broker on the network.

Action

Create a Broker object for this Broker to use, or unload the other Broker on the network before loading this one.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1042  0xFFFFFBEE  NWDP OE BK SRVC FAILED TO INIT

Source

Novell* Distributed Print Services* (NDPS*), Broker NLM* program

Possible Cause

The Broker failed to enable one of the Brokered services.

Action

Examine the extended error that accompanies this error code for additional explanation on what caused the operation to fail.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1100  0xFFFFFBB4  NWDP OE RG OUT OF MEMORY

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program (SRS)

Explanation

The Service Registry Service (SRS) is out of memory.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the SRS by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1101  0xFFFFFBB3  NWDP OE RG BAD NETWARE VERSION

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The server is running a version of NetWare* that is earlier than the minimum required by the Service Registry Service (SRS).

Action

Upgrade the server to NetWare 4.11 or later.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1102  0xFFFFFBB2  NWDP OE RG FAIL CREATE CONTEXT

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) failed to create an NDS* context.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the SRS by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1103  0xFFFFFBB1  NWDP OE RG FAIL LOGIN

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) failed to log in to NDS*.

Action

Unload the Broker (which will unload the SRS as well if it is still loaded). Reload the Broker and try enabling the SRS again.  If the failure continues, run DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1104  0xFFFFFBB0  NWDP OE RG FAIL CREATE THREAD

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) failed to spawn the threads needed to handle incoming requests.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the SRS by adding more memory to the server or unloading unnecessary NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1105  0xFFFFFBAF  NWDP OE RG FAIL GET MSGS

 Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The SRS could not find its message file (REGSRVR.MSG) while loading.

Action

Make sure the REGSRVR.MSG file is located in the appropriate message directory on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1106  0xFFFFFBAE  NWDP OE RG SVC MUST BE FULL DIS

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) must be fully disconnected.

Possible Cause

An attempt was made to restart the SRS while it was being unloaded.

Action

Wait until the SRS is fully unloaded before loading it again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1107  0xFFFFFBAD  NWDP OE RG DS VAL SIZE TOO LARG

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) tried to read an NDS* attribute whose value necessitates a larger buffer than supported.

Action

The SRS will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1108  0xFFFFFBAC  NWDP OE RG NO ATTRIBUTE VALUES

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) tried to read an NDS* attribute that had no values assigned.

Action

The SRS will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1109  0xFFFFFBAB  NWDP OE RG UNKNOWN SESSION

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

An application tried to communicate with the Service Registry Service (SRS) over an unknown session.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application must ensure the necessary SRS APIs have been invoked in the correct order. If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1110  0xFFFFFBAA  NWDP OE RG SERVICE DISABLED

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) must be disabled.

Possible Cause

An application tried to communicate with the SRS while it was being unloaded.

Action

After the SRS is fully unloaded, reload it and run the application again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1111  0xFFFFFBA9  NWDP OE RG UNKNOWN MODIFY OPER

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) tried to modify an NDS* object using an unsupported option.

Action

The SRS will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1112  0xFFFFFBA8  NWDP OE RG CANT START ADVERTISE

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) is unable to advertise its availability through SAP.

Possible Cause

The server is out of available memeory.

Action

Make more memory available to the SRS by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1114  0xFFFFFBA6  NWDP OE RG CANT BIND 2 REGISTRY

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) was unable to establish a session to another SRS on the network.

Action

The SRS will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1115  0xFFFFFBA5  NWDP OE RG CANT CREATE CLIENT

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The  Service Registry Service (SRS) was unable to establish a session to another SRS on the network.

Action

The SRS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1116  0xFFFFFBA4  NWDP OE RG INVALID ARGUMENTS

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry Service (SRS) received invalid arguments.

Possible Cause

A programming error might have been encountered in the application you are running. An application requested a list of the services registered with the SRS but specified an invalid continuation mode.

Possible Cause

A printer attempted to register with the SRS but failed to specify all the required information.

Action

The application should make sure that all the fields in the request are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1117  0xFFFFFBA3  NWDP OE RG DUPLICATE SESSION ID

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The communications layer reported two sessions with the same ID.

Action

The Service Registry Service (SRS) will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1118  0xFFFFFBA2  NWDP OE RG UNKNOWN SERVER ENTRY

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry received an unknown server entry.

Possible Cause

A service provider, such as a printer, tried to deregister from the Service Registry Service (SRS) without having registered previously.

Action

The service provider should make sure its registration to the SRS was successful.

Possible Cause

The information in the deregistration did not match the information in the registration.

Action

The service provider should make sure that the information provided in the deregistration matches the information provided in the registration.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1119  0xFFFFFBA1  NWDP OE RG INVALID CREDENTIAL

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The registry received an invalid credential.

Possible Cause

A programming error might have been encountered in the application you are running. The request submitted by an application to bind to a Service Registry Service (SRS) included a defective credential.

Action

The application should make sure that all the fields in the credential are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1125  0xFFFFFB9B  NWDP OE RG OPTION NOT SUPPORTED

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry received an option that is not supported.

Possible Cause

One of the following programming errors might have been encountered in the application you are running.

The request submitted by an application to bind to a Service Registry Service (SRS) included a defective credential.

A request submitted to list servers registered with an SRS included an invalid continuation handle.

Action

The application should make sure that all the fields in the credential are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If this problem persists, contact the applications developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1127  0xFFFFFB99  NWDP OE RG INVLD CONTNUATN HNDL

Source

Novell* Distributed Print Services* (NDPS*), Service Registry NLM* program

Explanation

The Service Registry received an invalid continuation handle.

Possible Cause

A programming error might have been encountered in the application you are running. The request submitted by an application to list servers registered with a Service Registry Service (SRS) included an invalid continuation handle.

Action

The SRS will resolve the error internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-119  FFFFFFF89  BUFFER TOO SMALL

Explanation

The data to be passed back is too large for the buffer that was declared.

Action

See Reporting Error Code Problems to Novell.


-120  FFFFFFF88  VOLUME FLAG NOT SET

Explanation

The volume flag has not been set.

Action

See Reporting Error Code Problems to Novell.


-1200  0xFFFFFB50  NWDP OE NF OUT OF MEMORY

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) is out of memory.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the ENS by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1201  0xFFFFFB4F  NWDP OE NF BAD NETWARE VERSION

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received a bad NetWare* version.

Possible Cause

The server is running a version of NetWare that is earlier than the minimum required by the Event Notification Service (ENS).

Action

Upgrade the server to NetWare 4.11 or later.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1202  0xFFFFFB4E  NWDP OE NF FAIL CREATE THREAD

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) failed to spawn the threads needed to handle incoming requests.

Action

Make more memory available to the ENS by either adding more memory to the server or unloading unnecessary NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1203  0xFFFFFB4D  NWDP OE NF FAIL GET MSGS

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) could not find its message file, NTFYSRVR.MSG while loading.

Action

Make sure the file NTFYSRVR.MSG is located in the appropriate message directory on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1204  0xFFFFFB4C  NWDP OE NF FAIL CREATE CONTEXT

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) failed to create an NDS* context.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the ENS by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1205  0xFFFFFB4B  NWDP OE NF FAIL LOGIN

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) failed to log in to NDS*.

Action

Unload the Broker (which will unload the ENS as well if it is still loaded). Reload the Broker and try enabling the ENS again.  If the failure continues, run DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1206  0xFFFFFB4A  NWDP OE NF SVC MUST BE FULL DIS

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) must be fully disconnected before loading.

Possible Cause

An attempt was made to restart the ENS while it was being unloaded.

Action

Wait until the ENS is fully unloaded before loading it again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1207  0xFFFFFB49  NWDP OE NF DS VAL SIZE TOO LARG

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) tried to read an NDS* attribute whose value necessitates a larger buffer than supported.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1208  0xFFFFFB48  NWDP OE NF NO ATTRIBUTE VALUES

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) tried to read an NDS* attribute that had no values assigned.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1209  0xFFFFFB47  NWDP OE NF UNKNOWN SESSION

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An application tried to communicate with the Event Notification Service (ENS) over an unknown session.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application must make sure the necessary ENS APIs have been invoked in the correct order.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-121  FFFFFFF87  NO ITEMS FOUND

Explanation

A request for items failed because the items could not be found, for example, during a bindery request.

Action

See Reporting Error Code Problems to Novell.


-1210  0xFFFFFB46  NWDP OE NF UNKNOWN NOTIFY PROF

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an unknown profile handle.

Possible Cause

A programming error might have been encountered in the application you are running. An application tried to modify or delete a profile using an invalid profile handle.

Action

The application must make sure that the profile ID provided in the modify or delete operation matches the one obtained from operations add profile or list profiles.  If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1211  0xFFFFFB45  NWDP OE NF ERROR READING FILE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Notification Service received an error when it attempted to read the notification profile.

Possible Cause

The attribute that contains the notification profile in your Printer object is corrupted.

Action

Delete the Printer object with the corrupted attribute. Create a new Printer object to represent your controlled access printer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1212  0xFFFFFB44  NWDP OE NF ERROR WRITING FILE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) was unable to save a change to the persistent notification registration database.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1213  0xFFFFFB43  NWDP OE NF WRONG NOTIFY DB VERS

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

This Event Notification Service (ENS) does not support the version of the database that contains the notification registrations.

Action

Upgrade NDPS on this server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1214  0xFFFFFB42  NWDP OE NF CORRUPTED NOTIFY DB

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received a corrupted file from the notification database.

Possible Cause

The attribute that contains the notification profile in your Printer object is corrupted.

Action

Delete the Printer object with the corrupted attributes. Create a new Printer object to represent your controlled access printer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1216  0xFFFFFB40  NWDP OE NF METHOD ALREADY INST

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An application requested the Event Notification Service (ENS) to install a delivery method that is already installed.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

To avoid this error, the application should list the delivery methods currently installed before requesting a new one to be installed. If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1217  0xFFFFFB3F  NWDP OE NF UNKNOWN METHOD

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an unknown delivery method.

Possible Cause

A programming error might have been encountered in the application you are running. The identifier for the delivery method was not correct.

Action

Make sure the identifier for the delivery method is correct.

Possible Cause

An application sent the ENS a request that specified a delivery method that is not currently installed.

Action

Make sure the delivery method being requested is installed on the server. You can installed a delivery method remotely by sending an Add Method request to the ENS or by loading the appropriate .ENS file on the server.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1218  0xFFFFFB3E  NWDP OE NF SERVICE DISABLED

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) is disabled.

Possible Cause

An application tried to communicate with an ENS while the ENS was being unloaded.

Action

After the ENS is fully unloaded, reload it and run the application again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1219  0xFFFFFB3D  NWDP OE NF UNKNOWN MODIFY OP

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) used an unknown modify option.

Possible Cause

The ENS tried to modify an NDS* object using an unsupported option.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-122  FFFFFFF86  CONN ALREADY TEMPORARY

Explanation

An attempt was made to convert a connection to temporary that was already temporary.

Action

See Reporting Error Code Problems to Novell.


-1222  0xFFFFFB3A  NWDP OE NF NOTIFY QUEUE EMPTY

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) uses this code to inform delivery methods that currently there are not any notifications in their queues.

Action

The delivery method should wait until it receives a ping from the ENS indicating that there are some notifications in its queue waiting to be dispatched.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1223  0xFFFFFB39  NWDP OE NF CANT LOAD DELVR METH

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) failed to load a delivery method.

Action

Determine the reasons the delivery method failed to load by examining the Broker screen and the console screen of the server where the ENS is loaded.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1224  0xFFFFFB38  NWDP OE NF INVALID ARGUMENTS

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An application submitted a request to the Event Notification Service (ENS) and failed to initialize all the fields in the request.

Possible Cause

A programming error might have been encountered in the application you are running. All the fields in the request were not properly initialized.

Action

The application should make sure that all the fields in the request are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If the error persists, contact the applicaton developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1225  0xFFFFFB37  NWDP OE NF DUPLICATE SESSION ID

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The communications layer reported two sessions with the same ID.

Action

The Event Notification Service (ENS) will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1226  0xFFFFFB36  NWDP OE NF INVALID CREDENTIAL

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An invalid credential was received by a Notification Service.

Possible Cause

A programming error might have been encountered in the application you are running. The request submitted by an application to bind to an Event Notification Service (ENS) included a defective credential.

Action

The application should make sure that all the fields in the credential are properly initialized. If an optional field is not used, the application should initialize the field to zero or NULL as the case might require.

If the error persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1227  0xFFFFFB35  NWDP OE NF UNKNOWN CHOICE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Notification Service received an unknown choice.

Possible Cause

A programming error might have been encountered in the application you are running. An application requested a list of profiles in the Event Notification Service (ENS) but specified an invalid value for the type of list desired.

Action

When listing profiles, an application should make sure to specify NWDP LIST CHOICE FILTER or NWDP LIST CHOICE ID.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1228  0xFFFFFB34  NWDP OE NF UNKNOWN ATTR VALUE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An unknown value was reported.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-123  FFFFFFF85  CONN ALREADY LOGGED IN

Explanation

The connection is already logged in to the Directory.

Action

See Reporting Error Code Problems to Novell.


-1230  0xFFFFFB32  NWDP OE NF UNKNOWN OBJECT ID

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an unknown object ID.

Possible Cause

A printer generated an event in which no one has a registered interest.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1232  0xFFFFFB30  NWDP OE NF FAIL MAKE CHG PERMNT

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) was unable to save a change to the persistent notification registration database.

Possible Cause

A programming error might have been encountered in the application you are running. An application requesting the modification did not flag the modification as persistent while communicating with a public access printer.

Action

Make sure that the application requesting the modification is flagging the modification as persistent while communicating with a public access printer.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1234  0xFFFFFB2E  NWDP OE NF NOT SUPPLY TYPE SESN

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received a request that did not supply the type of session.

Possible Cause

A programming error might have been encountered in the application you are running. An application made a request that only printers are authorized to make.

Action

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1235  0xFFFFFB2D  NWDP OE NF NOT ADMIN TYPE SESN

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received a request that was not an administrator type session.

Possible Cause

A programming error might have been encountered in the application you are running. An application made a request that only administrators of the Event Notification Service (ENS) are authorized to make.

Action

Make sure the NDS* account used by the application is assigned as an administrator of the Broker object associated with this ENS.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1236  0xFFFFFB2C  NWDP OE NF NO SRVC REGIST AVAIL

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) could not find a Service Registry Service (SRS) on the network to advertise its availability.

Possible Cause

No SRS was enabled within the SAP-query range of this ENS.

Action

Make sure that there is at least one SRS enabled within the SAP-query range of this ENS.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1237  0xFFFFFB2B  NWDP OE NF FAIL TO REG W ANY SR

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) could not register with any Service Registry Service (SRS) on the network to advertise its availability.

Possible Cause

No SRS was enabled within the SAP-query range of this ENS.

Action

Make sure that there is at least one SRS enabled within the SAP-query range of this ENS.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1238  0xFFFFFB2A  NWDP OE NF EMPTY EVENT OBJ SET

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an Event object set that was empty.

Possible Cause

A programming error might have been encountered in the application you are running. An application requested that the ENS add a profile but failed to provide a set of events of interest.

Action

 When adding a profile, an application should specify one or more Event objects.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1239  0xFFFFFB29  NWDP OE NF UNKNOWN NTFY HANDLE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an unknown notification handle.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-124  FFFFFFF84  CONN NOT AUTHENTICATED

Explanation

The connection for a call has not been authenticated.

Action

See Reporting Error Code Problems to Novell.


-1240  0xFFFFFB28  NWDP OE NF OPTION NOT SUPPORTED

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an option that is not supported.

Possible Cause

A programming error might have been encountered in the application you are running. An application submitted a request using options not supported by this ENS.

Action

If the problem persists, contact the application developer.

If you are debugging a program, consult the SDK documentation to determine what options are supported by this version of the ENS.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1241  0xFFFFFB27  NWDP OE NF UNKNOWN RPC SESSION

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an unknown RPC session.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1242  0xFFFFFB26  NWDP OE NF INITIALIZATION ERROR

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an initialization error.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1244  0xFFFFFB24  NWDP OE NF NO PERSISTENT STORAG

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) did not receive a persistent storage option.

Possible Cause

A printer requested to add a profile and store it persistently but failed to properly populate the supplier alias option.

Action

The printer should specify in the supplier alias option the name of the Printer object where the profile should be stored persistently.

If the problem persists, contact the printer vendor or a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1245  0xFFFFFB23  NWDP OE NF BAD METHOD FILENAME

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an invalid method filename.

Possible Cause

A programming error might have been encountered in the application you are running. An application requested to load a delivery method but provided an invalid filename to be loaded.

Action

Make sure the application only requests to load a delivery method whose filename is NULL-terminated string with extension ".ENM" or no extension at all and that does not have any "\"or "/"characters as part of the name string.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1246  0xFFFFFB22  NWDP OE NF UNKNOWN CONT HANDLE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an unknown continuation handle.

Possible Cause

A programming error might have been encountered in the application you are running. An application provided an invalid continuation handle when requesting to list profiles.

Action

The application should only send a continuation handle when more than one call to list profiles is needed to get a complete listing. The first call to list profiles should contain a NULL continuation handle. The result from this call informs the application if subsequent calls are needed. If so, a continuation handle is returned that the application should use in the next call. Each call returns an updated continuation call, if one is needed, which the application should submit with the next invocation.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1247  0xFFFFFB21  NWDP OE NF INVALID CONT HANDLE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an invalid continuation handle.

Possible Cause

A programming error might have been encountered in the application you are running. An application provided an invalid continuation handle when requesting to list profiles.

Action

The application should only send a continuation handle when more than one call to list profiles is needed to get a complete listing. The first call to list profiles should contain a NULL continuation handle. The result from this call informs the application if subsequent calls are needed.  If so, a continuation handle is returned that the application should use in the next call. Each call returns an updated continuation call, if one is needed, which the application should submit with the next invocation.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1248  0xFFFFFB20  NWDP OE NF COULD NOT FIND FILE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) could not find the NLM program that implements one of the delivery methods.

Possible Cause

An NLM program that implements a delivery method did not exist in the SYSTEM directory of the server.

Action

Make sure that the all NLM programs that implement all delivery methods (files with the .ENM extension) reside in the SYSTEM directory of the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1249  0xFFFFFB1F  NWDP OE NF L ERROR READING FILE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) could not find the NLM that implements one of the delivery methods.

Possible Cause

An NLM program that implements a delivery method did not exist in the SYSTEM directory of the server.

Action

Make sure that the NLM programs that implement all delivery methods (files with the .ENM extension) reside in the SYSTEM directory of the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-125  FFFFFFF83  CONN NOT LOGGED IN

Explanation

An attempt was made to log out of a connection that the user was not logged in to.

Action

See Reporting Error Code Problems to Novell.


-1250  0xFFFFFB1E  NWDP OE NF NOT NLM FILE FORMAT

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received a file that was not in the NLM file format.

Possible Cause

The format of one of the NLM files that implement the Brokered services is corrupted.

Action

Reinstall NDPS on this server, or manually copy the NLM programs that implement the delivery methods.  All the files that implement delivery methods have an .ENM extension.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1251  0xFFFFFB1D  NWDP OE NF WRONG NLM FILE VER

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an NLM program with the wrong version.

Possible Cause

The version of the NLM program that implements one of the delivery methods is obsolete with this version of IntranetWare*.

Action

Contact a Novell support provider for an update of NDPS.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1253  0xFFFFFB1B  NWDP OE NF ALREADY IN PROGRESS

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) tried to load an NLM program that implements a delivery method while it was already being loaded.

Action

Wait until the NLM program in question is fully loaded or unloaded before proceeding to enable or disable the corresponding delivery method.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1254  0xFFFFFB1A  NWDP OE NF INITIALIZE FAILURE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) failed to initialize.

Possible Cause

The server loader failed to initialize a support NLM program as it was being loaded by the ENS.

Action

Disable and reenable the ENS, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1257  0xFFFFFB17  NWDP OE NF AUTO MODULS NOT LOAD

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The attempt made by the Event Notification Service (ENS) to automatically load some modules it depends on failed.

Possible Cause

Some of the NLM programs that the ENS depends on to execute are not present in the SYSTEM directory of the server.

Action

From the server console, note the names of the support modules that could not be found.  Make sure those files exist in the SYSTEM directory of the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1258  0xFFFFFB16  NWDP OE NF UNRESOLVED EXTERNAL

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received an NLM program file on which it was unable to resolve its external dependencies.

Possible Cause

Some of the NLM programs that the Event Notification Service (ENS) depends on to execute need to be updated.

Action

Make sure you have a current version of NDPS and do a complete installation of NDPS on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-126  FFFFFFF82  NCP BOUNDARY CHECK FAILED

Explanation

The NCP subfunction size does not match the actual size of the data sent.

Action

See Reporting Error Code Problems to Novell.


-1260  0xFFFFFB14  NWDP OE NF USING UNKNOWN METHDS

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) received a profile that specified a delivery method which is unknown.

Possible Cause

While trying to dispatch an event to an interested party, the ENS came across a profile that specified a delivery method that is not currently loaded.

Action

Using NetWare* Administrator, review the current registrations to the ENS, and make sure that all the delivery methods needed are loaded.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1261  0xFFFFFB13  NWDP OE NF SRVC NOT FULL ENABLD

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) is not fully enabled.

Possible Cause

A delivery method tried to register itself with the ENS while it was still coming up.

Action

Wait for the ENS to finish coming up, they try again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1262  0xFFFFFB12  NWDP OE NF FOREIGN NDS TREE NAM

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Event Notification Service (ENS) found that the NDS* tree name specified as part of the supplier alias or consumer file does not match its own. A controlled access printer must bind with an ENS that exists in the same NDS tree for the ENS to be able to save persistent information in the printer’s NDS object.

Action

Make sure the ENS you want the printer to bind to is in the same NDS tree as the Printer object.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1263  0xFFFFFB11  NWDP OE NF DLVYMETH REJCTD ADDR

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The delivery address submitted with a profile to be added was rejected by a delivery method.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

The application that submitted the profile should make sure that the delivery address provides all the information expected by the delivery method specified in the profile.  The application can find this information from the delivery method by calling the Getmethodinfo function.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1264  0xFFFFFB10  NWDP OE NF UNSUPRT DLVYADDRTYPE

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An application submitted a delivery address using options that are not supported by the version of a loaded delivery method.

Action

Upgrade the delivery method in question. If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1265  0xFFFFFB0F  NWDP OE NF USR OBJ NO DEFLTSERV

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The pop-up delivery method failed to validate a delivery address.

Possible Cause

The specified user did not have a default server assigned to it.

Action

Use NetWare* Administrator to assign the user a default server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1266  0xFFFFFB0E  NWDP OE NF FAILED TO SEND NOTIF

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

An attempt to send notification failed.

Action

The ENS will resolve the problem internally.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1267  0xFFFFFB0D  NWDP OE NF BAD VOLUME IN ADDR

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The log-file delivery method failed to validate a delivery address.

Possible Cause

A programming error might have been encountered in the application you are running. The volume specified in the log file was invalid.

Action

The application submitting the profile should make sure that the specified volume name is fully qualified and that it includes a leading period.

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-1268  0xFFFFFB0C  NWDP OE NF Broker NO FILE RIGHT

Source

Novell* Distributed Print Services* (NDPS*), Notification Service NLM* program

Explanation

The Log-file delivery method failed to validate a delivery address.

Possible Cause

The Broker object associated with the delivery method does not have rights to modify the specified log file.

Action

Using NetWare* Administrator, grant the Broker object associated with the delivery method the Write and Create rights to the log file.  If the log file does not exist yet, assign the rights to the directory where the delivery method is supposed to create it.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-127  FFFFFFF81  LOCK WAITING

Explanation

A timeout occurred before a file was locked.

Action

See Reporting Error Code Problems to Novell.


-128  FFFFFFF80  LOCK FAIL

Explanation

An attempt was made to open or create a file that is already open.

Action

See Reporting Error Code Problems to Novell.


-129  FFFFFFF7F  OUT OF HANDLES

Explanation

No more file handles are available or the network file handle table is full.

Action

See Reporting Error Code Problems to Novell.


-130  FFFFFFF7E  NO OPEN PRIVILEGE

Explanation

An attempt was made to open a file without the Open right.

Action

See Reporting Error Code Problems to Novell.


-131  FFFFFFF7D  HARD IO ERROR

Explanation

A hard disk input/output error occurred on a NetWare* volume; a bad sector has been encountered and could be fatal.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-132  FFFFFFF7C  NO CREATE PRIVILEGE

Explanation

An attempt was made to create a file without the Create right.

Action

See Reporting Error Code Problems to Novell.


-133  FFFFFFF7B  NO CREATE DELETE PRIV

Explanation

An attempt was made to create an already existing file without the Create/Delete rights.

Action

See Reporting Error Code Problems to Novell.


-134  FFFFFFF7A  R O CREATE FILE

Explanation

An attempt was made to create a file with the same name as an already existing file with Read Only status.

Action

See Reporting Error Code Problems to Novell.


-135  FFFFFFF79  CREATE FILE INVALID NAME

Explanation

An attempt was made to create a file using an ambiguous filename.

Action

See Reporting Error Code Problems to Novell.


-136  FFFFFFF78  INVALID FILE HANDLE

Explanation

An attempt was made to close or perform I/O on a file with an invalid file handle (that is, an attempt was made to read from a file that has been closed).

Action

See Reporting Error Code Problems to Novell.


-137  FFFFFFF77  NO SEARCH PRIVILEGE

Explanation

An attempt was made to search a directory without Search rights in that directory.

Action

See Reporting Error Code Problems to Novell.


-138  FFFFFFF76  NO DELETE PRIVILEGE

Explanation

An attempt was made to delete a file without file deletion privileges in that file's directory.

Action

See Reporting Error Code Problems to Novell.


-139  FFFFFFF75  NO RENAME PRIVILEGE

Explanation

An attempt was made to rename a file without renaming privileges in that file's directory.

Action

See Reporting Error Code Problems to Novell.


-140  FFFFFFF74  NO SET PRIVILEGE

Explanation

An attempt was made to modify a file without attribute modification privileges in that file's directory.

Action

See Reporting Error Code Problems to Novell.


-141  FFFFFFF73  SOME FILES IN USE

Explanation

An attempt was made to delete, rename, or set file attributes using an ambiguous filename while some of the files specified by the filename are in use by another workstation.

Action

See Reporting Error Code Problems to Novell.


-142  FFFFFFF72  ALL FILES IN USE

Explanation

An attempt was made to delete, rename, or set file attributes using a filename when the file or files specified by the filename were in use by another workstation.

Action

See Reporting Error Code Problems to Novell.


-143  FFFFFFF71  SOME READ ONLY

Explanation

An attempt was made to delete, rename, or set file attributes using a filename when some of the files specified have Read Only status.

Action

See Reporting Error Code Problems to Novell.


-144  FFFFFFF70  ALL READ ONLY

Explanation

An attempt was made to delete, rename, or set file attributes using a filename when all of the files specified have Read Only status.

Action

See Reporting Error Code Problems to Novell.


-145  FFFFFFF6F  SOME NAMES EXIST

Explanation

An attempt was made to rename files when one or more files matching the new filename specification already exist.

Action

See Reporting Error Code Problems to Novell.


-146  FFFFFFF6E  ALL NAMES EXIST

Explanation

An attempt was made to rename files when all of the files matching the new filename specification already exist.

Action

See Reporting Error Code Problems to Novell.


-147  FFFFFFF6D  NO READ PRIVILEGE

Explanation

An attempt was made to read a file without Read privileges to that file.

Action

See Reporting Error Code Problems to Novell.


-148  FFFFFFF6C  NO WRITE PRIVILEGE

Explanation

An attempt was made to write to a file without Write privileges to that file, or the specified file has Read Only status.

Action

See Reporting Error Code Problems to Novell.


-149  FFFFFFF6B  FILE DETACHED

Explanation

An attempt was made to read or write to a detached file.

Action

See Reporting Error Code Problems to Novell.


-150  FFFFFFF6A  INSUFFICIENT MEMORY

Explanation

An attempt was made to write to a file server that does not have enough free dynamic memory to process this request.

Action

See Reporting Error Code Problems to Novell.


-150  FFFFFFF6A  NO ALLOC SPACE

Explanation

An attempt was made to write to a file server that does not have enough free dynamic memory to process this request.

Action

See Reporting Error Code Problems to Novell.


-150  FFFFFFF6A  TARGET NOT A SUBDIR

Explanation

The specified target directory is not a subdirectory.

Action

See Reporting Error Code Problems to Novell.


-150  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INSUFFICIENT MEMORY

NO ALLOC SPACE

TARGET NOT A SUBDIR


-151  FFFFFFF69  NO SPOOL SPACE

Explanation

The network operating system has determined that the network disk does not have enough space left for spool files.

Action

See Reporting Error Code Problems to Novell.


-152  FFFFFFF68  INVALID VOLUME

Explanation

The network operating system has tried to access a volume but cannot find the volume in the system definition files.

Action

See Reporting Error Code Problems to Novell.


-153  FFFFFFF67  DIRECTORY FULL

Explanation

An attempt was made to write to a volume without available directory space.

Action

See Reporting Error Code Problems to Novell.


-154  FFFFFFF66  RENAME ACROSS VOLUME

Explanation

An attempt was made to rename across volumes (rename a file and move the renamed file from its current volume into another volume). Although the RENAME command may move the file between directories on the same volume, using RENAME to move a file between volumes is not allowed.

Action

See Reporting Error Code Problems to Novell.


-155  FFFFFFF65  BAD DIR HANDLE

Explanation

An attempt was made to use an invalid directory handle. This occurs if the network has been brought down and brought back up without rebooting the workstation.

Action

See Reporting Error Code Problems to Novell.


-156  FFFFFFF64  INVALID PATH

Explanation

An attempt was made to access an invalid path.

Action

See Reporting Error Code Problems to Novell.


-156  FFFFFFF64  NO SUCH EXTENSION

Explanation

An invalid extension was specified.

Action

See Reporting Error Code Problems to Novell.


-156  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INVALID PATH

NO SUCH EXTENSION


-157  FFFFFFF63  NO DIR HANDLES

Explanation

No more directory handles are available; the directory handle table is full. Each user may have up to 255 directory handles.

Action

See Reporting Error Code Problems to Novell.


-158  FFFFFFF62  BAD FILE NAME

Explanation

An attempt was made to create a file using invalid characters within the name of the file. Illegal characters in names are control characters, the comma, colon, semicolon, slash, backslash, question mark, asterisk, and tilde.

Action

Try making the request again using valid characters in the file name.


-159  FFFFFFF61  DIRECTORY ACTIVE

Explanation

An attempt was made to delete a directory that is being used by another workstation.

Action

See Reporting Error Code Problems to Novell.


-160  FFFFFFF60  DIRECTORY NOT EMPTY

Explanation

An attempt was made to delete a directory that contains files or other directories.

Action

See Reporting Error Code Problems to Novell.


-161  FFFFFFF5F  DIRECTORY IO ERROR

Explanation

A nonrecoverable I/O error has occurred on the disk in the directory area. This error has occurred in both copies of the directory and is fatal.

Action

See Reporting Error Code Problems to Novell.


-162  FFFFFFF5E  IO LOCKED

Explanation

An attempt was made to read a file where data is physically locked.

Action

See Reporting Error Code Problems to Novell.


-163  FFFFFFF5D  TRANSACTION RESTARTED

Action

See Reporting Error Code Problems to Novell.


-164  FFFFFFF5C  RENAME DIR INVALID

Explanation

An attempt was made to rename a directory with an invalid name.

Action

See Reporting Error Code Problems to Novell.


-165  FFFFFFF5B  INVALID OPENCREATE MODE

Explanation

An invalid opencreate mode was encountered.

Action

See Reporting Error Code Problems to Novell.


-166  FFFFFFF5A  ALREADY IN USE

Explanation

An attempt was made to access a file that was already in use.

Action

See Reporting Error Code Problems to Novell.


-167  FFFFFFF59  INVALID RESOURCE TAG

Explanation

An invalid resource tag was encountered.

Action

See Reporting Error Code Problems to Novell.


-168  FFFFFFF58  ACCESS DENIED

Explanation

Access has been denied.

Action

See Reporting Error Code Problems to Novell.


-190  FFFFFFF42  INVALID DATA STREAM

Explanation

Data streams are invalid.

Action

See Reporting Error Code Problems to Novell.


-191  FFFFFFF41  INVALID NAME SPACE

Explanation

An invalid name space was used.

Action

See Reporting Error Code Problems to Novell.


-192  FFFFFFF40  NO ACCOUNTING PRIVILEGES
-192  FFFFFFFF40  NO ACCOUNTING PRIVILEGES

Explanation

The user has no accounting privileges.

Action

See Reporting Error Code Problems to Novell.


-193  FFFFFFF3F  NO ACCOUNT BALANCE

Explanation

Attempt was made to log in by a Bindery object without an accounting balance, and accounting is enabled.

Action

See Reporting Error Code Problems to Novell.


-194  FFFFFFF3E  CREDIT LIMIT EXCEEDED

Explanation

An attempt was made to log in to an account with no credit available.

Action

See Reporting Error Code Problems to Novell.


-195  FFFFFFF3D  TOO MANY HOLDS

Action

See Reporting Error Code Problems to Novell.


-196  FFFFFFF3C  ACCOUNTING DISABLED

Explanation

Accounting has been disabled.

Action

See Reporting Error Code Problems to Novell.


-197  FFFFFFF3B  LOGIN LOCKOUT

Explanation

An attempt was made to log in after the system had locked the account because of intruder detection.

Action

See Reporting Error Code Problems to Novell.


-198  FFFFFFF3A  NO CONSOLE RIGHTS

Explanation

An attempt was made to use console privileges without operator privileges.

Action

See Reporting Error Code Problems to Novell.


-208  FFFFFFF30  Q IO FAILURE

Explanation

A queue I/O error occurred.

Action

See Reporting Error Code Problems to Novell.


-209  FFFFFFF2F  NO QUEUE

Explanation

No queues are defined.

Action

See Reporting Error Code Problems to Novell.


-210  FFFFFFF2E  NO Q SERVER

Explanation

No queue server has been specified.

Action

See Reporting Error Code Problems to Novell.


-211 FFFFFFF2D  NO Q RIGHTS

Explanation

An attempt was made to use the queue with no access privileges.

Action

See Reporting Error Code Problems to Novell.


-212  FFFFFFF2C  Q FULL

Explanation

The queue is full.

Action

See Reporting Error Code Problems to Novell.


-213  FFFFFFF2B  NO Q JOB

Explanation

No jobs are in the queue.

Action

See Reporting Error Code Problems to Novell.


-214  FFFFFFF2A  NO Q JOB RIGHTS

Explanation

An attempt was made to access a job in the queue with no queue privileges.

Action

See Reporting Error Code Problems to Novell.


-214  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

NO Q JOB RIGHTS

UNENCRYPTED NOT ALLOWED


-214 FFFFFFF2A  UNENCRYPTED NOT ALLOWED

Action

See Reporting Error Code Problems to Novell.


-215  FFFFFFF29  DUPLICATE PASSWORD

Explanation

An attempt was made to change a password to a previously used password when the unique password requirement is specified for the account.

Action

See Reporting Error Code Problems to Novell.


-215  FFFFFFF29  Q IN SERVICE

Explanation

The queue is in service at this time.

Action

See Reporting Error Code Problems to Novell.


-215  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

DUPLICATE PASSWORD

Q IN SERVICE


-216  FFFFFFF28  PASSWORD TOO SHORT

Explanation

An attempt was made to change a password to a password with fewer characters than the required minimum specified for the account.

Action

Reenter the password using at least the minimum amount of required characters.


-216  FFFFFFF28  Q NOT ACTIVE

Explanation

An attempt was made to access a queue that is not active.

Action

See Reporting Error Code Problems to Novell.


-216  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

PASSWORD TOO SHORT

Q NOT ACTIVE


-217  FFFFFFF27  MAXIMUM LOGINS EXCEEDED

Explanation

An attempt was made to log in using an account that has limits on the number of concurrent connections and that number has been reached.

Action

See Reporting Error Code Problems to Novell.


-217  FFFFFFF27  Q STN NOT SERVER

Explanation

The queue station is not a server.

Action

See Reporting Error Code Problems to Novell.


-217  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

MAXIMUM LOGINS EXCEEDED

Q STN NOT SERVER


-218  FFFFFFF26  BAD LOGIN TIME

Explanation

An attempt was made to log in during an unauthorized time of day specified for the account.

Action

See Reporting Error Code Problems to Novell.


-218  FFFFFFF26  Q HALTED

Explanation

The queue has been halted.

Action

See Reporting Error Code Problems to Novell.


-218  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BAD LOGIN TIME

Q HALTED


-219  FFFFFFF25  NODE ADDRESS VIOLATION

Explanation

An attempt to log in was made from an unauthorized station using an account with limits to a specific network and or station.

Action

See Reporting Error Code Problems to Novell.


-219  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

NODE ADDRESS VIOLATION

Q MAX SERVERS


-219 FFFFFFF25  Q MAX SERVERS

Explanation

This queue is already attached to the maximum number of servers allowed.

Action

See Reporting Error Code Problems to Novell.


-220  FFFFFFF24  LOG ACCOUNT EXPIRED

Explanation

An attempt was made by a station to log in using an account that has expired or has been disabled by the Supervisor.

Action

See Reporting Error Code Problems to Novell.


-222  FFFFFFF22  BAD PASSWORD

Explanation

An attempt was made to log in using an account password that has expired and all grace logins have also expired.

Action

See Reporting Error Code Problems to Novell.


-223  FFFFFFF21  PASSWORD EXPIRED

Explanation

An attempt was made by a station to log in using an expired account password but the login was allowed because the account had a grace login.

Action

See Reporting Error Code Problems to Novell.


-224  FFFFFFF20  NO LOGIN CONN AVAILABLE

Explanation

An attempt was made by a station to login when no login connections were available.

Action

See Reporting Error Code Problems to Novell.


-232  FFFFFFF18  WRITE TO GROUP PROPERTY

Explanation

An attempt was made by a station to write a data segment to a group property using the call to write a property value.

Action

See Reporting Error Code Problems to Novell.


-233  FFFFFFF17  MEMBER ALREADY EXISTS

Explanation

An attempt was made by a station to redundantly add an object to a group property.

Action

See Reporting Error Code Problems to Novell.


-234  FFFFFFF16  NO SUCH MEMBER

Explanation

An attempt was made by a station to use an object that is not a member of the defined group property.

Action

See Reporting Error Code Problems to Novell.


-235  FFFFFFF15  PROPERTY NOT GROUP

Explanation

An attempt was made by a station to use a nongroup property.

Action

See Reporting Error Code Problems to Novell.


-236  FFFFFFF14  NO SUCH VALUE SET

Explanation

An attempt was made by a station to use a nonexistent segment. Segments must be written sequentially when a property is first created, but can be read and written in any order after they already exist.

Action

See Reporting Error Code Problems to Novell.


-237  FFFFFFF13  PROPERTY ALREADY EXISTS

Explanation

An attempt was made by a station to create a property that already exists.

Action

See Reporting Error Code Problems to Novell.


-238  FFFFFFF12  OBJECT ALREADY EXISTS

Explanation

An attempt was made by a station to create an object that already exists.

Action

See Reporting Error Code Problems to Novell.


-239  FFFFFFF11  ILLEGAL NAME

Explanation

A request was made with an object or property name containing illegal characters. Illegal characters in names are control characters, the comma, colon, semicolon, slash, backslash, question mark, asterisk, and tilde.

Action

Try making the request again using valid characters.


-240  FFFFFFF10  ILLEGAL WILDCARD

Explanation

An attempt was made to use a wildcard character or wild object type in a call where wildcards are not allowed.

Action

See Reporting Error Code Problems to Novell.


-241  FFFFFFF0F  BINDERY SECURITY

Explanation

An attempt to assign a security level of a Bindery object or property to be higher than the user's security level was made. This would make the object or property inaccessible to the user.

Action

See Reporting Error Code Problems to Novell.


-242  FFFFFFF0E  NO OBJECT READ RIGHTS

Explanation

An attempt to access object information or scan the object's properties was made by a station without the necessary security to access this information or object's properties.

Action

See Reporting Error Code Problems to Novell.


-243  FFFFFFF0D  NO OBJECT RENAME RIGHTS

Explanation

An attempt to rename an object was made by a station without the necessary security to rename an object. Only the Supervisor object can rename objects. If a station does not even have the proper security to see that the object exists, then NCP_NO_SUCH_OBJECT is returned.

Action

See Reporting Error Code Problems to Novell.


-244  FFFFFFF0C  NO OBJECT DELETE RIGHTS

Explanation

An attempt to delete an object was made by a station without the necessary security to delete the object. Only the Supervisor object can delete objects. If a station does not have the proper security to see that the object exists, then NCP_NO_SUCH_OBJECT is returned.

Action

See Reporting Error Code Problems to Novell.


-245  FFFFFFF0B  NO OBJECT CREATE RIGHTS

Explanation

An attempt to create an object was made by a station without the necessary security to create or change an object. Only the Supervisor object is allowed to create objects.

Action

See Reporting Error Code Problems to Novell.


-246  FFFFFFF0A  NO PROPERTY DELETE RIGHTS

Explanation

An attempt to delete a property was made by a station without the necessary security privilege to delete a property from the give object. If the station does not have the proper security to see that the property exists, then NCP_NO_SUCH_PROPERTY is returned.

Action

See Reporting Error Code Problems to Novell.


-247  FFFFFFF09  NO PROPERTY CREATE RIGHTS

Explanation

An attempt to create a property was made by a station without the necessary security to create or change a property for the object.

Action

See Reporting Error Code Problems to Novell.


-248  FFFFFFF08  NO PROPERTY WRITE RIGHTS

Explanation

An attempt to write was made by a station without the necessary write security to access the property data.

Action

See Reporting Error Code Problems to Novell.


-249  FFFFFFF07  NO PROPERTY READ RIGHTS

Explanation

An attempt to read was made by a station without the necessary read security to access the property data.

Action

See Reporting Error Code Problems to Novell.


-250  FFFFFFF06  TEMP REMAP

Explanation

An attempt was made to use an unknown path.

Action

See Reporting Error Code Problems to Novell.


-251  FFFFFFF05  NO SUCH PROPERTY

Explanation

An attempt was made to use a property that does not exist for the specified object.

Action

See Reporting Error Code Problems to Novell.


-251  FFFFFFF05  UNKNOWN REQUEST

Explanation

An attempt was made to use an invalid parameter (drive number, path, or flag value) during a set drive path call.

Action

See Reporting Error Code Problems to Novell.


-251  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

NO SUCH PROPERTY

UNKNOWN REQUEST


-252  FFFFFFF04  MESSAGE QUEUE FULL

Explanation

An attempt was made to use a full message queue.

Action

See Reporting Error Code Problems to Novell.


-252  FFFFFFF04  NO SUCH OBJECT

Explanation

An attempt was made to use an object that doesn't exist, or the calling station does not have the proper security to access the object. The object name and type must both match for the object to be found.

Action

See Reporting Error Code Problems to Novell.


-252  FFFFFFF04  TARGET ALREADY HAS MSG

Explanation

The message recipient already has a message waiting.

Action

See Reporting Error Code Problems to Novell.


-252  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

MESSAGE QUEUE FULL

NO SUCH OBJECT

TARGET ALREADY HAS MSG


-253  FFFFFFF03  BAD STATION NUMBER

Explanation

An attempt was made to use a bad (undefined, unavailable, etc.) station number.

Action

See Reporting Error Code Problems to Novell.


-254  FFFFFFF02  BINDERY LOCKED

Explanation

An attempt was made to use a bindery that is temporarily locked by the Supervisor.

Action

See Reporting Error Code Problems to Novell.


-254  FFFFFFF02  DIR LOCKED

Explanation

An attempt was made to use a locked directory.

Action

See Reporting Error Code Problems to Novell.


-254  FFFFFFF02  LOGIN DISABLED

Explanation

An attempt was made to login when login was disabled.

Action

See Reporting Error Code Problems to Novell.


-254  FFFFFFF02  SPOOL DELETE

Explanation

An error occurred during an attempt to delete a spool.

Action

See Reporting Error Code Problems to Novell.


-254  FFFFFFF02  TRUSTEE NOT FOUND

Explanation

An operation tried to use an unknown trustee.

Action

See Reporting Error Code Problems to Novell.


-254  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BINDERY LOCKED

DIR LOCKED

LOGIN DISABLED

SPOOL DELETE

TRUSTEE NOT FOUND


-255  FFFFFFF01  BAD PARAMETER

Explanation

An invalid parameter was used.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  BAD SPOOL PRINTER

Explanation

An attempt was made to use a bad (undefined, unavailable, etc.) printer.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  CLOSE FCB

Explanation

An error occurred closing the file.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  ERR OF SOME SORT

EXPLANATION

An internal error that has not been identified by Novell has occurred.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  FILE EXISTS

Explanation

An attempt was made to create a file that already exists.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  FILE NAME

Explanation

An attempt was made to use a file with a bad (undefined, unavailable, etc.) name or extension.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  HARD FAILURE

Explanation

A hardware failure occurred.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  IO BOUND

Explanation

The program tried to write beyond the end of the file or disk.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  MUST FORCE DOWN

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  NO FILES FOUND

Explanation

No files were found that matched the search specification.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  NO SPOOL FILE

Explanation

There are no spooled files.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  NO TRUSTEE CHANGE PRIV

Explanation

The user does not have the rights to change trustees.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  TARGET NOT ACCEPTING MSGS

Explanation

The target station is not accepting messages.

Action

See Reporting Error Code Problems to Novell.


-255  FFFFFFF01  TARGET NOT LOGGED IN

Explanation

The target station is not logged in.

Action

See Reporting Error Code Problems to Novell.


-255  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BAD PARAMETER

BAD SPOOL PRINTER

CLOSE FCB

ERR OF SOME SORT

FILE EXISTS

FILE NAME

HARD FAILURE

IO BOUND

MUST FORCE DOWN

NO FILES FOUND

NO SPOOL FILE

NO TRUSTEE CHANGE PRIV

TARGET NOT ACCEPTING MSGS

TARGET NOT LOGGED IN


-301  FFFFFFED3  NOT ENOUGH MEMORY

Explanation

The client workstation does not have enough available memory.

Action

See Reporting Error Code Problems to Novell.


-302  FFFFFFED2  BAD KEY

Explanation

The program is trying to pass a bad key parameter for a context call. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-303  FFFFFFED1  BAD CONTEXT

Explanation

The program is trying to pass a bad context parameter to an NDS call. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-304  FFFFFFED0  BUFFER FULL

Explanation

The workstation does not have room to add data to an input buffer.

Action

See Reporting Error Code Problems to Novell.


-305  FFFFFFECF  LIST EMPTY

Explanation

The program passed an empty list (a null pointer) to NWDSPutAttrVal. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-306  FFFFFFECE  BAD SYNTAX

Explanation

The program tried to pass an ID that had an invalid syntax. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-307  FFFFFFECD  BUFFER EMPTY

Explanation

The program tried to get data from an empty buffer. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-308  FFFFFFECC  BAD VERB

Explanation

The program initialized the buffer with a verb not associated with the API. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-309  FFFFFFECB  EXPECTED IDENTIFIER

Explanation

The name being parsed is not typed.

Action

See Reporting Error Code Problems to Novell.


-310  FFFFFFECA  EXPECTED EQUALS

Explanation

An equal sign is expected in the name.

Action

See Reporting Error Code Problems to Novell.


-311  FFFFFFEC9  ATTR TYPE EXPECTED

Explanation

The multi-AVA name being parsed must be typed.

Action

All AVAs must be typed or not typed.


-312  FFFFFFEC8  ATTR TYPE NOT EXPECTED

Explanation

The multi-AVA name being parsed might not be typed.

Action

All AVAs must be typed or not typed.


-313  FFFFFFEC7  FILTER TREE EMPTY

Explanation

The program is trying to delete an empty filter. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-314  FFFFFFEC6  INVALID OBJECT NAME

Explanation

The program is trying to pass a NULL string for object name to the API call or trying to pass a name containing both leading and trailing dots.

Action

See Reporting Error Code Problems to Novell.


-315  FFFFFFEC6  EXPECTED RDN DELIMITER

Explanation

An RDN delimiter (.) was expected and not found while the name was being parsed.

Action

See Reporting Error Code Problems to Novell.


-316  FFFFFFEC5  TOO MANY TOKENS

Explanation

Too many trailing delimiter dots occurred in the name. Only three context levels and four trailing dots are allowed in a name.

Action

See Reporting Error Code Problems to Novell.


-317  FFFFFFEC3  INCONSISTENT MULTIAVA

Explanation

The AVA type is incorrect.

Action

See Reporting Error Code Problems to Novell.


-318  FFFFFFEC2  COUNTRY NAME TOO LONG

Explanation

Country name identifiers are only allowed one character.

Action

See Reporting Error Code Problems to Novell.


-319  FFFFFFEC1  SYSTEM ERROR

Explanation

This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-320  FFFFFFEC0  CANT ADD ROOT

Explanation

The program is trying to restore an object at the root.

Action

See Reporting Error Code Problems to Novell.


-321  FFFFFFEBF  UNABLE TO ATTACH

Explanation

An attempt to connect to a server failed.

Action

See Reporting Error Code Problems to Novell.


-322  FFFFFFEBE  INVALID HANDLE

Explanation

An invalid iteration handle was found. This is probably an internal program error.

Action

See Reporting Error Code Problems to Novell.


-323  FFFFFFEBD  BUFFER ZERO LENGTH

Explanation

The program tried to call NWDS AllocBuf with a zero-length size. This is probably an internal program error.

Action

See Reporting Error Code Problems to Novell.


-324  FFFFFFEBC  INVALID REPLICA TYPE

Explanation

The program tried to pass in a replica type that was not a Master, Secondary, or Read Only. This is probably an internal program error.

Action

See Reporting Error Code Problems to Novell.


-325  FFFFFFEBB  INVALID ATTR SYNTAX

Explanation

An invalid attribute syntax was passed in.

Action

See Reporting Error Code Problems to Novell.


-326  FFFFFFEBA  INVALID FILTER SYNTAX

Explanation

An invalid filter syntax was passed in.

Action

See Reporting Error Code Problems to Novell.


-328  FFFFFFEB8  CONTEXT CREATION

Explanation

The context could not be created. This error occurs

Most often when the Unicode** files are not loaded.

When NDS* Manager is running on Windows** 95** and the maximum number of context handles in use has been reached.

Note: Windows 95 only allows 16 context handles per process.  Windows 3x allows 48 total handles system-wide. Therefore, you might see this error in Windows 3x, but will most likely see it in Windows 95.

Action

Make sure the Unicode files are loaded.

If you are using NDS Manager, do the following actions in order:

1.	Close some of your NDS Manager windows and retry the operation.

2.	If you are using Window 3x, and the first action does not work, close any unnecessary applications and retry the operation.

3.	If step 1 or 2 does not work, shut down the workstation and bring it back up.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-329  FFFFFFEB7  INVALID UNION TAG

Explanation

The server returned an "infotype" parameter that did not agree with the infotype passed in. This is an internal program error.

Action

See Reporting Error Code Problems to Novell.


-330  FFFFFFEB6  INVALID SERVER RESPONSE

Explanation

The server returned an invalid response.

Action

See Reporting Error Code Problems to Novell.


-331  FFFFFFEB5  NULL POINTER

Explanation

A null pointer was found when a Real pointer was expected.

Action

Do not use a null pointer.


-332  FFFFFFEB5  NO SERVER FOUND

Explanation

The attempt to connect failed to find any servers responding.

Action

See Reporting Error Code Problems to Novell.


-333  FFFFFFEB3  NO CONNECTION

Explanation

An invalid iteration handle was found. This is probably an internal program error.

Action

See Reporting Error Code Problems to Novell.


-334  FFFFFFEB2  RDN TOO LONG

Explanation

The Relative Distingushed Name (RDN) exceeded 128 characters.

Action

See Reporting Error Code Problems to Novell.


-335  FFFFFFEB1  DUPLICATE TYPE

Explanation

Multi-AVAs exist. AVAs cannot contain the same type.

Action

See Reporting Error Code Problems to Novell.


-336  FFFFFFEB0  DATA STORE FAILURE

Explanation

A data storage failure occurred.

Action

See Reporting Error Code Problems to Novell.


-337  FFFFFFEAF  NOT LOGGED IN

Action

See Reporting Error Code Problems to Novell.


-338  FFFFFFEAE  INVALID PASSWORD CHARS

Explanation

Illegal characters were used when assigning the password. Illegal characters in names are control characters, the comma, colon, semicolon, slash, backslash, question mark, asterisk, and tilde.

Action

Try assigning the password again using valid characters.


-339  FFFFFFEAD  FAILED SERVER AUTHENT

Action

See Reporting Error Code Problems to Novell.


-340  FFFFFFEAC  TRANSPORT

Explanation

A transport failure occurred.

Action

See Reporting Error Code Problems to Novell.


-341  FFFFFFEAB  NO SUCH SYNTAX

Action

See Reporting Error Code Problems to Novell.


-342  FFFFFFEAA  INVALID DS NAME

Explanation

An invalid Novell* Directory Services* name was found.

This error might occur by either of the following two reasons:

An empty string was passed in for a name

Null pointer

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-343  FFFFFFEA9  ATTR NAME TOO LONG

Explanation

The attribute name exceeded 128 characters.

Action

See Reporting Error Code Problems to Novell.


-344  FFFFFFEA8  INVALID TDS

Explanation

The Tagged Data Store (TDS) is not initialized or is corrupted. This usually occurs when the NWDS Login function was not called first.

Action

See Reporting Error Code Problems to Novell.


-345  FFFFFFEA7  INVALID DS VERSION

Action

See Reporting Error Code Problems to Novell.


-346  FFFFFFEA6  UNICODE TRANSLATION

Explanation

A Unicode** translation error occurred. This is probably an internal program error.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-347  FFFFFFEAS  SCHEMA NAME TOO LONG

Explanation

This error probably occurred when the user tried to create a new class of object with a class name that exceeded 32 characters.

Action

See Reporting Error Code Problems to Novell.


-348  FFFFFFEA4  UNICODE FILE NOT FOUND

Explanation

The Unicode** file could not be found in the defined search algorithm.

The file extension shown in parentheses represents the country code the workstation is using, which is set in CONFIG.SYS. For example, *.001 is US English. The country code may be different from the one shown here.

In the DOS, Windows, and OS/2 environments, the program searches the following areas for the Unicode files:

The current directory (for DOS and OS/2 environments) or the Windows directory.

The load directory (the directory containing the current utility’s .EXE file). Normally this will be the PUBLIC directory.

The NLS directory that is located within the load directory (the directory containing the current utility’s .EXE file). If the Unicode files are not found in the NLS directory within the load directory, the program searches the NLS directory that is a sibling of the load directory (that is, at the same level as the load directory). Note: The NWLanguage environment variable does not apply here.

The PATH and DPATH (for OS/2 only) environment variables. These environment variables may be found either in the user’s login script or in the AUTOEXEC.BAT file.

The following four files must be in one of these locations of the user’s search drive, or this error message is displayed:

code_page_UNI. country_id

UNI_code_page.country_id

UNI_MON.country_id

UNI_COL.country_id

Action

Make sure that these four files are loaded into the PUBLIC directory and that you have a search drive mapped to PUBLIC; then try the operation again. If you have a search drive mapped to PUBLIC and the files still cannot be found there or in any other locations listed, use the NPATH utility to determine the Unicode files required for the workstation and their location. If the problem persists, contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-349  FFFFFFEA3  UNICODE ALREADY LOADED

Explanation

The Unicode** tables were already loaded when the program tried to load them again.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-350  FFFFFFEA2  NOT CONTEXT OWNER

Action

See Reporting Error Code Problems to Novell.


-351  FFFFFFEA1  ATTEMPT TO AUTHENTICATE 0

Action

See Reporting Error Code Problems to Novell.


-352  FFFFFFEA0  NO WRITABLE REPLICAS

Explanation

On logout, the server logged out of the monitor connection. Subsequently, the program tried and failed to find a writable replica of that monitor connection's partition.

Action

See Reporting Error Code Problems to Novell.


-353  FFFFFFE9F  DN TOO LONG

Explanation

The name passed in exceeded 256 characters.

Action

See Reporting Error Code Problems to Novell.


-354  FFFFFFE9E  RENAME NOT ALLOWED

Explanation

An attempt was made to move an object to the same place in the Directory tree that it already occupies.

Action

See Reporting Error Code Problems to Novell.


-489  FFFFFFE17  UNI ALREADY LOADED

Explanation

When an application tried to load the Unicode** tables, they were already loaded.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-490  FFFFFFE16  UNI  FUTURE OPCODE

Explanation

The Unicode** rule table has unimplimented rules.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-491  FFFFFFE15  UNI NO SUCH FILE

Explanation

No such Unicode** file or directory exists.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-492  FFFFFFE14  UNI TOO MANY FILES

Explanation

Too many Unicode** files are already open.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-493  FFFFFFE13  UNI NO PERMISSION

Explanation

An attempt was made to open a Unicode** file to which the user does not have sufficient rights.

Action

If appropriate, give the user the rights necessary to open the Unicode files.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-494  FFFFFFE12  UNI NO MEMORY

Explanation

The workstation does not have enough memory to load the Unicode** table files.

Action

Increase the memory available to the workstation. See "Resolving Workstation Memory Problems" in Supervising the Network.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-495  FFFFFFE11  UNI LOAD FAILED

Explanation

An attempt to load the Unicode** rule table files failed.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-496  FFFFFFE10  UNI HANDLE BAD

Explanation

An attempt was made to use the Unicode** Rule tables, but its handle was bad.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-497  FFFFFFE0F  UNI HANDLE MISMATCH

Explanation

The handle for the rule table does not the match operation being attempted.

Action

See Reporting Error Code Problems to Novell.


-498  FFFFFFE0E  UNI RULES CORRUPT

Explanation

The Unicode** Rule table files are not the correct version or they are corrupt.

Action

Obtain a new copy of the Unicode files. Then retry the operation.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-499  FFFFFFE0D  UNI NO DEFAULT

Explanation

A default directory for the Unicode** files does not exist.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-500  FFFFFFE0C  UNI INSUFFICIENT BUFFER

Explanation

The buffer is insufficient to load the Unicode** files.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-501  FFFFFFE0B  UNI OPEN FAILED

Explanation

The Unicode** table files could not be opened for an unknown reason.

Action

Try the following

Close files you do not need to have open at the present time.

Free up memory on the workstation. See "Resolving Workstation Memory Problems" in Supervising the Network.

Make sure the user has rights to access the directory where the Unicode table files are kept.

Make sure the directory where the Unicode files are kept is in the search path.

Make sure the Unicode files are the most current version and are not corrupted.

If after doing all the listed actions the problem still persists, contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-502  FFFFFFE0A  UNI NO LOAD DIR

Explanation

The load directory for the Unicode** file could not be determined.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-503  FFFFFFE09  UNI BAD FILE HANDLE

Explanation

The file handle is bad for the Unicode** files.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-504  FFFFFFE08  UNI READ FAILED
-504  FFFFFE08  UNI READ FAILED

Explanation

The files could not be read for the Unicode** rule table.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-505  FFFFFFE07  UNI TRANS CORRUPT
-505  FFFFFE07  UNI TRANS CORRUPT

Explanation

The translator is corrupt for the Unicode** files.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-601  FFFFFFDA7  NO SUCH ENTRY

Explanation

The object name entered could not be found in the context specified. The object name might be mistyped. The context for the workstation might be incorrect for the object being sought. The leading dots or trailing dots might be used incorrectly.

If this error displays while running DSTRACE on the server or while viewing Partition Continuity in NDS Manager, it usually means that an entry is missing from the entry record table on the source server.

It is common to get this error on a NetWare 4.0x server when trying to delete bindery-type objects through NetWare Administrator or the NetWare 4.02 version of NETADMIN.

Action

Client: Check the context specified for the object name entered. If the command line input was the object name, check the workstation's context. Make sure that it points to the correct level of the Directory tree for the object name specified. If the input includes the object's full or partial context, make sure that the leading and trailing dots are specified appropriately and the types are correct.

To delete bindery-type objects from a NetWare 4.0x server, use the NetWare 4.01 version of NETADMIN. In NetWare 4.1 (or later versions), you should not have to delete bindery-type objects.

You can use the Partition Continuity feature of NDS Manager to evaluate the partition for synchronization errors. NDS Manager has several repair functions that allow you to correct synchronization errors without having to run DSREPAIR from the server.

Note: Using the Send Updates option or the Receive Updates option might create high levels of network traffic.

If Partition Continuity shows no errors besides -601, use NDS Manager to send updates from a replica that does not have the error, or receive updates on the replica with the error. Send Updates and Receive Updates are available from the Tree view, the list of Partitions and Servers, and the Partition Continuity view in NDS Manager.

Server: Identify which object is returning the -601 error. To do this, set the SET DSTRACE=+SYNC command on both the source and the target server and on any other servers in the replica list.

If the object is not a server, try deleting it.

If the object with the error is a server object, see if DSTRACE returns any other errors besides -601. Address those errors, if any.

Note: Using the Send All Objects option or the Receive All Objects option might create high levels of network traffic.

If no additional errors are displayed, use the Send All Objects option or Receive All Objects option in DSREPAIR to update replicas of a partition on the servers holding replicas.


-602  FFFFFFDA6  NO SUCH VALUE

Explanation

The requested property value could not be found. If this error is encountered during the login or authentication process, this error usually means that the user's or the server's public keys could not be located. If this is the case, regenerate the user's key pair by changing the password with utilities.

An occurrence of this error during the synchronization process between servers means one of the public keys cannot be located or the replica lists of one of the servers contains inconsistent results. This error might be a temporary condition that exists due to the loosely consistent nature of Novell* Directory Services*.

Action

Determine whether the value exists for the specified attribute using NLIST.

If either of these messages is displayed without an error code, do the following action that is applicable to the error displayed: Error unable to communicate, or Error sending updates.

Error unable to communicate

Check to see if a problem exists with the object. To do this, use DSTRACE and the SET DSTRACE=+SYNC command.

This problem might be related to the public key or the remote ID number. Verify that all remote server ID numbers are valid.

To do this, run the Verify Remote Server IDs option from the Partition Continuity view in NDS Manager (on the client) or DSREPAIR (on the server).

If the -602 or -603 error codes are returned, rerun the Verify Remote Server IDs option.

If error codes -602 or -603 are returned again, contact an IntranetWare support provider for support.

Be aware, however, that a public key cannot be repaired unless there is at least one server in the tree authenticating to the target server. The server that is able to successfully authenticate to the target server must also have a real copy of the target server object.

This means that the server must have a replica (other than a subordinate reference replica) of the partition holding the target server object. If only two servers are in the tree, remove the target server from the tree and reinstall it.

Error sending updates

Check to see if a problem exists with the object. To do this, use DSTRACE and the SET DSTRACE=+SYNC command.

If an error exists, try deleting the object in question.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-603  FFFFFFDA5  NO SUCH ATTRIBUTE

Explanation

The requested attribute could not be found. In the Directory, if an attribute does not contain a value then the attribute does not exist for the specific object. The error occurs sometimes when users try to edit properties that are grayed out in the utilities. Properties that are grayed out are not supported by the current Directory Schema.

This error can also occur when problems with schema synchronization occur in a mixed tree (NetWare 4.0x and other NetWare* 4 servers in the same tree). This error is basically the same as a -602 error except that a -602 error is returned for a multi-valued property and a -603 is for a single-valued property.

Action

Client: Ensure that the attribute being requested is a valid NDS* attribute (check spelling and syntax). To determine whether the attribute exists for the specified object, use NLIST. For example, NLIST user=username /d will show all attributes and their values for the specified username.

To see all of the attributes associated with the object, you must have the Supervisor right to the object. The Browse right is given by default.

Server: If either of these messages is displayed without an error code, do the following action that is applicable to the error displayed: Error unable to communicate, or Error sending updates.

Error unable to communicate

Check to see if a problem exists with the object. To do this, use DSTRACE and the SET DSTRACE=+SYNC command.

This problem might be related to the public key or the remote ID number.

Verify that all remote server ID numbers are valid. To do this, run the Verify Remote Server IDs option from the Partition Continuity view in NDS Manager (on the client) or DSREPAIR (on the server).

If the -602 or -603 error codes are returned, rerun the Verify Remote Server IDs option.

If error codes -602 or -603 are returned again, contact an IntranetWare support provider for support.

Be aware, however, that a public key cannot be repaired unless there is at least one server in the tree authenticating to the target server. The server that is able to successfully authenticate to the target server must also have a real copy of the target server object. This means that the server must have a replica (other than a subordinate reference replica) of the partition holding the target server object. If only two servers are in the tree, remove the target server from the tree and reinstall it.

Error sending updates

Check to see if a problem exists with the object. To do this, use DSTRACE and the SET DSTRACE=+SYNC command.

If an error exists, try deleting the object in question.

If a mix of NetWare 4.x servers exists in the tree or if a NetWare 4.1 (or later version) server was installed then uninstalled in a NetWare 4.0x  tree, the problem might be caused by a schema problem. Run the Global Schema Update option in DSREPAIR on a NetWare 4.1 (or later version) server.

If no NetWare 4.1 (or later version) servers are installed in the tree, or if the Global Schema Update option does not fix the problem, shut down the server holding the master replica of the partition returning the error, and then bring it back up. Upon start-up, the server forces a schema update and this will usually correct a schema problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-604  FFFFFFDA4  NO SUCH CLASS

Explanation

A utility is trying to reference an object class that does not exist in the Directory. An NDS object class is similar to the bindery's object type. For example, object type 1 in the bindery is a user object. In NDS that object class is User. The class indicates the kind of entry to be created.

Action

NetWare 4.0x  utilities access only NetWare's base schema, which must be present for the Directory to operate. Determine what utility is being used to create the object. This utility is trying to use an object class that is currently not defined in the Directory database. NetWare 4.0x  utilities only display valid object classes.

NetWare 4.1 (or later versions) allows the schema to be extended, so this error in NetWare 4.1 (or later versions) might point to schema synchronization problems.


-605  FFFFFFDA3  NO SUCH PARTITION

Explanation

A partition with the specified name does not exist. A partition in the Directory is named by the root object of the specified partition. The very first partition in the Directory is (Root) named by the tree name, which appears at the top of the directory.

Action

Ensure that the partition name requested is valid and is a valid object name.


-606  FFFFFFDA2  ENTRY ALREADY EXISTS

Explanation

An attempt was made to add an object at the same level as a preexisting object of the same name but not necessarily the same class.

Action

Specify a different name for the object being added or rename the existing object.


-607  FFFFFFDA1  NOT EFFECTIVE CLASS

Explanation

This error indicates that a noneffective class is being used to create the specified entry.

Noneffective classes cannot be used to create an entry. Novell* Directory Services* (NDS) has two types of object classes: effective and noneffective. You can use all effective classes to create entries. (The base class of the object class is the class used to create the entry.) The class Users is one example of an effective class. You can use noneffective classes as super classes. These classes define information associated with various effective classes.

Action

The standard NetWare utilities that ship with NetWare 4.x  only allow effective classes to be used when creating objects. Find out what utility is being used to create the object. This utility is not following the rules of the specified object.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-608  FFFFFFDA0  ILLEGAL ATTRIBUTE

Explanation

An attempt was made to add an attribute that is illegal to an object. The Novell* Directory Services* (NDS) schema determines what attributes can be inherited by an object class. (Refer to the Novell Directory Services Schema documentation, if it is available.)

This error can also occur in a mixed tree environment where both NetWare 4.0x  and NetWare 4.1 (or later version) servers exist or in an upgraded tree that has servers with an incorrect schema.

Action

Client: Use the Partition Continuity feature of NDS* Manager to detect whether any partitions in your Directory tree are returning errors.

Server: To resolve the problem, do the following action that applies:

Check to see if a problem exists with the object. To do this, use DSTRACE and the SET DSTRACE=+SYNC command.

If an error exists, try deleting the object in question.

If the object that has errors is a Server object, use NDS Manager to delete it. To delete objects besides Server objects, use NetWare Administrator.

If the problem is only on one server, use NDS Manager and run the Receive Updates option on the server with the error.

If errors were detected on a Server object, try running the Repair Local Database option from the Partition Continuity view in NDS Manager to remove the illegal attribute from that server. You can also repair local database using DSREPAIR.

If a mix of NetWare 4.x  servers exists in the tree or if a NetWare 4.1 (or later version) server was installed and then uninstalled in a NetWare 4.0x  tree, the error code might be due to a schema problem. Run the Global Schema Update option in DSREPAIR on a NetWare 4.1 (or later version) server.

If no NetWare 4.1 (or later version) servers are installed in the tree, or if the Global Schema Update option does not fix the problem, shut down the server holding the master replica of the partition returning the error, and then bring it back up. Upon starting up, the server forces a schema update, and this will usually correct a schema problem.

If the problem persists, contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-609  FFFFFFD9F  MISSING MANDATORY

Explanation

One or more of the mandatory attributes for the object being created is missing. Each object class in the Directory has a set of mandatory attributes (attributes that must contain a value before the object can be created). For example, a User object in the Directory is required to have a Common Name (CN) and a Surname. Without these attributes, the object will not be created. An attribute exists only if there is a value specified for the given attribute.

This error can also occur in a mixed tree environment where both NetWare* 4.0x  and NetWare 4.1 (or later version) servers exist or in an upgraded tree that has servers with an incorrect schema.

Action

Client: You cannot add the specified attribute to the specified object.

Server: To solve the problem, do the action that applies:

Check to see if a problem exists with the object. To do this, use DSTRACE and the SET DSTRACE=+SYNC command.

If an error exists, try deleting the object in question.

If a mix of NetWare 4.x  servers exists in the tree, or if a NetWare 4.1 (or later version) server was installed and then uninstalled in a NetWare 4.0x  tree, the problem might be caused by a schema problem. Run the Global Schema Update option in DSREPAIR on a NetWare 4.1 (or later version) server.

If no NetWare 4.1 (or later version) servers are installed in the tree, or if the Global Schema Update option does not fix the problem, shut down the server holding the master replica of the partition returning the error, and then bring it back up. Upon starting up, the server forces a schema update, and this will usually correct a schema problem.

If the problem persists, contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-610  FFFFFFD9E  ILLEGAL DS NAME

Explanation

Illegal NDS name. Illegal Directory names are those which are too long (more than 255 characters) or contain illegal character combinations. The "\" character can only be followed by

.

=

+

\

Action

Avoid using illegal characters or reduce the number of characters in the object's name.


-611  FFFFFFD9D  ILLEGAL CONTAINMENT

Explanation

The containment rules of the Directory specify where an object class might appear in relation to other objects in the Directory tree. An attempt to create an object violated these containment rules. For example, the object class Country can only be created at the top of the Directory, the object class User can only be created under Organization object containers and Organizational Unit object containers. The Schema enforces the containment rules for Novell* Directory Services* (NDS).

This error might appear in NDS* Manager when moving a partition.

Action

Go to the appropriate container to create the object.

If the error occurs when moving a partition, check the containment rules for the partition root object.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-612  FFFFFFD9C  CANT HAVE MULTIPLE VALUES

Explanation

The specified property is single valued. All properties are single or multi-valued. For example, the Group Membership property is multi-valued. A user can be a member of multiple groups. The Group Membership property exists once and contains multiple group names (values).

Action

For this property (information category in the utility) only one value (piece of information) can be supplied.


-613  FFFFFFD9B  SYNTAX VIOLATION

Explanation

This error occurs most often when an attribute value being added to an object is incorrect or when the value is pointing to an object that does not exist in the tree.

Action

Client: Verify that the object name being added as a value is correct.

Explanation

The error might also occur when a bindery-type object (usually created by a third-party program) becomes corrupt.

Action

If the -613 errors are on these types of objects, delete all objects created by the program, and then reinstall the program.

Explanation

This error is also seen during the install or upgrade to NetWare* 4.1 (or later versions).

Action

Client: If you are installing or upgrading to NetWare 4.1 (or later versions), run Partition Continuity in NDS Manager to view any synchronization errors on the partition that you are installing the server into. Using NDS Manager, run Repair Local Database on the server holding the master replica of the partition.

Server: If a new NetWare 4.1 (or later version) server hangs during installation while copying over the existing Directory objects, run DSTRACE on the server holding the master replica of the partition that you are installing the server into, by setting the SET DSTRACE=+SYNC command.

If an error exists, run DSREPAIR on the master.

If the problem still exists, run the SET DSTRACE=+SYNC command to find the object returning the error and check the description field (and any other field which accepts a string) for any unusual ASCII characters. Correct the corruption or delete the object, and the replica should complete copying to the new server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-614  FFFFFFD9A  DUPLICATE VALUE

Explanation

An attempt was made to add a duplicate value to the specified property.

Action

Enter a different value.


-615  FFFFFFD99  ATTRIBUTE ALREADY EXISTS

Explanation

An attempt was made to add an attribute that already exists.

Action

If the attribute is multi-valued, just add the specified value to the existing attribute.

If the attribute is single-valued, you will need to delete the attribute in order to create it again with the new value.


-616  FFFFFFD98  MAXIMUM ENTRIES EXIST

Explanation

The maximum entries (objects) exist in the Directory tree. The maximum number of objects that can be created in the Directory is FFFFFF (3 bits of FF), which equals 16,777,220 decimal.

Action

For the current version of the Directory, you have reached the maximum number of objects that can be created. To continue, delete objects that are no longer needed.


-617  FFFFFFD97  DATABASE FORMAT

Explanation

The database format is invalid.

Action

Client: From the Partition Continuity view in NDS* Manager, run Repair Local Database. If you run this option from the client, you might not need to run DSREPAIR from the server.

Server: Run DSREPAIR once. If this error persists after running DSREPAIR the first time, contact an IntranetWare* support provider.

Warning: By running DSREPAIR a second time, the original.OLD database files will be overwritten and it might not be possible to restore their former Directory Information Base (DIB).

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-618  FFFFFFD96  INCONSISTENT DATABASE

Explanation

The server has detected an inconsistent database. Usually this means that the number of entries in a container does not match the number stored in the container's entry. When this error occurs during synchronization, the target server has a corrupted database.

Action

From the Partition Continuity view in NDS* Manager, run Repair Local Database on the target server. If you would rather work from the server console, run DSREPAIR once.

Warning: By running DSREPAIR a second time, the original.OLD database files will be overwritten and it might not be possible to restore their former Directory Information Base (DIB).

If this error persists after running DSREPAIR the first time, contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-619  FFFFFFD95  INVALID COMPARISON

Explanation

An attempt was made to compare two properties that are not comparable or to use an invalid compare syntax.

Action

Check the syntax and verify that the properties are comparable.


-620  FFFFFFD94  COMPARISON FAILED

Explanation

A comparison of some kind failed.

Action

From the Partition Continuity view in NDS* Manager, run Repair Local Database on the target server. If you would rather work from the server console, run DSREPAIR once. If this error persists after running DSREPAIR the first time, contact an IntranetWare* support provider.

Warning: By running DSREPAIR a second time, the original.OLD database files will be overwritten and it might not be possible to restore their former Directory Information Base (DIB).

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-621  FFFFFFD93  TRANSACTIONS DISABLED

Explanation

This error indicates that Transaction Tracking (TTS) has been disabled for the server on which the Directory operation is taking place. When TTS is disabled, Directory operations that require modifying the database on that server are disabled as well.

Action

At the console prompt of the server, type "ENABLE TTS". If TTS was disabled because volume SYS: is full, log in to the server and delete unnecessary files from volume SYS:, and then type ENABLE TTS at the console.

If you are unable to log in to the file server, try running VREPAIR on volume SYS: and selecting the Purge Deleted Files option from the VREPAIR menu. If there still is not enough space, put another drive into the server and span the volume SYS: across both drives to give volume SYS: more space.


-622  FFFFFFD92  INVALID TRANSPORT

Explanation

The type of transport passed in to the server is not supported by the server.

Action

Select a supported transport type and retry the operation.


-623  FFFFFFD91  SYNTAX INVALID IN NAME

Explanation

The syntax for the name provided is invalid.

Action

Reenter the name with the correct syntax.


-624  FFFFFFD90  REPLICA ALREADY EXISTS

Explanation

A replica of the specified partition already exists on the server.

Action

Select a different server. It is recommended that a partition should have no more than seven or eight replicas.


-625  FFFFFFD8F  TRANSPORT FAILURE

Explanation

The server is unable to communicate across the network. This error is almost always LAN-related.

This error usually occurs for one or more of the following reasons:

A server is down.

A bridge or other physical connection is down between servers.

A server cannot be found.

Occasionally the error might occur for one of the following reasons:.

A change to the server's name

A move of the server's object

A change to the internal IPX number

This error might also be seen when trying to communicate with servers that have databases that are locked by utilities such as NDS Manager, Install Maintenance Mode DSDUMP, or DSREPAIR.

Action

Perform some or all of the following actions until the error code disappears:

Check for SAP filtering of the DS SAP types of 26B and 278. Check cabling, the LAN card, and the LAN driver. Ensure that workstations can connect to the target server through RCONSOLE.

Ensure that the server can communicate with the target server. To verify whether they are communicating, type DISPLAY SERVERS on the source server.

Determine whether other servers are returning the -625 error for the same target server.

Ensure that the workstations can attach and log in to the target server from the same segment as the source server.

Flag all servers as UP by typing RESET ROUTERS, and then setting the SET DSTRACE=*U command at the source server. Then retry communicating with them.

At a client workstation, view the Partition Continuity screen in NDS Manager. If every source has an error on one target, and that target server is unable to connect as a source, check to see whether that server is down or whether its NDS database is locked.

Try to correct the internal IPX number on the target server.

To do this from a client workstation, select the source server in the Partition Continuity screen in NDS Manager. Then from the Repair menu, choose Repair Network Addresses.

To do this from the server, run DSREPAIR and select the Repair Network Addresses option on the source server.


-626  FFFFFFD8E  ALL REFERRALS FAILED

Explanation

The object could not be found. It is possible that the object exists, but the server could not communicate with the server holding a copy of the object. This error message is common when partition management is requested and events cannot occur because a server is inaccessible. This might be a temporary condition during partition functions.

Action

Perform all or some of the following actions until the error disappears:

From the Partition Continuity screen in NDS* Manager, run the Repair Network Addresses or Verify Remote Server IDs option. If you prefer to work from the server console, run the Repair Network Addresses option and Verify Remote Server ID Numbers option in DSREPAIR.

From the Partition Continuity screen in NDS Manager, verify that there is one master replica (in each row) for the partition in question.

Check the replica states and make sure they are all "ON."

Resolve whatever problems you find in the DSREPAIR.LOG file.

Run the DISPLAY SERVERS command and see whether the tree name is present. If not, check issues related to the -625 errors (including SAP filtering).

If creation time stamps are invalid, run the Check External References in NetWare* 4.1 (or later version) of DSREPAIR (under Advanced Option) to eliminate the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-627  FFFFFFD8D  CANT REMOVE NAMING VALUE

Explanation

An attempt was made to delete the naming property.

Action

Rename the object; then delete the property.


-628  FFFFFFD8C  OBJECT CLASS VIOLATION

Explanation

An object class violation has occurred. This violation might be caused by either of the following two reasons:

The objects on the source server are unknown but the object on the target server are correct.

A schema synchronization problem has occurred.

Action

If the error occurs when the objects on the source server are unknown but the objects on the target server are correct, do the following:

1.	Isolate the corrupted replica. You can do this by locking the databases with DSREPAIR, then running NETADMIN or NetWare* Administrator to view the objects.

2.	Make sure the master replica is not corrupted. If the master replica is not corrupted, delete the corrupted replica and add it back again using NDS* Manager.

If the master replica is corrupted, use NDS Manager to change the type of an uncorrupted replica to master (which automatically changes the old master to read/write).

If the error seems to be caused by a schema synchronization problem, do the following:

1.	Run the Global Schema Update option in DSREPAIR on a NetWare 4.1 (or later version) server.

2.	If no NetWare 4.1 (or later version) servers are in the tree, or if the Global Schema Update option does not fix the problem, shut down the server that has the master replica of the partition returning the error, and then bring it back up.

Upon starting up, the server will force a schema update, and the update will usually correct a schema problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-629  FFFFFFD8B  ENTRY IS NOT LEAF

Explanation

The object being deleted or modified is not a leaf object. A container object that does not contain any objects is considered a leaf object, and therefore can be deleted. If you attempt to delete a container object that contains an object of any class, the following error will be returned: The utility can't delete Object Class=Object_name because it is not a leaf object. A container object that is a partition root cannot be deleted.

Action

Delete all objects under the container object that is being deleted or modified. If the object is a partition root, merge the partition with the parent partition using NDS* Manager, and then delete the object using NetWare* Administrator.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-630  FFFFFFD8A  DIFFERENT TREE

Explanation

Different tree.

Action

Make sure you are performing operations on the correct Directory tree for the objects.


-631  FFFFFFD89  ILLEGAL REPLICA TYPE

Explanation

A replica needed to perform this function was not found. Typically you will receive this error when you attempt to set your bindery context at the server console and the server does not have a read/write replica of the container you are trying to reference in the bindery context.

Action

Use NDS Manager to add a replica that includes the bindery context to that server. Bindery context requires a writable replica (either a read/write or a master replica) in order to be set.

Verify that the server has a writable replica of the partition containing the container to which you are trying to set the bindery context.


-632  FFFFFFD88  SYSTEM FAILURE

Explanation

Unexpected results have occurred. For example, perhaps the client requested that the Directory return a network address attribute and the Directory actually returned a public key attribute. This condition might be temporary. While the client usually returns errors in the -301 to -399 range, the client as well as the server returns this error during the authentication process.

When a server returns a -632 during synchronization, it might occur because authentication could not complete due to an error in the public key, such as the key being corrupted (not the right format).

This error can also be returned by DSTRACE when the server is unable to open the local database. However, -632 is just a general error which means that the process being attempted failed. This also might be because the server or servers being contacted were busy or down, or because the source server could not authenticate to them.

After upgrading a server, the NDS* might be unable to open the database.

Action

Perform the following steps:

1.	From the client, use NDS Manager to view the Partition Continuity screen, or from the server set the SET DSTRACE=ON command, and then set the SET DSTRACE=+MISC command.

2.	Dismount and remount the volume SYS:.

3.	Check the DSTRACE screen and confirm that a -632 error is returned when NDS tries to open the database. If a -632 error is returned, the database is corrupted. Remove NDS from the server and reinstall from another replica in the tree or, if in a single server environment, from backup.

4.	Verify that all remote server ID numbers are valid. To do this, run the Verify Remote Server IDs option from the Partition Continuity view in NDS Manager (on the client) or DSREPAIR (on the server).

If the -602 or -603 error codes are returned, rerun the Verify Remote Server IDs option. If error codes -602 or -603 are returned again, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-633  FFFFFFD87  INVALID ENTRY FOR ROOT

Explanation

An attempt was made to restore or move an object that is flagged as a partition root, but whose base class is not a container, or perform a split at an object whose base class is not a container.

Action

From the client, use the Partition Continuity feature in NDS* Manager to run Repair Local Database. Or, from the server, run DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-634  FFFFFFD86  NO REFERRALS

Explanation

The target server does not have a copy of what the source server is requesting. In other words, the source server has no objects that match the request and has no referrals on which to search for the object.

Action

This is not a serious error; it is just a response. This error will usually resolve itself.


-635  FFFFFFD85  REMOTE FAILURE

Explanation

This error might be caused because

The target server does not have the correct information about the source server. Not having the correct information is often caused by a problem with local to remote ID numbers or the Server object.

The source server is unable to contact another server needed to complete the operation for reason such as, a link or server being down.

For example, if you do a Receive Updates in DSREPAIR and the server with the master replica is down, this error will be returned.

Action

If you suspect that the target server does not have the correct information, do the following:

Verify that all remote server ID numbers are valid. To do this, run the Verify Remote Server IDs option from the Partition Continuity view in NDS* Manager (on the client) or DSREPAIR (on the server).

If the -602 or -603 error codes are returned, rerun the Verify Remote Server IDs option.

If error codes -602 or -603 are returned again, contact an IntranetWare* support provider.

If you suspect that the source server is unable to contact another server needed to complete the operation, do the following:

Check for and resolve all  -625 errors first.

Make sure all servers needed to complete an operation are up and communicating to each other.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-636  FFFFFFD84  UNREACHABLE SERVER

Explanation

The server is unreachable. This error is almost always LAN-related. Occasionally a change of the server's name, a move of the server object, or a change to the internal IPX number can also cause this error. This error might also be seen when trying to communicate with servers that have databases that are locked utilities such as DSDUMP, DSMAINT, or DSREPAIR.

Action

Perform some or all of the following actions until the error codes disappear:

Check for SAP filtering of the DS SAP types of 26B and 278. Check cabling, the LAN card, and the LAN driver. Ensure that workstations can RCONSOLE to the target server.

Check to see whether the server can communicate with the target server. To do this, type DISPLAY SERVERS on the source server.

Determine whether other servers are returning the -625 error for the same target server.

Ensure that workstations can attach and log in to the target server from the same segment as the source server.

Flag all servers as UP by typing RESET ROUTERS, and then setting the SET DSTRACE=*U command at the source server. Then retry communicating with them.

Check the internal IPX number of the target server. To do this, run DSREPAIR with the option to repair network addresses on the source server.


-637  FFFFFFD83  PREVIOUS MOVE IN PROGRESS

Explanation

After an object has been moved from one context in the Directory tree to another, the Directory database will not allow that object to be moved again until all replicas of that object have been updated. The length of time to complete all the updates will vary depending on the size of the replica, the number of replicas, and the condition of the communication links between all the servers holding the replicas.

This error can also be caused by a moved object that lost the original object (the primary obituary) or by a broken partition.

Action

Try one or more of the following actions:

Leave the object in its current context until it can be moved again. This might require that the object be left in its new context for several minutes or hours.

If the object still cannot be moved after 24 or more hours, try the following:

For NetWare* 4.1 (or later version), load DSREPAIR ( version 4.45 or later) with the "-m" parameter. Then from the Advanced Options menu, run the Repair Local Database option.

For NetWare 4.0x  DSREPAIR, use the LOAD DSREPAIR -A command, then choose Select Options. Toggle A until it reads Find obituaries for move and move-inhibit.

Check for obituaries that are not progressing. View the DSREPAIR.LOG file, which will display objects that have moved obituaries. Or, display a detailed list of all obituaries by clicking the Check External References option from the Advanced Options menu. If you suspect that the obituaries are not progressing, contact an IntranetWare support provider.

Verify that the purger ran successfully. To do this, use SET DSTRACE=+J and SET DSTRACE=*F commands.

For additional troubleshooting strategies, consult an IntranetWare support provider or the Novell* Knowledge Base at the Novell Support Connection* Web site.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-638  FFFFFFD82  NO CHARACTER MAPPING

Explanation

No characters are mapped.

Action

Retry the operation, or contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-639  FFFFFFD81  INCOMPLETE AUTHENTICATION

Explanation

Authentication was incomplete.

Action

Retry the operation, or contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-640  FFFFFFD80  INVALID CERTIFICATE

Explanation

The server did not understand the request. For example, a request sent by a client workstation could be incorrect. This error can be caused by a non-synchronized schema.

Action

Run the Global Schema Update option in the NetWare* 4.1 (or later version) DSREPAIR. This error can also be a response error. Check for errors on the target server first, and resolve any errors you find.


-641  FFFFFFD7F  INVALID REQUEST

Explanation

The server did not understand the request. For example, a client workstation could have sent an incorrect call. This error could also be a response error or be caused by a non-synchronized schema.

Action

If a reponse error is suspected, check for errors on the target server first, and resolve any errors you find.

If a non-synchronized schema is suspected, run the Global Schema Update option in the NetWare* 4.1 (or later version) DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-642  FFFFFFD7E  INVALID ITERATION

Explanation

A client workstation sent an invalid iteration handle.

Action

See Reporting Error Code Problems to Novell.


-643  FFFFFFD7D  SCHEMA IS NONREMOVABLE

Explanation

An attempt was made to delete a Novell* Directory Services* (NDS) structure or configuration.

Action

First delete the object or property; then delete the structure. If the error persists, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-644  FFFFFFD7C  SCHEMA IS IN USE

Explanation

An attempt was made to delete a Novell* Directory Services* (NDS) configuration or structure (such as a container object) that still contains an object using that structure.

Action

First delete the object or property; then delete the structure.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-645  FFFFFFD7B  CLASS ALREADY EXISTS

Explanation

This error indicates that the object class being created already exists as a class in the schema of the Directory. See also error code -604.

Action

This error should only occur in a utility that updates the schema of the Directory database.

Determine which utility is causing the error.


-646  FFFFFFD7A  BAD NAMING ATTRIBUTES

Explanation

Invalid naming attributes were used.

Action

Use a different set of characters. If the error persists, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-647  FFFFFFD79  NOT ROOT PARTITION

Explanation

An attempt was made to execute a function that is required on the root partition. The client did not pass in the root partition name, or the client tried to perform the function somewhere besides the root partition.

Action

Retry the operation. If the error persists, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-648  FFFFFFD78  INSUFFICIENT STACK

Explanation

The server stack was not large enough.

Action

Increase the stack size on the server in question.


-649  FFFFFFD77  INSUFFICIENT BUFFER

Explanation

The server ran out of memory. The operating system will self-correct this error.

Action

Wait for the operating system to self-correct the error. See "Resolving Server Memory Problems" in Supervising the Network.


-650  FFFFFFD76  AMBIGUOUS CONTAINMENT

Explanation

An attempt was made to create an NDS* definition for a class that contained an ambiguous containment rule. This error can be caused by a non-synchronized schema. This error can also be a response error.

Action

Check for errors on the target server first, and resolve any errors found. If the error still occurs, run the Global Schema Update option in the NetWare* 4.1 (or later version) of DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-651  FFFFFFD75  AMBIGUOUS NAMING

Explanation

An attempt was made to create an NDS* definition for a class that contained an ambiguous containment name. This error can be a response error. This error can also be caused by a non-synchronized schema.

Action

Check for errors on the target server first, and resolve any errors found. If the error still occurs, run the Global Schema Update option in the NetWare* 4.1 (or later version) of DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-652  FFFFFFD74  DUPLICATE MANDATORY

Explanation

An attempt was made to create an NDS* definition for a class that contained a duplicate mandatory name. This error can be a response error. This error can also be caused by a non-synchronized schema.

Action

Check for errors on the target server first, and resolve any errors found. If the error still occurs, run the Global Schema Update option in the NetWare* 4.1 (or later version) of DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-653  FFFFFFD73  DUPLICATE OPTIONAL

Explanation

An attempt was made to create an NDS* definition for a class that contained a duplicate optional name. This error can be a response error. This error can also be caused by a non-synchronized schema.

Action

Check for errors on the target server first, and resolve any errors found. If the error still occurs, run the Global Schema Update option in the NetWare* 4.1 (or later version) of DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-654  FFFFFFD72  PARTITION BUSY

Explanation

Another partition operation is currently taking place. For example, if a request has previously been issued to split a partition, a second request for a split (even at another point in the same partition) will result in this error.

Action

Wait. This is a normal error immediately after a partition operation has been initiated.

If this error persists, check to see whether this error indicates that the target server does not recognize a replica of the partition on the source server.

Confirm this through the Partition Continuity screen of NDS* Manager, or through the DSREPAIR.LOG, or by watching DSTRACE.

If the partition remains busy for more than a few hours, try running PTEST on NetWare* 4.x  servers. Or on NetWare 4.1 (or later version) servers, abort the partition operation on the source server by choosing the Abort Partition Operation option in NDS Manager.

You can also remove the source server from the tree, or contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-655  FFFFFFD71  MULTIPLE REPLICAS

Explanation

This is an internal error that appears as a result of a programming error, and not as a system inconsistency.

Action

Retry the operation. If the error persists, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-656  FFFFFFD70  CRUCIAL REPLICA

Explanation

An attempt was made to perform one of the following illegal operations on a master replica:

Remove the master replica

Change the master replica's replica type (This operation can be done only by changing the replica type of another server's replica to the master, which will indirectly force the master to become a read/write.)

Request that the master replica receive all updates from the master

This error can also be caused by trying to add a replica to the server where the master of that replica already exists.

Action

Retry the operation. If the error persists, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-657  FFFFFFD6F  SCHEMA SYNC IN PROGRESS

Explanation

The function could not be completed because Directory synchronization is in progress.

Action

Wait for synchronization to complete and try again.


-658  FFFFFFD6E  SKULK IN PROGRESS

Explanation

The function could not be completed because replica synchronization is in progress.

Action

Wait for synchronization to complete and try again.


-659  FFFFFFD6D  TIME NOT SYNCHRONIZED

Explanation

Novell* Directory Services* uses time stamps to determine the order of events that take place in the Directory. Time Synchronization services have been implemented to maintain a consistent time across the network.

Modification operations require the issuance of a time stamp. If a replica on a server has issued a time stamp and the time on that server is set back, in NetWare 4.0x  no further modification operations can take place until the time on the server moves past the last modification time on the partition. This applies only to operations that modify, not those that just read information. In other words, users will be able to log in to the Directory tree, but no objects can be edited through the utilities.

In NetWare 4.1 (or later versions), the Directory database issues synthetic time stamps on objects to allow them to be modified, yet will still not allow illegal time stamps. The server console will display a synthetic time error when the server time is behind the NDS time.

Action

Warning: If the master copy was corrupt in any way, that corruption will be dispersed to the other replicas when a Repair Time Stamps or Receive Updates action is performed Repair Time Stamps and Receive Updates can also cause considerable traffic on the network. You might have to do this on a partition by partition basis.

Check DSTRACE for other errors first and resolve any errors you find. Then use the Repair Time stamps option in DSREPAIR. This option resets the time stamps to the current server time.

You can also use NDS Manager to perform Receive Updates on the server with the problem. This will delete all objects on the target server and recreate them from the master.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-660  FFFFFFD6C  RECORD IN USE

Explanation

The requested record is already in use.

Action

Wait a until the record is available and try again.


-661  FFFFFFD6B  DS VOLUME NOT MOUNTED

Explanation

The Novell* Directory Services* (NDS) volume is not mounted.

Action

Mount the volume SYS:, and retry the operation.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-662  FFFFFFD6A  DS VOLUME IO FAILURE

Explanation

An I/O failure occurred on the Novell* Directory Services* (NDS) volume.

Action

Identify the source of the problem; then retry the operation.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-663  FFFFFFD69  DS LOCKED

Explanation

The Directory database is locked on the server. This error will be seen in DSTRACE when the source server is trying to synchronize with a target server that has a locked database.

On the server with the locked database, no activity will be in the DSTRACE screen.

This error occurs when

DSREPAIR is loaded on the on the server is performing an operation that has locked the Directory database.

DSDUMP has the Directory database locked.

The hard drive on the server is starting to fail.

A new 4.02 server install does not complete properly.

The server receives an error trying to open the Directory when mounting the volume SYS:.

Action

From the client, check to see whether DSREPAIR is loaded by going to the Partition Continuity screen in NDS Manager. From the Partition Continuity screen, run Repair Local Database.  At this point, if DSREPAIR is loaded, Partition Continuity will ask whether you want to unload DSREPAIR to perform the Repair Local Database option.

If DSREPAIR is not loaded, load DSREPAIR. If DSREPAIR is loaded, run the Repair Local Database option once. If the error persists after running DSREPAIR the first time, contact an IntranetWare support provider. If Repair Local Database is run a second time, the original.OLD database files will be overwritten and it might not be possible to restore their former Directory Information Base (DIB).

If running Repair Local Database does not fix the problem, try bringing down the server and bringing it back up again. If running Repair Local Database and bringing down the server do not fix this error, the server might need to be removed from the tree.

If this is a new server with no replicas on it, remove NDS from the server. If you do not want to remove NDS from the server, contact an IntranetWare support provider for alternative solutions.

Warning: If you remove NDS from a NetWare 4.01 server, you will lose trustee assignments. The trustee assignments are backed up for a NetWare 4.02 or NetWare 4.1 (or later version) server during removal of NDS.

When NDS is locked, the normal removal of NDS on a NetWare 4.02 server might not complete properly. You might need to load INSTALL with the -DSREMOVE switch, and then try to remove NDS through INSTALL.

Using the -DSREMOVE switch will most likely return an error stating that it was unable to remove NDS, but the removal will be performed anyway. To verify that the removal was performed, load INSTALL using the -DSREMOVE switch again and try removing NDS a second time. The DSI module should report that NDS was already removed from the server.

Warning: Do not use the -DSREMOVE switch unless the normal removal process does not work. The -DSREMOVE switch ignores errors and warnings and might not perform all the steps necessary to do a clean removal.

Warning: If you remove NDS from a NetWare 4.01 server, you will lose trustee assignments. The trustee assignments are backed up for a NetWare 4.02 or NetWare 4.1 (or later version) server during removal of NDS.


-664  FFFFFFD68  OLD EPOCH

Explanation

A Novell* Directory Services* (NDS) time stamp error has occurred. It occurs when the Creation Time attribute for a given partition is not updated with the new, correct time.

An epoch is another name for partition.

Action

Repair the Local Database.

Two ways to do this are

From the Partition Continuity screen in NDS* Manager, run the Repair Local Database option.

From the server console, run DSREPAIR.


-665  FFFFFFD67  NEW EPOCH

Explanation

This is a Novell* Directory Services* (NDS) time stamp error. It occurs when the Creation Time attribute for a given partition is not updated with the new, correct time.

An epoch is another name for partition.

Action

Repair the Local Database.

Two ways to do this are

From the Partition Continuity screen in NDS Manager, run the Repair Local Database option.

From the server console, run DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-666  FFFFFFD66  INCOMPATIBLE DS VERSION

Explanation

This error might occur if

You are performing operations requiring the same schema and the servers involved have dissimilar schema.

For example, when a partition operation is requested, NDS* Manager returns this error if the server with the master replica is running NetWare* 4.1 (or later versions) while other servers in the replica list are running NetWare 4.0x. Servers holding subordinate reference replicas with a dissimilar schema also generate this error.

Important: The version of Novell Directory Services* (NDS) that shipped with NetWare 4.11 will not synchronize with NDS versions before 4.89.

NDS synchronization has been restricted using the Set NDS Synchronization Restrictions parameter at the server.

When running DSREPAIR for NetWare 4.1 (or later versions) and a remote to local ID check is being done.

Action

If the server holding the master replica is a NetWare 4.1 (or later version) server, most partition operations that involve updating replicas on NetWare 4.0x servers cannot be completed.

To be able to complete the partition operations, upgrade the NetWare 4.0x servers in the replica list to NetWare 4.1 (or later versions).

Note: If the master replica is on a NetWare 4.02 server, you will not have this problem.

If this error is seen in DSREPAIR during a remote to local ID check, perform the SET DSTRACE=!V command on the NetWare 4.1 (or later version) server. This resets a list that is maintained for restricting use of certain versions of NDS.

Make sure the SET NDS Synchronization Restrictions parameter has been used as explained in the "Novell  Directory Services Parameters" section of Utilities Reference.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-667  FFFFFFD65  PARTITION ROOT

Explanation

This error indicates that the object being manipulated is the root of a Directory Services partition.

This error most commonly appears when trying to delete a container object that is a partition root.

This error might also occur during synchronization when a subordinate reference replica should exist and does not, or should not exist and does, or when a server has an incorrect partition entry.

Action

Although you cannot delete a container object that is a partition root, you can use NDS Manager to merge the partition into the parent partition.

If a subordinate reference replica exists when it should not, then from the Partition Continuity screen in NDS Manager, run the Repair Local Database option.


-668  FFFFFFD64  ENTRY NOT CONTAINER

Explanation

An illegal function was attempted on a leaf object.

Action

Retry the operation with legal functions.


-669  FFFFFFD63  FAILED AUTHENTICATION

Explanation

An invalid password was used or authentication failed. This error also occurs when one server tries to synchronize with another one and the target server's database is locked. This error commonly occurs when problems exist with the remote ID or the public key.

Action

Run the Verify Remote Server IDs option from the Partition Continuity screen in NDS* Manager, or from the server console using DSREPAIR, on the source server and all other servers in the replica list. If errors occur in the DSREPAIR.LOG file, rerun the Verify Remote Server IDs option in NDS Manager or DSREPAIR on every server in the replica list. This should correct a problem with the remote ID being incorrect.

The other scenario is when the source server is using or looking at the wrong public key (the key is the right format, but is for the wrong object). If the problem is the public key, then do one of the following:

If the source server has a master replica, read/write replica, or read-only replica of the target server object, then ensure that all other servers in the replica list are able to authenticate to the target server.

Note: Using the Send All Objects option generates a high level of network traffic.

If another server can authenticate, then do a Send All Objects from the correct server, or Receive All Objects on the target server (but only if the server with the correct copy has the master replica).

Make sure that you do not send copies containing incorrect public keys.

If no servers can authenticate to the target server, remove NDS from the target server and reinstall it back into the tree, or contact an IntranetWare* support provider.

If the source server has a subordinate reference replica, or if no replica of the partition containing the target server object exists, then the external reference to that object needs to be backlinked again. Contact an IntranetWare support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-670  FFFFFFD62  INVALID CONTEXT

Explanation

An invalid context was used to reference an object.

Action

Determine the appropriate context for the object, and retry the operation.


-671  FFFFFFD61  NO SUCH PARENT

Explanation

A parent object was specified that does not exist.

Action

Run DSREPAIR. If the error persists, contact an IntranetWare* support provider.


-672  FFFFFFD60  NO ACCESS

Explanation

The client does not have sufficient rights to complete the requested operation. For servers, this error in DSTRACE means that the replica list for the target server does not match the replica list for the source server.

Action

Compare the replica ring information for all the servers in the replica list by viewing the Partition Continuity of the partition in NDS* Manager. Or, from the server console, use the Display Replica Information option in DSREPAIR.

If you confirm that the target server does not have the source server in its replica list, then remove NDS from the target server, or contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-673  FFFFFFD5F  REPLICA NOT ON

Explanation

The replica has an operation in progress and is in an intermediate state. Until all the object information has been received on that server, the replica is not on, meaning that the replica is not available to Directory clients.

Action

Wait. If the replica does not appear to be completing the operation, identify the error that is preventing the replica from turning "ON," and then correct that error. Or contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-674  FFFFFFD5E  INVALID NAME SERVICE

Explanation

Novell* Directory Services* (NDS) does not support the name server that you are using. This is an internal error caused by the client's management of the context.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-675  FFFFFFD5D  INVALID TASK

Explanation

An invalid NDS operation was performed. This is an internal error caused by the client's management of the context.

Action

See Reporting Error Code Problems to Novell.


-676  FFFFFFD5C  INVALID CONN HANDLE

Explanation

An invalid CONN handle was issued. This is an internal error caused by the client's management of the context.

Action

See Reporting Error Code Problems to Novell.


-677  FFFFFFD5B  INVALID IDENTITY

Explanation

An invalid object identity was received. This is an internal error caused by the client's management of the context.

Action

See Reporting Error Code Problems to Novell.


-678  FFFFFFD5A  DUPLICATE ACL

Explanation

An ACL for the object already exists. This usually happens only while merging a tree. The error indicates that the context is invalid.

Action

Open and close the Directory database. The error should resolve itself.


-679  FFFFFFD59  PARTITION ALREADY EXISTS

Explanation

An attempt was made to create a partition that already exists.

Action

Create a new partition with a different name.


-680  FFFFFFD58  TRANSPORT MODIFIED

Explanation

An attempt was made to use a reference that is not a subordinate reference.

Action

See Reporting Error Code Problems to Novell.


-681  FFFFFFD57  ALIAS OF AN ALIAS

Explanation

An attempt was made to use an alias of an alias.

Action

Identify the target object and create a new Alias object.


-682  FFFFFFD56  AUDITING FAILED

Explanation

The auditing function failed.

Action

See Reporting Error Code Problems to Novell.


-683  FFFFFFD55  INVALID API VERSION

Explanation

An invalid application API is being used.

Action

Update software to conform with the latest API set.


-684  FFFFFFD54  SECURE NCP VIOLATION

Explanation

An attempt was made to forge an NCP packet signature on a server that has packet signing ON. The server expected to receive a signed packet from a client and did not receive one.

Action

Identify the application that is submitting the packet and disable the application.


-685  FFFFFFD53  MOVE IN PROGRESS

Explanation

The replica is in the process of being moved to another server. Until all the object information has been received on that server, the replica is locked.

Action

Wait. If the replica does not appear to be completing the operation, identify the error that is preventing the replica from completing the "move" operation, and then correct that error. Or contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-686  FFFFFFD52  NOT LEAF PARTITION

Explanation

A subtree can be moved only if it is a leaf partition.

Action

Using the Tree View in NDS* Manager, make sure no partitions are subordinate to the one being moved. If subordinate partitions are in the tree, use NDS Manger to merge them with the partition you want to move. The partitions can be made subordinate partitions again after the Move Partition operation is complete.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-687  FFFFFFD51  CANNOT ABORT

Explanation

This error occurs when you try to abort one of the following options:

Changing the replica type when the state of the replica does not display in NDS Manager (or DSTRACE) that the replica type is changing or that the change is not in an initial state.

Splitting a partition when the state of the replica does not display in NDS Manager (or DSTRACE) that the partition is splitting or that the split is not in an initial state.

Joining partitions when the state of the parent partition does not display in NDS Manager (or DSTRACE) that the partition is in the joining state with the partition in the request.

Moving a subtree when the move has proceeded past the initial move subtree state.

Action

Wait for the operation to complete. Then reverse the operation.


-688  FFFFFFD50  CACHE OVERFLOW

Explanation

A cache overflow was experienced on the target server.

Action

See Reporting Error Code Problems to Novell.


-689  FFFFFFD4F  INVALID SUBORDINATE COUNT

Explanation

This error indicates an inconsistent entry.

Action

Client:

From the Partition Continuity screen in NDS Manager, run Repair Local Database.

Server:

From the server console, run DSREPAIR.


-690  FFFFFFD4E  INVALID RDN

Explanation

This error indicates an inconsistent entry.

Action

Client:

From the Partition Continuity screen in NDS* Manager, run the Repair Local Database option.

Server:

From the server console, run DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-691  FFFFFFD4D  MOD TIME NOT CURRENT

Explanation

This error indicates an inconsistent entry.

Action

Client:	From the Partition Continuity screen in NDS Manager, run Repair Local Database.

Server: From the server console, run DSREPAIR.


-692  FFFFFFD4C  INCORRECT BASE CLASS

Explanation

This error indicates an inconsistent entry.

Action

From the Partition Continuity screen in NDS Manager, run the Repair Local Database option. Or, from the server console, run DSREPAIR.


-693  FFFFFFD4B  MISSING REFERENCE

Explanation

A required reference is missing from the object. This error is frequently seen in the NetWare* 4.1 (or later version) utilities when trying to delete an object with a creation time stamp value of zero.

Action

From the Partition Continuity screen in NDS* Manager, run the Repair Local Database option. Or, from the server console, run DSREPAIR.

This will give objects with missing creation time stamps a valid time stamp. If the object continues to give a -693 error during deletion, then there is still a server in that partition's replica list with a creation time stamp of zero for that object. Run Repair Local Database in NDS Manager, or from the server console, run DSREPAIR on each server in that partition's replica list.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-694  FFFFFFD4A  LOST ENTRY

Explanation

Novell* Directory Services* (NDS) cannot update an entry that has not yet been received as a new entry.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-695  FFFFFFD49  AGENT ALREADY REGISTERED

Explanation

NDS cannot update an entry that has not yet been received as a new entry.

Action

See Reporting Error Code Problems to Novell.


-696  FFFFFFD48  DS LOADER BUSY

Explanation

NDS cannot update an entry that has not yet been received as a new entry.

Action

See Reporting Error Code Problems to Novell.


-697  FFFFFFD47  DS CANNOT RELOAD

Explanation

The DS.NLM program cannot reload on the target server, possibly because there is not enough memory on the server.

Action

If this error occurs while performing NDS Version Update in NDS* Manager, do the following:

1.	Make a backup of SYS:SYSTEM.

2.	Copy a new DS.NLM program to the SYS:SYSTEM directory.

3.	Unload and reload DS.NLM program.

If the problem persists, contact an IntranetWare* support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-698  FFFFFFD46  REPLICA IN SKULK

Explanation

A server is currently synchronizing with another server in the replica ring. The replica is busy skulking and no other replica processes will be done until the skulk has completed.

Action

Usually this error will occur as a normal part of a partition operation and will resolve itself. If this error does not go away, check for other errors that might be preventing the partition operation from completing successfully. Remember that the master replica is controlling all partition operations.


-699  FFFFFFD45  FATAL

Explanation

An unrecoverable error has occurred and the operation cannot be completed. This error can be caused by a variety of problems.

Action

Go to the target server and look for a response TRACE error (turn off the DSTRACE filters by using a setting like FFFF6FF7 or 8164B19 in NetWare* 4.0x or an 8164b91 in NetWare 4.1 or later versions).

Sometimes you will see an error without an error code (such as "skulk lost entry") that can also be important. Resolve the error on the target server. Treat a "skulk lost entry" error the same as a -601 error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-700  FFFFFFD44  OBSOLETE API

Explanation

The client made a request that is no longer supported by Novell* Directory Services* (NDS).

Action

Obtain an updated version of the program that is compatible with the current version of NDS*.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-701  FFFFFFD43  SYNCHRONIZATION DISABLED

Explanation

Schema synchronization has been disabled by an API (or DSTRACE = !S0) call.

Action

Enable schema synchronization through the API or by using the command, SET DSTRACE = !S1.


-702  FFFFFFD42  INVALID PARAMETER

Explanation

An invalid parameter was passed to an internal Novell* Directory Services* (NDS) function.

Action

Retry the operation.

If it fails again, the Directory Information Base (DIB) might be corrupted. In this case, from the Partition Continuity screen in NDS* Manager, run the Repair Local Database option. Or, from the server console, run DSREPAIR.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-703  FFFFFFD41  DUPLICATE TEMPLATE

Explanation

A server using NDS 4.02 or earlier versions might have tried to synchronize duplicate ACL templates.

Action

See Reporting Error Code Problems to Novell.


-704  FFFFFFD40  NO MASTER REPLICA

Explanation

This message is currently not used.

Action

See Reporting Error Code Problems to Novell.


-705  FFFFFFD3F  DUPLICATE CONTAINMENT

Explanation

Schema synchronization from a server with NDS 4.02 or earlier might have tried to add containment for a class that already exists.

Action

See Reporting Error Code Problems to Novell.


-706  FFFFFFD3E  NOT SIBLING

Explanation

Novell* Directory Services* (NDS) tried to merge two entries that are not siblings (do not have the same parent container). The client API might have passed an incorrect parameter.

Action

Specify the correct parameters (in this case, the Entry IDs) in the DSAMergeEntries API.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-707  FFFFFFD3D  INVALID SIGNATURE

Explanation

An invalid signature was received.

Action

See Reporting Error Code Problems to Novell.


-708  FFFFFFD3C  INVALID RESPONSE

Explanation

An invalid response was received.

Action

See Reporting Error Code Problems to Novell.


-709  FFFFFFD3B  INSUFFICIENT SOCKETS

Explanation

Insufficient sockets are available.

Action

See Reporting Error Code Problems to Novell.


-710  FFFFFFD3A  DATABASE READ FAIL

Explanation

An attempt to read the database failed.

Action

See Reporting Error Code Problems to Novell.


-711  FFFFFFD39  INVALID CODE PAGE

Explanation

An invalid code page exists.

Action

See Reporting Error Code Problems to Novell.


-712  FFFFFFD38  INVALID ESCAPE CHAR

Explanation

Invalid escape characters exist.

Action

See Reporting Error Code Problems to Novell.


-713  FFFFFFD37  INVALID DELIMITERS

Explanation

Invalid delimiters exist.

Action

See Reporting Error Code Problems to Novell.


-714  FFFFFFD36  NOT IMPLEMENTED

Explanation

The operation was not implemented.

Action

See Reporting Error Code Problems to Novell.


-715  FFFFFFD35  CHECKSUM FAILURE

Explanation

A checksum failure occurred.

Action

See Reporting Error Code Problems to Novell.


-716  FFFFFFD34  CHECKSUMMING NOT SUPPORTED

Explanation

Checksumming is not supported.

Action

See Reporting Error Code Problems to Novell.


-717  FFFFFFD33  CRC FAILURE

Explanation

A failure of the Cyclical Redundancy Check (CRC) occurred.

Action

See Reporting Error Code Problems to Novell.


-801  0xFFFFFCDF  NDPS E NO MEMORY

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The server has insufficient memory to support the requested operation.

Possible Cause

The server does not have enough memory installed.

Action

Add memory to the server.

Possible Cause

A program is running that is using too much memory.

Action

Identify the program that is using too much memory and unload it.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-803  0xFFFFFCDD  NDPS E JOB STORAGE LIMIT

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Total Job Space Limit used by print jobs and retained jobs has reached the limit set for the Printer Agent.

Action

Raise the total job space limit for the Printer Agent.

Remove some retained jobs.

Cancel some pending print jobs.

Wait for any pending jobs to process.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-804  0xFFFFFCDC  NDPS E JOB RETENTION LIMIT

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Retained Job Space Limit used by retained print jobs has reached the limit set for the Printer Agent.

Action

Raise the retained job space limit on the Printer Agent.

Remove some retained jobs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-805  0xFFFFFCDB  NDPS E UNSUPPORTED TYPE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A referenced object class or object attribute value is not supported in a client application.

Possible Cause

A programming error might have been encountered in the application you are running.

Action

If the problem persists, contact the application developer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-806  0xFFFFFCDA  NDPS E UNDEFINED TYPE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A referenced object class is not defined for NDPS.

Possible Cause

A programming error might have been encountered in the application you are running. An object class that is not defined for NDPS was used in a client application.

Action

Notify the supplier of the application program with the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-807  0xFFFFFCD9  NDPS E UNSUPPORTED OP

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

An operation was requested that is not supported by the NDPS Manager.

Possible Cause

A programming error might have been encountered in the application you are running. An unsupported operation was requested by a client application.

Action

Notify the supplier of the application program with the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-809  0xFFFFFCD7  NDPS E NO PDS

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A Print Device Subsystem (PDS) or third-party gateway is not bound to the Printer Agent.

Possible Cause

The Printer Agent has not been configured with a valid PDS or third-party gateway.

Action

Make sure the Printer Agent is configured with a valid PDS or third-party gateway.

Possible Cause

The PDS or third-party gateway has been unloaded.

Action

Load the PDS or third-party gateway. Try shutting down and starting up the Printer Agent from the NDPS Manager to see if the PDS or third-party gateway loads as part of the Printer Agent startup procedure. You can do this in NetWare Administrator through the Public Access Printers list for the NDPS Manager, or at the server console by selecting the Printer Agent from the list of Printer Agents.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-810  0xFFFFFCD6  NDPS E INVALID CLASS

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A referenced object class is not defined for NDPS.

Possible Cause

A programming error might have been encountered in the application you are running. An object class that is not defined for NDPS was used in a client application.

Action

Notify the supplier of the application program with the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-811  0xFFFFFCD5  NDPS E BAD PARAMETER

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

An operation request included a bad parameter.

Possible Cause

A programming error might have been encountered in the application you are running. A bad parameter was included in a request from a client application.

Action

Notify the supplier of the application program with the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-812  0xFFFFFCD4  NDPS E OBJECT NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The requested object for an operation was not found.

Possible Cause

The object was not created or has been deleted.

Action

Make sure the object exists.

Possible Cause

The ID for an object is invalid.

Action

Make sure the object ID is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-813  0xFFFFFCD3  NDPS E ATTRIBUTE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The requested object attribute for an operation was not found.

Possible Cause

The attribute was not created or has been deleted.

Action

Make sure the attribute exists.

Possible Cause

The ID for the attribute is invalid.

Action

Make sure the attribute ID is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-814  0xFFFFFCD2  NDPS E VALUE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The attribute value for an object that was requested for an operation was not found.

Possible Cause

The attribute or attribute value was not created or has been deleted.

Action

Make sure the attribute or attribute value exists.

Possible Cause

The ID for the attribute is invalid.

Action

If the attribute value was expected to be found, make sure the attribute ID is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-815  0xFFFFFCD1  NDPS E VALUES NOT COMPARABLE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A request to list objects includes a filter whose syntax is not valid for the specified attribute.

Possible Cause

A programming error might have been encountered in the application you are running. An object query filter with invalid syntax for the attribute value was used in a client application.

Action

Notify the supplier of the application program with the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-816  0xFFFFFCD0  NDPS E INVALID VALUE SYNTAX

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

An attribute value contains an invalid syntax.

Possible Cause

A programming error might have been encountered in the application you are running. An invalid attribute value syntax was used in a client application.

Action

Notify the supplier of the application program with the problem.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-817  0xFFFFFCCF  NDPS E JOB NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

An operation request specified a print job that is not found.

Possible Cause

The print job has been canceled.

Action

Send the job again.

Possible Cause

The job has already been processed.

Action

Check the job ID to see if the job has already been processed.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-818  0xFFFFFCCE  NDPS E COMMUNICATION

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Printer Agent was unable to communicate with an NDPS Broker or with another Printer Agent.

Possible Cause

The server does not have sufficient memory to complete the operation.

Action

Add more memory to the server or unload unnecessary NLM programs.

Possible Cause

The target NDPS Broker or Printer Agent is not loaded.

Action

Make sure the target NDPS Broker or Printer Agent is loaded.

Possible Cause

Network problems exist.

Action

Check the system console and error log for reported errors. Resolve any network errors indicated and try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-819  0xFFFFFCCD  NDPS E PA INITIALIZING

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Printer Agent is still initializing.

Possible Cause

A service request was received while the Printer Agent was still initializing.

Action

Wait for the Printer Agent to finish initializing, then try the request again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-820  0xFFFFFCCC  NDPS E PA GOING DOWN

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A service request was received while the Printer Agent was going down.

Action

Start up the Printer Agent from the NDPS Manager in NetWare Administrator or at the server console, then try the request again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-821  0xFFFFFCCB  NDPS E PA DISABLED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Printer Agent is disabled, probably because input to the printer has been paused. No new print jobs are accepted while the Printer Agent is disabled.

Action

Resume input to the printer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-822  0xFFFFFCCA  NDPS E PA PAUSED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

Printer output has been paused. No jobs can be supplied to the Print Device Subsystem (PDS) or third-party gateway while output is paused.

Action

Resume printer output.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-823  0xFFFFFCC9  NDPS E BAD PA HANDLE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A bad Printer Agent handle has been referenced in the NDPS Manager.

Possible Cause

A programming error might have been encountered in the NDPS Manager.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-824  0xFFFFFCC8  NDPS E OBJECT NOT LOCKED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

An attempt has been made to modify an object that is not locked.

Possible Cause

An internal programming error might  been encountered in the NDPS Manager.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-826  0xFFFFFCC6  NDPS E PSM INITIALIZING

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager is initializing.

Possible Cause

A service request was received while the NDPS Manager was initializing.

Action

Wait for the NDPS Manager to finish initializing, then try the request again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-827  0xFFFFFCC5  NDPS E PSM GOING DOWN

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager is going down.

Possible Cause

A service request was received while the NDPS Manager was going down.

Action

Load the NDPS Manager, then try the request again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-828  0xFFFFFCC4  NDPS E NOTIF SVC ERROR

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Notification Service returned an error code for a service request.

Possible Cause

A referenced event profile was not recognized by the Notification Service.

Action

See the documentation for the error code that was returned by the Notification Service.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-829  0xFFFFFCC3  NDPS E MEDIUM NEEDS MOUNTED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The medium requested for the current print job needs to be mounted.

Possible Cause

The current print job needs a medium that is not ready.

Action

Mount the required medium, then set the current medium information for the Printer Agent.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-830  0xFFFFFCC2  NDPS E PDS NOT RESPONDING

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Print Device Subsystem (PDS) or gateway is not responding to a request from the Printer Agent.

Possible Cause

The request timed out on a query because the PDS or gateway is very busy or the connection to its printer is slow.

Action

If the error occurs repeatedly, check the performance of the PDS or gateway and the connection to its printer.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-831  0xFFFFFCC1  NDPS E SESSION NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager could not find a client session for the client making a service request.

Possible Cause

The client has not performed a bind operation or the client connection has been lost at the server.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-832  0xFFFFFCC0  NDPS E RPC FAILURE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A remote procedure call (RPC) error occurred during an attempt by the Printer Agent to communicate with an NDPS Broker or another Printer Agent.

Possible Cause

The target NDPS Broker or Printer Agent has unloaded.

Action

Make sure the target NDPS Broker or Printer Agent is loaded.

Possible Cause

 A network communication problem has occurred.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-833  0xFFFFFCBF  NDPS E DUPLICATE VALUE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

An attempt was made to create a Printer Agent that already exists or to duplicate an association of a Printer object with a Printer Agent.

Possible Cause

A second request was made for an operation that had already succeeded. No action is required.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-834 0xFFFFFCBE NDPS E PDS REFUSES RENAME

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The Print Device Subsystem (PDS) or gateway refused a request to rename a Printer Agent.

Possible Cause

The PDS or gateway might not support changing the name of a Printer Agent or might be in a temporary state that prevents the name change.

Action

Try the operation again to see if it succeeds.  If it does not succeed, unload the PDS or gateway that is bound to the Printer Agent, and rename the Printer Agent.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-836  0xFFFFFCBC  NDPS E ALREADY ATTACHED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager attempted to log in to a file server to which it was already attached.

Possible Cause

An internal programming error might have been encountered in the NDPS Manager.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-837  0xFFFFFCBB  NDPS E CANT ATTACH

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to log in to a file server.

Possible Cause

The NDPS Manager was unable to establish a new connection to a file server.  This might be due to network problems, such as a router being down.

Action

Make sure the equipment for establishing a connection is up.  If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-838  0xFFFFFCBA  NDPS E TOO MANY NW SERVERS

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager has reached the limit for the number of servers to which it can log in.

Possible Cause

The Printer Agents supported by this NDPS manager are assigned to too many separate NDPS Brokers.

Action

Where practical, use the same Broker for multiple Printer Agents.

Possible Cause

The Printer Agents are configured to support print queues on too many servers.

Action

Check the assignment of print queues to the Printer objects for the Printer Agents supported by this NDPS Manager.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-839  0xFFFFFCB9  NDPS E CANT CREATE DOC FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to create a document data file for a print job.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the file server volume is mounted.

Possible Cause

The file server volume might be full.

Action

Make sure the volume is not full.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. If possible, resolve any errors and try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-840  0xFFFFFCB8  NDPS E CANT DELETE DOC FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to delete a document data file for a print job.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to delete a document data file for a print job.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-841  0xFFFFFCB7  NDPS E CANT OPEN DOC FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to open a document data file for a print job.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to open a document data file for a print job.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-842  0xFFFFFCB6  NDPS E CANT WRITE DOC FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to write data to a document data file for a print job.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

The file server volume might be full.

Action

Make sure the volume is not full.

Possible Cause

File attributes have been modified.

Action

If appropriate, make sure the file attributes allow the user to write data to a document data file for a print job.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-844  0xFFFFFCB4  NDPS E NO SCHEDULER

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A Printer Agent is not bound to a scheduler.

Possible Cause

The scheduler has been unloaded or a problem has occurred in the scheduler.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-845  0xFFFFFCB3  NDPS E CHANGING CONNECTION

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to change its current file server connection.

Possible Cause

A network problem or a system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-846  0xFFFFFCB2  NDPS E COULD NOT CREATE ACC REF

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to initialize access to the NDPS Library.

Possible Cause

The server is low on memory.

Action

Add memory to the server, or identify the program that is using too much memory and unload it.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-900  0xFFFFFC7C  NWDP OE RM OUT OF MEMORY

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager is out of memory.

Possible Cause

The server is out of available memory to allocate.

Action

Make more memory available to the Resource Manager by adding more memory to the server or by unloading unused NLM programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-901  0xFFFFFC7B  DB E CANT CREATE FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to create a Managed Object Database (MODB) file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the file server volume is mounted.

Possible Cause

The file server volume might be full.

Action

Make sure the volume is not full.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-901  0xFFFFFC7B  NWDP OE RM BAD NETWARE VERSION

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager encountered a version of NetWare* with which it is not compatible.

Possible Cause

The Resource Manager requires a NetWare 4.11 or later server operating system.

Action

Run NDPS on NetWare 4.11 or later.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-902  0xFFFFFC7A  DB E CANT FIND DATA FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to find a Managed Object Database (MODB) file.

Possible Cause

The database file has been deleted.

Action

Restore the Managed Object Database from its backup.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-903  0xFFFFFC79  DB E CANT OPEN DATA FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to open the Managed Object Database (MODB) data file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

Another program might have opened the file.

Action

Make sure the file is not already opened by another program.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to open the Managed Object Database data file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-904  0xFFFFFC78  DB E CANT OPEN INDEX FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to open the Managed Object Database (MODB) index file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

Another program might have opened the file.

Action

Make sure the file is not already opened by another program.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to open the Managed Object Database index file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-905  0xFFFFFC77  DB E INDEX FILE NOT OPEN

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager Managed Object Database (MODB) index file is not open.

Possible Cause

An internal programming error might have been encountered in the NDPS Manager.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-906  0xFFFFFC76  DB E CANT RENAME FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to rename a file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to rename the specified file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-906  0xFFFFFC76  NWDP OE RM FAILED TO CRTE THRED

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The NetWare* operating system was unable to create a thread to run the Resource Management Service (RMS) main thread.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-907  0xFFFFFC75  DB E CANT READ DATA FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to read the Managed Object Database (MODB) data file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to read the Managed Object Database data file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-907  0xFFFFFC75  NWDP OE RM SVC MUST BE FULL DIS

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager services must be fully disconnected.

Possible Cause

The Resource Manager is already starting up or is in the process of going down.

Action

Make sure the Resource Manager is fully disabled before enabling it.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-908  0xFFFFFC74  DB E CANT READ INDEX FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to read the Managed Object Database (MODB) index file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to read the Managed Object Database index file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-908  0xFFFFFC74  NWDP OE RM DS VAL SIZE TOO LARG

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An attribute value on an NDS* object that the Resource Management Service (RMS) was trying to read is too large.

Possible Cause

The attribute value size on the Broker object is larger than the buffer allowed (1024 bytes) to get the data.

Action

Use NLIST to check the attributes of the Broker object and change them if necessary.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-909  0xFFFFFC73  DB E CANT WRITE DATA FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to write information to the Managed Object Database (MODB) data file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to write to the Managed Object Database data file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-909  0xFFFFFC73  NWDP OE RM NO ATTRIBUTE VALUES

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager tried to read the attribute for an object, but it has no value.

Possible Cause

The value is not set on an object's attribute.

Action

Check attributes of the NDPS Broker object that have to do with the Resource Manager. Make sure they have valid values.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-910  0xFFFFFC72  DB E CANT WRITE INDEX FILE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to write information to the Managed Object Database (MODB) index file.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to write to the Managed Object Database index file.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-910  0xFFFFFC72  NWDP OE RM UNKNOWN SESSION

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

A request is being made to get information from a Transport Independent Remote Procedure Call (TIRPC) connections session table and the session number passed in was invalid.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-911  0xFFFFFC71  DB E CANT DELETE PA DIR

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager was unable to remove the job data pool directory for a Printer Agent.

Possible Cause

The file server volume might be dismounted.

Action

Make sure the volume is mounted.

Possible Cause

File attributes were modified.

Action

If appropriate, make sure the file attributes allow the user to remove the job data pool directory for a Printer Agent.

Possible Cause

A system error has occurred.

Action

Check the server console and error log file for system errors. Resolve any errors found and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-911  0xFFFFFC71  NWDP OE RM ERROR READING FILE

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An error occurred while reading a file during a call to get a resource file from the Resource Management Service (RMS) data storage area.

Possible Cause

Rights to read the file were not assigned to the Broker object.

Action

Make sure the Broker object has the Read right to the specified file.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-912  0xFFFFFC70  DB E ALREADY DELETED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The NDPS Manager tried to delete a data record that was already deleted.

Possible Cause

An internal programming error might have occurred in the NDPS Manager.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-913  0xFFFFFC6F  DB E OBJECT EXISTS

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A request was made to create an object that already exists.

Possible Cause

The user or a client application requested creation of a Printer Agent, medium, or other object that already exists.

Action

If the request is not initiated by the user, and the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-913  0xFFFFFC6F  NWDP OE RM SERVICE DISABLED

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Management Service (RMS) status flag was set to disabled.

Possible Cause

The RMS was disabled when it was expected to be available.

Action

Check the server console screen to ensure the RMS status is Enabled.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-914  0xFFFFFC6E  DB E DESCRIPTOR IN USE

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A process in the NDPS Manager failed to release an object descriptor in a timely manner.

Possible Cause

The processor utilization on the server is too high, preventing timely execution in the NDPS Manager.

Action

Solve the utilization problem on the server, then try the task again. If the problem persists, contact a Novell support provider.

Possible Cause

An internal problem occurred in the NDPS Manager.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-914  0xFFFFFC6E  NWDP OE RM UNKNOWN MODIFY OPER

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An unknown modify operation was attempted on an NDS* object attribute.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-915  0xFFFFFC6D  DB E DESCRIPTOR BEING DELETED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

A process in the NDPS Manager attempted to access an object that was being deleted.

Possible Cause

An internal programming error might have been encountered in the NDPS Manager.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-915  0xFFFFFC6D  NWDP OE RM DUPLICATE SESSION ID

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

A duplicate session number is being used during a bind to the Resource Management Service (RMS).

Possible Cause

The connection from client to server is being scrambled.

Action

Try again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-916  0xFFFFFC6C  NWDP OE RM INVALID CREDENTIAL

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An invalid credential was passed to Resource Management Service (RMS) bind process on the server.

Possible Cause

An error occurred in the ResRef that was created to talk to the RMS.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-919  0xFFFFFC69  NWDP OE RM FAIL TO GET MSGS

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The program could not get the message file for the Resource Management Service (RMS) NLM program.

Possible Cause

The file RMANSRVR.MSG is missing or corrupted.

Action

Reinstall NDPS and try the task again. If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-920  0xFFFFFC68  NWDP OE RM FAIL TO CRTE CONTEXT

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The program could not create an NDS* context while trying to initialize the identity facility of the Resource Management Service (RMS).

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-921  0xFFFFFC67  NWDP OE RM FAIL TO LOGIN

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

Resource Management Service (RMS) could not login to NDS* using the Broker’s account.

Possible Cause

The NDS account for the Broker is not in working condition.

Action

Use NetWare* Administrator to the check status of the Broker's account and make sure it is in working condition.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-922  0xFFFFFC66  NWDP OE RM NPD FILE GEN ERR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager could not generate a printer definition file (.NPD) while creating a Printer Agent.

Possible Cause

Some files in the NDPS\RESDIR\PRNDEF\NOVELL directory might be corrupted.

Action

Replace the corrupted files by reinstalling NDPS or copying the RESDIR\PRNDEF subdirectory from the Install CD-ROM to the installed RESDIR directory on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-923  0xFFFFFC65  NWDP OE RM INF FILE FORMAT ERR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An index file (.inf) being processed for printer drivers or printer definitions has a problem with its format.

Possible Cause

An unusable index file was on the vendor-supplied printer driver disk.

Action

Contact the vendor of the printer driver.

Possible Cause

An unusable index file was in the preinstalled drivers shipped with NDPS.

Action

Reinstall NDPS, or contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-924  0xFFFFFC64  NWDP OE RM NO PRT TYPE IN INF

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The printer type specified does not exist in the printer driver or printer definition index file.

Possible Cause

The index file is corrupted.

Action

Replace the corrupted index file by reinstalling NDPS.

Possible Cause

A programming error occurred in which faulty input data was supplied to a library API function.

Action

Contact the vendor of the application.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-925  0xFFFFFC63  NWDP OE RM NO INF FILES PRESENT

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

No printer driver or printer definition index files are present from which to create a list.

Possible Cause

The Resource Management Service (RMS) data area on the server is corrupted or missing.

Action

Make sure the RESDIR directory is in the correct location.

Possible Cause

No index files were present on a vendor-supplied floppy diskette.

Action

See if an .inf or .ndx file exists on a floppy diskette supplied by the vendor. If one does exist, copy the file to the RMS data area on the server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-926  0xFFFFFC62  NWDP OE RM FILE OPEN ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Management Service (RMS) could not open a file.

Possible Cause

A file is missing or RMS does not have the appropriate rights to a file.

Action

Check the system console for reported errors. If necessary, assign the appropriate rights to the file referenced.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-927  0xFFFFFC61  NWDP OE RM READ FILE ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Management Service (RMS) could not read a file.

Possible Cause

The RMS does not have the appropriate rights to read the file.

Action

Check the system console for reported errors. Make sure the RMS has rights to read the file that is referenced.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-928  0xFFFFFC60  NWDP OE RM WRITE FILE ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Management Service (RMS) could not write to a file.

Possible Cause

The RMS does not have rights to write to the file.

Action

Check the system console for reported errors. Make sure the RMS has rights to write to the file that is referenced.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-929  0xFFFFFC5F  NWDP OE RM RESRC TYPE INVALID

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

A resource type enum that is invalid was passed to an NDPS library API.

Action

Contact a Novell support provider.

Action

If you are trying to debug a program, check the resource type passed in against the allowed resource enum values in the NWDPRMS.H file.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-930  0xFFFFFC5E  NWDP OE RM NO SUCH FILENAME

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

A file operation was attempted on a file that did not exist.

Possible Cause

The Resource Management Service (RMS) attempted an operation that did not find the file referenced.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-931  0xFFFFFC5D  NWDP OE RM BANR TYPE INVALID

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The banner, enum type, passed to an NDPS library API is invalid.

Possible Cause

A calling code error has occurred.

Action

Contact the vendor of the program.

Action

If you are trying to debug a program, check the calling code and pass a valid enum.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-932  0xFFFFFC5C  NWDP OE RM LIST TYPE UNKNOWN

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The list type, enum type, passed to an NDPS library API (NWDPResListResource) is invalid.

Possible Cause

A calling code error has occurred.

Action

Contact the vendor of the program.

Action

If you are trying to debug a program, check the calling code and pass a valid enum.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-933  0xFFFFFC5B  NWDP OE RM OS NOT SUPPORTED

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The operating system type, enum type, passed to an NDPS library API is not currently supported.

Possible Cause

A calling code error has occurred.

Action

Contact the vendor of the program.

Action

If you are trying to debug a program, check the calling code and pass a valid enum.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-934  0xFFFFFC5A  NWDP OE RM NO BANR FILES PRESNT

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

No banner files were present in the NDPS RESDIR or on a user-supplied floppy diskette.

Possible Cause

No banner files are present.

Action

Check the location and condition of the RESDIR directory.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-936  0xFFFFFC58  NWDP OE RM NO PRN TYPES IN LIST

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

No valid printer types were found while the Resource Manager was trying to list printer drivers or printer definitions from the common resource storage area.

Possible Cause

The common resource storage area is missing or corrupted.

Action

Check the condition of the common resource storage area in the RESDIR directory.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-937  0xFFFFFC57  NWDP OE RM OPTION NOT SUPPORTED

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

A designator or enum value that is not supported was passed to the Resource Management Service (RMS).

Possible Cause

A bad enum was passed to an NDPS library call.

Action

Contact the vendor of the application.

Action

If you are trying to debug a program, check the calling code.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-938  0xFFFFFC56  NWDP OE RM UNICODE CONV ERR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An error occurred while trying to convert from local code page to Unicode** or  from Unicode to a local code page.

Possible Cause

Invalid Unicode data was input to an NDPS library call.

Action

Contact the vendor of the application.

Action

If you are trying to debug a program, check the calling code.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-939  0xFFFFFC55  NWDP OE RM INVALID ARGUMENTS

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

Invalid arguments were passed to the Resource Management Service (RMS) NLM program.

Possible Cause

Invalid arguments were passed to an NDPS library API.

Action

Contact the vendor of the application.

Action

If you are trying to debug a program, check the calling code.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-940  0xFFFFFC54  NWDP OE RM INITIALIZATION ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An error occurred while initializing the Resource Management Service (RMS) on the server.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-941  0xFFFFFC53  NWDP OE RM NO SRV REG AVAILABLE

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

No Service Registry Service (SRS) was available for the Resource Management Service (RMS) to register with.

Possible Cause

The SRS is not enabled, or one could not be found.

Action

Enable the SRS and try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-942  0xFFFFFC52  NWDP OE RM FAIL RGSTR TO ANY SR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager could not register with a Service Registery Service (SRS).

Possible Cause

No SRS is available, or a problem exists with the SRS.

Action

Enable the SRS, or shut down the SRS and bring it back up, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-944  0xFFFFFC50  NWDP OE RM NOT ADMIN SESSION

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Management Service (RMS) bind attempted an operation that requires Admin rights.

Possible Cause

The user is not an Admin of the Broker object.

Action

Log in as the user Admin or as a user with equivalent rights.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-945  0xFFFFFC4F  NWDP OE RM NO EFFECTIVE RIGHTS

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

No rights are available to read attributes of the Broker object.

Possible Cause

The Resource Management Service (RMS) is not logged in correctly.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-946  0xFFFFFC4E  NWDP OE RM BAD FILE ATTRIBUTE

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The Resource Manager could not set the share attribute on a file that was added to the RESDIR directory.

Possible Cause

The rights in the common resource storage area, the RESDIR directory, have been modified.

Action

Make sure the Resource Manager has the appropriate rights.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-947  0xFFFFFC4D  NWDP OE RM DID FORMAT ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The P1284 Device ID being returned from the hardware is flawed.

Possible Cause

The standard format for Device ID was not followed.

Action

Contact the vendor of the device (printer).

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-948  0xFFFFFC4C  NWDP OE RM UNKNOWN RPC SESSION

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An attempt was made to authenticate to an unknown RPC session or an unknown RPC session was generated.

Possible Cause

An internal NDPS error occurred.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-949  0xFFFFFC4B  NWDP OE RM SESSN BEING REMOVED

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An attempt was made to obtain a list of resources operations while the Resource Management Service (RMS) was being shut down.

Possible Cause

The RMS was being shut down.

Action

Wait until the RMS is up again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-951  0xFFFFFC49  NWDP OE RM FMGR IO ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

The Resource Manager has a problem accessing font files in the RMS common storage area. An error occurred while opening, reading, writing, or closing a needed file.

Possible Cause

The files in the RMS common storage area, RESDIR directory, are corrupted or missing.

Action

Check the RESDIR directory.

Possible Cause

The font index file or a font file in the repository has been deleted or is no longer available.

Action

Rebuild the font index file or recopy the appropriate font file to the font repository.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-952  0xFFFFFC48  NWDP OE RM FMGR REENTRANCY

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

The Font Manager is currently processing a client request.

Possible Cause

Overlapping procedure calls to the Font Manager module might exist.

Action

Retry the call until the Font Manager completes its previous operation.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-953  0xFFFFFC47  NWDP OE RM FMGR SEQ ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

A packet of font file data was received out of order by the Font Manager during the font file copy routine.

Action

Retry the font file copy request.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-954  0xFFFFFC46  NWDP OE RM FMGR CRPT INDEX FILE

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

The check sum of the memory resident copy of the Font Manager index file is invalid.

Possible Cause

A memory block has become corrupted.

Action

Contact a Novell support provider.

If you are debugging a program, close the Font Manager using FontMgrDeInit() and reinitialize the Font Manager using FontMgrInit().

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-955  0xFFFFFC45  NWDP OE RM FMGR NO SUCH FONT

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

A requested font does not exist in the font repository. The user will be unable to use the requested font.

Possible Cause

The desired font has not been added to the font repository.

Action

Contact the vendor of the application.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-956  0xFFFFFC44  NWDP OE RM FMGR NOT INITIALIZED

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

An attempt was made to use the Font Manager without first initializing the Font Manager.

Possible Cause

A mistake was made in the program code.

Action

Contact the vendor of the application.

If you are debugging a program, initialize the Font Manager using FontMgrInit() and retry the desired operation.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-957  0xFFFFFC43  NWDP OE RM FMGR SYSTEM ERROR

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

A memory allocation malloc or calloc request has failed.

Possible Cause

The server is out of available memory.

Action

Make more memory available to the Font Manager by adding more memory to the server or by unloading unused NLM* programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-958  0xFFFFFC42  NWDP OE RM FMGR BAD PARM

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

An invalid parameter was passed to a Font Manager function.

Possible Cause

A mistake was made in the program code.

Action

Contact a Novell support provider for an update to NDPS.

If debugging a program, bypass the font causing this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-960  0xFFFFFC40  NWDP OE RM FMGR FAILURE

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager, Font Manager

Explanation

An error occurred by a Font Manager private function. This error code is not returned by any Font Manager public function.

Possible Cause

A requested font does not exist in the font repository.

Action

Contact a Novell support provider for an update to NDPS.

If you are debugging the program, handle the error code returned by the Font Manager public function that fails.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-961  0xFFFFFC3F  NWDP OE RM DUP TIRPC SESSION

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

An attempt was made to authenticate a duplicate remote procedure call (RPC) session.

Possible Cause

An internal NDPS error occurred.

Action

If the problem persists, contact a Novell support provider.

Explanation

A duplicate Transport Independent Remote Procedure Call (TIRPC) session number is being used during a bind to the Resource Management Service (RMS).

Possible Cause

An intermittent problem has been noticed in this area during the bind to the RMS on the server.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


-962  0xFFFFFC3E  NWDP OE RM CONN LOST RMS DATA

Source

Novell* Distributed Print Services* (NDPS*), Resource Manager NLM* program

Explanation

The remote server lost the connection to the Resource Management Service (RMS) data storage area located on a different server on which the RMS is running.

Possible Cause

The remote file server has been shut down or is abended.

Action

Check and resolve the condition of the remote file server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x000F  DOS INVALID DRIVE

Explanation

An attempt was made to use an invalid (undefined or unavailable) DOS drive.

Action

See Reporting Error Code Problems to Novell.


0x6C 108 BAD ACCESS

Explanation

This error could be received for several reasons:

The user did a bindery login.

The user was logged in through Novell* Directory Services* (NDS*) but to a different tree.

The user object was removed from NDS between the time the user logged in and the time the NCPX extension was executed.

Action

Make sure the user is connected to the network and applicable server, and verify that the user has a valid NDS connection.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x7D 125 CONNECTION NOT LOGGED IN

Explanation

The Integration Utility, IGRATE.EXE, or the Object Replication Service (ORS) agent tried to execute an NCPX extension without an authenticated connection; or, at the server console, someone removed the NetWare* connection.

Action

From the Windows** NT** Explorer, go to Network Neighborhood and verify that you have an authenticated connection. If you do not have an authenticated connection to the NetWare server you want to work with, make one.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x8800  ALREADY ATTACHED

Explanation

The user is already attached to the server.

Action

See Reporting Error Code Problems to Novell.


0x8800  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

ALREADY ATTACHED

VLM ERROR


0x8800  VLM ERROR

Explanation

A VLM error has occurred.

Action

See Reporting Error Code Problems to Novell.


0x8801  CONN INVALID

Explanation

A request was attempted with an invalid or nonattached connection handle.

Action

See Reporting Error Code Problems to Novell.


0x8802  DRIVE IN USE

Explanation

The drive is in use. (OS2 only, not used)

Action

See Reporting Error Code Problems to Novell.


0x8803  DRIVE CANNOT MAP

Explanation

An attempt to map a drive was unsucessful. It could not add a new current directory structure.

Action

See Reporting Error Code Problems to Novell.


0x8804  DRIVE BAD PATH

Explanation

An attempt was made to map a drive with an invalid path specification.

Action

See Reporting Error Code Problems to Novell.


0x8805  NET RECEIVE

Explanation

An attempt to receive from the selected transport failed.

Action

See Reporting Error Code Problems to Novell.


0x8806  NET UNKNOWN

Explanation

A network send request was attempted, but a nonspecific error occurred.

Action

See Reporting Error Code Problems to Novell.


0x8807  SERVER BAD SLOT

Explanation

A server request was attempted with an invalid server connection slot.

Action

See Reporting Error Code Problems to Novell.


0x8808  SERVER NO SLOTS

Explanation

An attempt was made to attach to a server with no connection slots available.

Action

See Reporting Error Code Problems to Novell.


0x8809  NET SEND

Explanation

An attempt to send on the selected transport failed.

Action

See Reporting Error Code Problems to Novell.


0x880A  SERVER NO ROUTE

Explanation

An attempt was made to find a route to a server where no route exists.

Action

See Reporting Error Code Problems to Novell.


0x880B  BAD LOCAL TARGET

Explanation

An invalid local target was specified (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x880C  REQ TOO MANY REQ FRAGS

Explanation

A request was attempted with too many request fragments specified.

Action

See Reporting Error Code Problems to Novell.


0x880D  CONN LIST OVERFLOW

Explanation

Too many connections exist to fit in the list size specified.

Action

See Reporting Error Code Problems to Novell.


0x880E  BUFFER OVERFLOW

Explanation

An attempt was made to receive more data than the reply buffer had room for.

Action

See Reporting Error Code Problems to Novell.


0x880F  SERVER NO CONN

Explanation

An attempt to get connection for a server failed. The workstation is not connected.

Action

See Reporting Error Code Problems to Novell.


0x8810  NO ROUTER FOUND

Explanation

No router was found (OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x8811  FUNCTION INVALID

Explanation

A function call was tried to a nonexistent or illegal function.

Action

See Reporting Error Code Problems to Novell.


0x8812  LIP RESIZE ERROR

Explanation

A Large Internet Packet (LIP) resize error occurred.

Action

See Reporting Error Code Problems to Novell.


0x8812  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

LIP RESIZE ERROR

SCAN COMPLETE


0x8812  SCAN COMPLETE

Action

See Reporting Error Code Problems to Novell.


0x8813  INVALID DIR HANDLE

Action

See Reporting Error Code Problems to Novell.


0x8813  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INVALID DIR HANDLE

UNSUPPORTED NAME FORMAT TYP


0x8813  UNSUPPORTED NAME FORMAT TYP

Action

See Reporting Error Code Problems to Novell.


0x8814  HANDLE ALREADY LICENSED

Explanation

An application attempted to license a connection that was already licensed. An application can only license or unlicense a connection once without getting an error.

Action

See Reporting Error Code Problems to Novell.


0x8814  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

HANDLE ALREADY LICENSED

OUT OF CLIENT MEMORY


0x8814  OUT OF CLIENT MEMORY

Explanation

The client is out of memory.

Action

See Reporting Error Code Problems to Novell.


0x8815  HANDLE ALREADY UNLICENSED

Explanation

An application attempted to unlicense a connection that was already unlicensed. An application can only license or unlicense a connection once without getting an error.

Action

See Reporting Error Code Problems to Novell.


0x8815  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

HANDLE ALREADY UNLICENSED

PATH NOT OURS


0x8815  PATH NOT OURS

Explanation

An attempt was made to specify a path that NetWare* does not recognize.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x8816  INVALID NCP PACKET LENGTH

Explanation

The NCP packet length is invalid.

Action

See Reporting Error Code Problems to Novell.


0x8816  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INVALID NCP PACKET LENGTH

PATH IS PRINT DEVICE


0x8816  PATH IS PRINT DEVICE

Explanation

An attempt was made to write to a path that is a print device.

Action

See Reporting Error Code Problems to Novell.


0x8817  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

PATH IS EXCLUDED DEVICE

SETTING UP TIMEOUT


0x8817  PATH IS EXCLUDED DEVICE

Explanation

An attempt was made to specify a path to a device that is excluded.

Action

See Reporting Error Code Problems to Novell.


0x8817  SETTING UP TIMEOUT

Action

See Reporting Error Code Problems to Novell.


0x8818  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

PATH IS INVALID

SETTING SIGNALS


0x8818  PATH IS INVALID

Explanation

An attempt was made to access a path that is invalid.

Action

See Reporting Error Code Problems to Novell.


0x8818  SETTING SIGNALS

Action

See Reporting Error Code Problems to Novell.


0x8819  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

NOT SAME DEVICE

SERVER CONNECTION LOST


0x8819  NOT SAME DEVICE

Explanation

The device is not the same.

Action

See Reporting Error Code Problems to Novell.


0x8819  SERVER CONNECTION LOST

Action

See Reporting Error Code Problems to Novell.


0x881A  OUT OF HEAP SPACE

Action

See Reporting Error Code Problems to Novell.


0x881B  INVALID SEARCH HANDLE

Action

See Reporting Error Code Problems to Novell.


0x881B  INVALID SERVICE REQUEST

Explanation

The service request is invalid.

Action

See Reporting Error Code Problems to Novell.


0x881B  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INVALID SEARCH HANDLE

INVALID SERVICE REQUEST


0x881C  INVALID DEVICE HANDLE

Action

See Reporting Error Code Problems to Novell.


0x881C  INVALID TASK NUMBER

Explanation

The task number is invalid.

Action

See Reporting Error Code Problems to Novell.


0x881C  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INVALID DEVICE HANDLE

INVALID TASK NUMBER


0x881D  INVALID MESSAGE LENGTH

Explanation

The message length is invalid.

Action

See Reporting Error Code Problems to Novell.


0x881D  INVALID SEM HANDLE

Action

See Reporting Error Code Problems to Novell.


0x881D  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INVALID MESSAGE LENGTH

INVALID SEM HANDLE


0x881E  EA SCAN DONE

Explanation

An Equal Access (EA) scan is done.

Action

See Reporting Error Code Problems to Novell.


0x881E  INVALID CFG HANDLE

Action

See Reporting Error Code Problems to Novell.


0x881E  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

EA SCAN DONE

INVALID CFG HANDLE


0x881F  BAD CONNECTION NUMBER

Explanation

An attempt has been made to connect to a server with a bad connection number.

Action

See Reporting Error Code Problems to Novell.


0x881F  INVALID MOD HANDLE

Action

See Reporting Error Code Problems to Novell.


0x881F  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BAD CONNECTION NUMBER

INVALID MOD HANDLE


0x8820  ASYN FIRST PASS

Action

See Reporting Error Code Problems to Novell.


0x8820  MULT TREES NOT SUPPORTED

Explanation

Multiple trees are not supported.

Action

See Reporting Error Code Problems to Novell.


0x8820  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

ASYN FIRST PASS

MULT TREES NOT SUPPORTED


0x8821  INVALID DEVICE INDEX

Action

See Reporting Error Code Problems to Novell.


0x8822  INVALID CONN HANDLE

Explanation

An invalid CONN handle was issued.

Action

See Reporting Error Code Problems to Novell.


0x8823  INVALID QUEUE ID

Action

See Reporting Error Code Problems to Novell.


0x8824  INVALID PDEVICE HANDLE

Action

See Reporting Error Code Problems to Novell.


0x8825  INVALID JOB HANDLE

Action

See Reporting Error Code Problems to Novell.


0x8826  INVALID ELEMENT ID

Action

See Reporting Error Code Problems to Novell.


0x8827  ALIAS NOT FOUND

Explanation

An alias is not found.

Action

See Reporting Error Code Problems to Novell.


0x8828  RESOURCE SUSPENDED

Explanation

The resource is suspended.

Action

See Reporting Error Code Problems to Novell.


0x8829  INVALID QUEUE SPECIFIED

Action

See Reporting Error Code Problems to Novell.


0x882A  DEVICE ALREADY OPEN

Explanation

The device is already open.

Action

See Reporting Error Code Problems to Novell.


0x882B  JOB ALREADY OPEN

Explanation

The job is already open.

Action

See Reporting Error Code Problems to Novell.


0x882C  QUEUE NAME ID MISMATCH

Explanation

The queue name has a mismatched ID.

Action

See Reporting Error Code Problems to Novell.


0x882D  JOB ALREADY STARTED

Explanation

The job already has been started.

Action

See Reporting Error Code Problems to Novell.


0x882E  SPECT DAA TYPE NOT SUPPORTED

Explanation

The specified Data Access Arrangement (DAA) type is not supported.

Action

See Reporting Error Code Problems to Novell.


0x882F  INVALID ENVIR HANDLE

Action

See Reporting Error Code Problems to Novell.


0x8830  CONN NOT SAME

Explanation

An internal server request was attempted across different server connections.

Action

See Reporting Error Code Problems to Novell.


0x8831  CONN PRIMARY NOT SET

Explanation

An attempt was made to retrieve a default connection with no primary connection set.

Action

See Reporting Error Code Problems to Novell.


0x8832  KEYWORD NOT FOUND

Explanation

A keyword is not found.

Action

See Reporting Error Code Problems to Novell.


0x8832  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

KEYWORD NOT FOUND

PRN CAPTURE NOT IN PROGRESS


0x8832  PRN CAPTURE NOT IN PROGRESS

Explanation

Capture information was requested on a port with no capture in progress.

Action

See Reporting Error Code Problems to Novell.


0x8833  BUFFER INVALID LEN

Explanation

The length that the caller requested was too large.

Action

See Reporting Error Code Problems to Novell.


0x8834  USER NO NAME

Action

See Reporting Error Code Problems to Novell.


0x8835  PRN NO LOCAL SPOOLER

Explanation

Capture was requested without a local print spooler installed.

Action

See Reporting Error Code Problems to Novell.


0x8836  PARAM INVALID

Explanation

A function was attempted with an invalid function parameter specified.

Action

See Reporting Error Code Problems to Novell.


0x8837  CFG OPEN FAILED

Explanation

An attempt to open the configuration file failed (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x8838  CFG NO FILE

Explanation

No configuration file can be found (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x8839  CFG READ FAILED

Explanation

An attempt to read a file failed (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x883A  CFG LINE TOO LONG

Explanation

A line in the configuration file is too long (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x883B  CFG LINES IGNORED

Explanation

One or more lines in the configuration file were ignored (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x883C  RESOURCE NOT OWNED

Explanation

A request was made with a parameter using a foreign resource.

Action

See Reporting Error Code Problems to Novell.


0x883D  DAEMON INSTALLED

Explanation

No information for this error code is available (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x883E  PRN SPOOLER INSTALLED

Explanation

An attempt was made to load the print spooler, but the print spooler was already installed.

Action

See Reporting Error Code Problems to Novell.


0x883F  CONN TABLE FULL

Explanation

The system tried to allocate a connection handle, but no more local connection table entries were available.

Action

See Reporting Error Code Problems to Novell.


0x8840  CFG SECTION NOT FOUND

Explanation

The configuration section was not found (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x8841  TRAN INVALID TYPE

Explanation

An attempt was made to execute a function on a connection with an invalid transport selected.

Action

See Reporting Error Code Problems to Novell.


0x8842  TDS TAG IN USE

Explanation

A Tagged Data Store (TDS) tag is already in use (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x8843  TDS OUT OF MEMORY

Explanation

The computer does not have enough available RAM (for OS/2 only).

Action

See Reporting Error Code Problems to Novell.


0x8844  TDS INVALID TAG

Explanation

A Tagged Data Store (TDS) function was attempted with an invalid tag.

Action

See Reporting Error Code Problems to Novell.


0x8845  TDS WRITE TRUNCATED

Explanation

A Tagged Data Store (TDS) write was tried to a buffer that exceeded the buffer's size.

Action

See Reporting Error Code Problems to Novell.


0x8846  DS NO CONN

Explanation

No Novell* Directory Services* (NDS) connections exists.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x8846  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

DS NO CONN

SERVICE BUSY


0x8846  SERVICE BUSY

Explanation

A request was tried to a busy, partially asynchronous function.

Action

See Reporting Error Code Problems to Novell.


0x8847  SERVER NOT FOUND

Explanation

The attempt to connect failed to find any servers responding.

Action

See Reporting Error Code Problems to Novell.


0x8848  VLM INVALID

Explanation

An attempted function call was made to a nonexistent or not-loaded overlay.

Action

See Reporting Error Code Problems to Novell.


0x8849  DRIVE ALREADY MAPPED

Explanation

An attempt was made to map to a network drive that was already mapped.

Action

See Reporting Error Code Problems to Novell.


0x884A  DRIVE LOCAL IN USE

Explanation

An attempt was made to map to a local drive that was in use.

Action

See Reporting Error Code Problems to Novell.


0x884B  DRIVE NONE AVAILABLE

Explanation

An attempt was made to map to the next available drive when no drive was available.

Action

See Reporting Error Code Problems to Novell.


0x884C  DEVICE NOT REDIRECTED

Explanation

The device was not redirected.

Action

See Reporting Error Code Problems to Novell.


0x884D  FILE MAX REACHED

Explanation

The maximum number of files has been reached.

Action

See Reporting Error Code Problems to Novell.


0x884E  UNLOAD FAILED

Explanation

An attempted unload failed.

Action

See Reporting Error Code Problems to Novell.


0x884F  CONN IN USE

Explanation

An attempt was made to reuse a connection entry that was already in use.

Action

See Reporting Error Code Problems to Novell.


0x8850  REQ TOO MANY REP FRAGS

Explanation

An attempted request had too many reply fragments specified.

Action

See Reporting Error Code Problems to Novell.


0x8851  NAME TABLE FULL

Explanation

An attempted request was made to add a name into the name table after the table was full.

Action

See Reporting Error Code Problems to Novell.


0x8852  SOCKET NOT OPEN

Explanation

A listen was posted on an unopened socket.

Action

See Reporting Error Code Problems to Novell.


0x8853  MEMORY MGR ERROR

Explanation

An attempted enhanced memory operation failed.

Action

See Reporting Error Code Problems to Novell.


0x8854  SFT3 ERROR

Explanation

An SFT III switch occurred during mid transfer.

Action

See Reporting Error Code Problems to Novell.


0x8855  DS PREFERRED NOT FOUND

Explanation

A preferred directory server was not established, but another directory server was returned.

Action

See Reporting Error Code Problems to Novell.


0x8856  DEVICE NOT RECOGNIZED

Explanation

The device is unknown.

Action

Determine if the device is not used by the NetWare* DOS Requester; pass to next redirector, if any.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x8857  NET INVALID TYPE

Action

See Reporting Error Code Problems to Novell.


0x8858  FILE OPEN FAILED

Action

See Reporting Error Code Problems to Novell.


0x8859  DS PREFERRED NOT SPECIFIED

Explanation

A preferred directory server was not specified.

Action

See Reporting Error Code Problems to Novell.


0x885A  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

REQUESTER FAILURE

SOCKET OPEN FAILED


0x885A  REQUESTER FAILURE

Explanation

A requester failure has occurred.

Action

See Reporting Error Code Problems to Novell.


0x885A  SOCKET OPEN FAILED

Action

See Reporting Error Code Problems to Novell.


0x885B  RESOURCE ACCESS DENIED

Explanation

Access to the resource is denied.

Action

See Reporting Error Code Problems to Novell.


0x8861  SIGNATURE LEVE CONFLICT
0x8861  SIGNATURE LEVEL CONFLICT

Action

See Reporting Error Code Problems to Novell.


0x8862  NO LOCK FOUND

Explanation

An attempt was made to remove a lock, but no lock was found.

Action

See Reporting Error Code Problems to Novell.


0x8863  LOCK TABLE FULL

Explanation

The lock table is full.

Action

See Reporting Error Code Problems to Novell.


0x8864  INVALID MATCH DATA

Explanation

The match data is invalid.

Action

See Reporting Error Code Problems to Novell.


0x8865  MATCH FAILED

Explanation

The match failed.

Action

See Reporting Error Code Problems to Novell.


0x8866  NO MORE ENTRIES

Action

See Reporting Error Code Problems to Novell.


0x8867  INSUFFICIENT RESOURCES

Explanation

The resources are insufficient to perform the requested operation.

Action

See Reporting Error Code Problems to Novell.


0x8867  INSUFFICIENT SPACE

Explanation

The station does not have sufficient disk space.

Action

See Reporting Error Code Problems to Novell.


0x8868  STRING TRANSLATION

Action

See Reporting Error Code Problems to Novell.


0x8869  ACCESS VIOLATION

Explanation

An access violation has occurred.

Action

See Reporting Error Code Problems to Novell.


0x886A  NOT AUTHENTICATED

Action

See Reporting Error Code Problems to Novell.


0x886B  INVALID LEVEL

Explanation

The level is invalid.

Action

See Reporting Error Code Problems to Novell.


0x886C  RESOURCE LOCK

Action

See Reporting Error Code Problems to Novell.


0x886D  INVALID NAME FORMAT

Explanation

The name format is invalid.

Action

See Reporting Error Code Problems to Novell.


0x886E  OBJECT EXISTS

Action

See Reporting Error Code Problems to Novell.


0x886E  UNSUPPORTED AUTHENTICATOR

Action

See Reporting Error Code Problems to Novell.


0x886F  OBJECT NOT FOUND

Explanation

An attempt was made to access an object, but the object was not found.

Action

See Reporting Error Code Problems to Novell.


0x8870  UNSUPPORTED TRAN TYPE

Action

See Reporting Error Code Problems to Novell.


0x8871  INVALID STRING TYPE

Explanation

The string type is invalid.

Action

See Reporting Error Code Problems to Novell.


0x8872  INVALID OWNER

Explanation

The owner is invalid.

Action

See Reporting Error Code Problems to Novell.


0x8874  IO PENDING

Explanation

The I/O is pending.

Action

See Reporting Error Code Problems to Novell.


0x8875  INVALID DRIVE NUMBER

Explanation

The drive number is invalid.

Action

See Reporting Error Code Problems to Novell.


0x8880  SVC ALREADY REGISTERED

Explanation

The session for the Switched Virtual Circuit (SVC) is already registered.

Action

See Reporting Error Code Problems to Novell.


0x8881  SVC REGISTRY FULL

Explanation

The Switched Virtual Circuit (SVC) registry is full.

Action

See Reporting Error Code Problems to Novell.


0x8882  SVC NOT REGISTERED

Explanation

The Switched Virtual Circuit (SVC) is not registered.

Action

See Reporting Error Code Problems to Novell.


0x8883  OUT OF RESOURCES

Explanation

No resources are available.

Action

See Reporting Error Code Problems to Novell.


0x8884  RESOLVE SVC FAILED

Explanation

An attempt to resolve the Switched Virtual Circuit (SVC) failed.

Action

See Reporting Error Code Problems to Novell.


0x8885  CONNECT FAILED

Explanation

The connection failed.

Action

See Reporting Error Code Problems to Novell.


0x8886  PROTOCOL NOT BOUND

Explanation

The protocol is not bound.

Action

See Reporting Error Code Problems to Novell.


0x8887  AUTHENTICATION FAILED

Action

See Reporting Error Code Problems to Novell.


0x8888  INVALID AUTHEN HANDLE

Action

See Reporting Error Code Problems to Novell.


0x8889  AUTHEN HANDLE ALREADY EXISTS

Explanation

An authentication handle already exists.

Action

See Reporting Error Code Problems to Novell.


0x8890  DIFF OBJECT ALREADY AUTHEN

Action

See Reporting Error Code Problems to Novell.


0x8891  REQUEST NOT SERVICEABLE

Explanation

The requester is not serviceable.

Action

See Reporting Error Code Problems to Novell.


0x8892  AUTO RECONNECT SO REBUILD

Action

See Reporting Error Code Problems to Novell.


0x8893  AUTO RECONNECT RETRY REQUEST

Action

See Reporting Error Code Problems to Novell.


0x8894  ASYNC REQUEST IN USE

Action

See Reporting Error Code Problems to Novell.


0x8895  ASYNC REQUEST CANCELED

Action

See Reporting Error Code Problems to Novell.


0x8896  SESS SVC ALREADY REGISTERED

Explanation

The session for the Switched Virtual Circuit (SVC) is already registered.

Action

See Reporting Error Code Problems to Novell.


0x8897  SESS SVC NOT REGISTERED

Explanation

The session for the Switched Virtual Circuit (SVC) is not registered.

Action

See Reporting Error Code Problems to Novell.


0x8899  PREVIOUSLY AUTHENTICATED

Action

See Reporting Error Code Problems to Novell.


0x889A  RESOLVE SVC PARTIAL

Explanation

An attempt to resolve the Switched Virtual Circuit (SVC) is partial.

Action

See Reporting Error Code Problems to Novell.


0x889B  NO DEFAULT SPECIFIED

Explanation

No default was specified.

Action

See Reporting Error Code Problems to Novell.


0x889C  HOOK REQUEST NOT HANDLED

Action

See Reporting Error Code Problems to Novell.


0x889D  HOOK REQUEST BUSY

Action

See Reporting Error Code Problems to Novell.


0x889E  AUTO RECONNECT SO IGNORE

Action

See Reporting Error Code Problems to Novell.


0x889F  ASYNC REQUEST NOT IN USE

Action

See Reporting Error Code Problems to Novell.


0x88A0  AUTO RECONNECT FAILURE

Explanation

An auto reconnect failure occurred.

Action

See Reporting Error Code Problems to Novell.


0x88A1  ERROR ABORT APPLICATION

Explanation

An application was aborted due to a network error.

Action

See Reporting Error Code Problems to Novell.


0x88A2  ERROR SUSPEND APPLICATION

Explanation

An application was suspended due to a network error.

Action

See Reporting Error Code Problems to Novell.


0x88A3  ERROR ABORTED PROCESS GROUP

Explanation

A process group was aborted due to a network error.

Action

See Reporting Error Code Problems to Novell.


0x88A5  ERROR PASSWORD HAS EXPIRED

Explanation

The user's password has expired.

Action

See Reporting Error Code Problems to Novell.


0x88A6  ERROR NETWORK INACTIVE

Explanation

The network is inactive.

Action

See Reporting Error Code Problems to Novell.


0x88FF  REQUESTER FAILURE

Explanation

 An unknown error has occurred, or the shell or VLM program is not present.

Action

See Reporting Error Code Problems to Novell.


0x8977  BUFFER TOO SMALL

Explanation

The data to be passed back is too large for the buffer that was declared.

Action

See Reporting Error Code Problems to Novell.


0x8978  VOL FLAG NOT SET

Explanation

The volume flag has not been set.

Action

See Reporting Error Code Problems to Novell.


0x8979  NO ITEMS FOUND

Explanation

A request for items failed because the items could not be found, for example, during a bindery request.

Action

See Reporting Error Code Problems to Novell.


0x897A  CONN ALREADY TEMP

Explanation

An attempt was made to convert a connection to temporary that was already temporary.

Action

See Reporting Error Code Problems to Novell.


0x897B  CONN ALREADY LOGGED IN

Explanation

The connection is already logged in to the Directory.

Action

See Reporting Error Code Problems to Novell.


0x897C  CONN NOT AUTHENTICATED

Explanation

The connection for a call has not been authenticated.

Action

See Reporting Error Code Problems to Novell.


0x897D  CONN NOT LOGGED IN

Explanation

An attempt was made to log out of a connection that the user was not logged in to.

Action

See Reporting Error Code Problems to Novell.


0x897E  NCP BOUNDARY CHECK FAILED

Explanation

The NCP subfunction size does not match the actual size of the data sent.

Action

See Reporting Error Code Problems to Novell.


0x897F  LOCK WAITING

Explanation

A timeout occurred before a file was locked.

Action

See Reporting Error Code Problems to Novell.


0x8980  FILE IN USE

Explanation

An attempt was made to open or create a file that is already open.

Action

See Reporting Error Code Problems to Novell.


0x8980  LOCK FAIL

Explanation

An attempt was made to open or create a file that is already open.

Action

See Reporting Error Code Problems to Novell.


0x8980  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

FILE IN USE

LOCK FAIL


0x8981  FILE NO HANDLES

Explanation

No more file handles are available; the network file handle table is full.

Action

See Reporting Error Code Problems to Novell.


0x8982  FILE NO OPEN PRIV

Explanation

An attempt was made to open a file without the Open right.

Action

See Reporting Error Code Problems to Novell.


0x8983  DISK IO ERROR

Explanation

A hard disk input/output error occurred on a NetWare* volume; a bad sector has been encountered and could be fatal.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x8984  FILE NO CREATE PRIV

Explanation

An attempt was made to create a file without the Create right.

Action

See Reporting Error Code Problems to Novell.


0x8985  FILE NO CREATE DEL PRIV

Explanation

An attempt was made to create an already existing file without the Create/Delete rights.

Action

See Reporting Error Code Problems to Novell.


0x8986  DIR TARGET INVALID

Action

See Reporting Error Code Problems to Novell.


0x8986  FILE EXISTS READ ONLY

Explanation

An attempt was made to create a file with the same name as an already existing file with Read Only status.

Action

See Reporting Error Code Problems to Novell.


0x8986  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

DIR TARGET INVALID

FILE EXISTS READ ONLY


0x8987  FILE WILD CARDS IN NAME

Explanation

An attempt was made to create a file using an ambiguous filename.

Action

See Reporting Error Code Problems to Novell.


0x8988  FILE INVALID HANDLE

Explanation

An attempt was made to close or perform I/O on a file with an invalid file handle (that is, trying to read from a file that has been closed).

Action

See Reporting Error Code Problems to Novell.


0x8989  FILE NO SRCH PRIV

Explanation

An attempt was made to search a directory without search rights in that directory.

Action

See Reporting Error Code Problems to Novell.


0x898A  FILE NO DEL PRIV

Explanation

An attempt was made to delete a file without file deletion privileges in that file's directory.

Action

See Reporting Error Code Problems to Novell.


0x898B  FILE NO RENAME PRIV

Explanation

An attempt was made to rename a file without renaming privileges in that file's directory.

Action

See Reporting Error Code Problems to Novell.


0x898C  FILE NO MOD PRIV

Explanation

An attempt was made to modify a file without attribute modification privileges in that file's directory.

Action

See Reporting Error Code Problems to Novell.


0x898D  FILE SOME IN USE

Explanation

An attempt was made to delete, rename, or set file attributes using an ambiguous filename while some of the files specified by the filename are in use by another workstation.

Action

See Reporting Error Code Problems to Novell.


0x898E  FILE NONE IN USE

Explanation

An attempt was made to delete, rename, or set file attributes using a filename when the file or files specified by the filename are in use by another workstation.

Action

See Reporting Error Code Problems to Novell.


0x898F  FILE SOME READ ONLY

Explanation

An attempt was made to delete, rename, or set file attributes using a filename when some of the files specified have Read Only status.

Action

See Reporting Error Code Problems to Novell.


0x8990  FILE NONE READ ONLY

Explanation

An attempt was made to delete, rename, or set file attributes using a filename when all the files specified have Read Only status.

Action

See Reporting Error Code Problems to Novell.


0x8991  FILE SOME RENAMED EXIST

Explanation

An attempt was made to rename files when one or more files matching the new filename specification already exist.

Action

See Reporting Error Code Problems to Novell.


0x8992  FILE NONE RENAMED EXIST

Explanation

An attempt was made to rename files when all the files matching the new filename specification already exist.

Action

See Reporting Error Code Problems to Novell.


0x8993  FILE NO READ PRIV

Explanation

An attempt was made to read a file without Read privileges to that file.

Action

See Reporting Error Code Problems to Novell.


0x8994  FILE NO WRITE PRIV

Explanation

An attempt was made to write to a file without Write privileges to that file, or the specified file has Read Only status.

Action

See Reporting Error Code Problems to Novell.


0x8994  FILE READ ONLY

Explanation

An attempt was made to write to a file without Write privileges to that file, or the specified file has Read Only status.

Action

See Reporting Error Code Problems to Novell.


0x8994  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

FILE NO WRITE PRIV

FILE READ ONLY


0x8995  FILE DETACHED

Explanation

An attempt was made to read or write to a detached file.

Action

See Reporting Error Code Problems to Novell.


0x8996  SERVER OUT OF MEMORY

Explanation

An attempt was made to write to a file server that does not have enough free dynamic memory to process the specified request.

Action

See Reporting Error Code Problems to Novell.


0x8997  DISK NO SPOOL SPACE

Explanation

The network operating system has determined that the network disk does not have enough space left for spool files.

Action

See Reporting Error Code Problems to Novell.


0x8998  VOL INVALID

Explanation

The network operating system has tried to access a volume but cannot find the volume in the system definition files.

Action

See Reporting Error Code Problems to Novell.


0x8999  DIR FULL

Explanation

An attempt was made to write to a volume without available directory space.

Action

See Reporting Error Code Problems to Novell.


0x899A  VOL RENAMING ACROSS

Explanation

An attempt was made to rename across volumes (rename a file and move the renamed file from its current volume into another volume).

Although the RENAME command may move the file between directories on the same volume, using RENAME to move a file between volumes is not allowed.

Action

See Reporting Error Code Problems to Novell.


0x899B  DIRHANDLE INVALID

Explanation

An attempt was made to use an invalid directory handle. This occurs if the network has been brought down and brought back up, without rebooting the workstation.

Action

See Reporting Error Code Problems to Novell.


0x899C  INSUFFICIENT RIGHTS INVALID PATH

Explanation

An attempt was made to access a path with invalid rights to the path or with and invalid path name.

Action

See Reporting Error Code Problems to Novell.


0x899C  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

INSUFFICIENT RIGHTS INVALID PATH

PATH INVALID

TRUSTEES NO MORE


0x899C  PATH INVALID

Explanation

An attempt was made to access an invalid path.

Action

See Reporting Error Code Problems to Novell.


0x899C  TRUSTEES NO MORE

Action

See Reporting Error Code Problems to Novell.


0x899D  DIRHANDLE NO MORE

Explanation

No more directory handles are available; the directory handle table is full. Each user may have up to 255 directory handles.

Action

See Reporting Error Code Problems to Novell.


0x899E  FILE NAME INVALID

Explanation

An attempt was made to create a file using invalid characters within the name of the file.

Action

Enter the file name again using valid characters.


0x899F  DIR ACTIVE

Explanation

An attempt was made to delete a directory that is being used by another workstation.

Action

See Reporting Error Code Problems to Novell.


0x89A0  DIR NOT EMPTY

Explanation

An attempt was made to delete a directory that contains files or other directories.

Action

See Reporting Error Code Problems to Novell.


0x89A1  DIR IO ERROR

Explanation

A nonrecoverable I/O error has occurred on the disk in the directory area. This error has occurred in both copies of the directory and is fatal.

Action

See Reporting Error Code Problems to Novell.


0x89A2  FILE IO LOCKED

Explanation

An attempt was made to read a file where data is physically locked.

Action

See Reporting Error Code Problems to Novell.


0x89A3  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

TTS TRANSACTION RESTARTED

TRANSACTION RESTARTED

TTS RANSACTION RESTARTED


0x89A3  TRANSACTION RESTARTED

Explanation

Transaction tracking was restarted.

Action

See Reporting Error Code Problems to Novell.


0x89A3  TTS RANSACTION RESTARTED

Explanation

Transaction tracking already has been restarted.

Action

See Reporting Error Code Problems to Novell.


0x89A3  TTS TRANSACTION RESTARTED

Action

See Reporting Error Code Problems to Novell.


0x89A4  DIR RENAME INVALID

Explanation

An attempt was made to rename a directory with an invalid name.

Action

See Reporting Error Code Problems to Novell.


0x89A5  FILE OPENCREAT MODE INVALID

Action

See Reporting Error Code Problems to Novell.


0x89A6  ALREADY IN USE

Explanation

An attempt was made to access a file that was already in use.

Action

See Reporting Error Code Problems to Novell.


0x89A7  RESOURCE TAG INVALID

Explanation

An invalid resource tag was encountered.

Action

See Reporting Error Code Problems to Novell.


0x89A8  ACCESS DENIED

Explanation

Access has been denied.

Action

See Reporting Error Code Problems to Novell.


0x89BE  DATA STREAM INVALID

Explanation

Data streams are invalid.

Action

See Reporting Error Code Problems to Novell.


0x89BF  NAME SPACE INVALID

Explanation

An invalid name space was used.

Action

See Reporting Error Code Problems to Novell.


0x89C0  ACCTING NO PRIV

Explanation

The user has no accounting privileges.

Action

See Reporting Error Code Problems to Novell.


0x89C1  ACCTING NO BALANCE

Explanation

Attempt was made to log in by a bindery object without an accounting balance, and accounting is enabled.

Action

See Reporting Error Code Problems to Novell.


0x89C2  ACCTING NO CREDIT

Explanation

An attempt was made to log in to an account with no credit available.

Action

See Reporting Error Code Problems to Novell.


0x89C3  ACCTING TOO MANY HOLDS

Action

See Reporting Error Code Problems to Novell.


0x89C4  ACCTING DISABLED

Explanation

Accounting has been disabled.

Action

See Reporting Error Code Problems to Novell.


0x89C5  LOGIN LOCKOUT

Explanation

An attempt was made to log in after the system had locked the account because of intruder detection.

Action

See Reporting Error Code Problems to Novell.


0x89C6  CONSOLE NO PRIV

Explanation

An attempt was made to use console privileges without operator privileges.

Action

See Reporting Error Code Problems to Novell.


0x89D0  Q IO FAILURE

Explanation

A queue I/O error occurred.

Action

See Reporting Error Code Problems to Novell.


0x89D1  Q NONE

Explanation

No queues are defined.

Action

See Reporting Error Code Problems to Novell.


0x89D2  Q NO SERVER

Explanation

No queue server has been specified.

Action

See Reporting Error Code Problems to Novell.


0x89D3  Q NO RIGHTS

Action

See Reporting Error Code Problems to Novell.


0x89D4  Q FULL

Explanation

The queue is full.

Action

See Reporting Error Code Problems to Novell.


0x89D5  Q NO JOB

Explanation

No jobs are in the queue.

Action

See Reporting Error Code Problems to Novell.


0x89D6  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

PASSWORD UNENCRYPTED

Q NO JOB RIGHT


0x89D6  PASSWORD UNENCRYPTED

Action

See Reporting Error Code Problems to Novell.


0x89D6  Q NO JOB RIGHTS

Explanation

The user does not have rights to this job in the queue.

Action

See Reporting Error Code Problems to Novell.


0x89D7  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

PASSWORD NOT UNIQUE

Q IN SERVICE


0x89D7  PASSWORD NOT UNIQUE

Explanation

An attempt was made to change a password to a previously used password when the unique requirement is specified for the account.

Action

See Reporting Error Code Problems to Novell.


0x89D7  Q IN SERVICE

Explanation

The queue is in service at this time.

Action

See Reporting Error Code Problems to Novell.


0x89D8  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

PASSWORD TOO SHORT

Q NOT ACTIVE


0x89D8  PASSWORD TOO SHORT

Explanation

An attempt was made to change a password to a password with fewer characters than the required minimum specified for the account.

Action

Make sure the password entered has the minimum characters specified for the account.


0x89D8  Q NOT ACTIVE

Explanation

The queue is not active at this time.

Action

See Reporting Error Code Problems to Novell.


0x89D9  LOGIN MAX EXCEEDED

Explanation

An attempt was made to log in using an account that has limits on the number of concurrent connections and that number has been reached.

Action

See Reporting Error Code Problems to Novell.


0x89D9  LOGIN NO CONN

Explanation

An attempt was made to log in using an account that has limits on the number of concurrent connectins and that number has been reached.

Action

See Reporting Error Code Problems to Novell.


0x89D9  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

LOGIN MAX EXCEEDED

LOGIN NO CONN

Q STN NOT SERVER


0x89D9  Q STN NOT SERVER

Explanation

The queue station is not a server.

Action

See Reporting Error Code Problems to Novell.


0x89DA  LOGIN UNAUTHORIZED TIME

Explanation

An attempt was made to log in during an unauthorized time of day specified for the account.

Action

See Reporting Error Code Problems to Novell.


0x89DA  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

LOGIN UNAUTHORIZED TIME

Q HALTED


0x89DA  Q HALTED

Explanation

The queue has been halted.

Action

See Reporting Error Code Problems to Novell.


0x89DB  LOGIN UNAUTHORIZED STATION

Explanation

An attempt was made to log into an unauthorized station.

Action

See Reporting Error Code Problems to Novell.


0x89DB  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

LOGIN UNAUTHORIZED STATION

Q MAX SERVERS


0x89DB  Q MAX SERVERS

Explanation

This queue is already attached to the maximum number of servers allowed.

Action

See Reporting Error Code Problems to Novell.


0x89DC  ACCT DISABLED

Explanation

An attempt was made to log in using an account that has expired or has been disabled by the supervisor.

Action

See Reporting Error Code Problems to Novell.


0x89DE  PASSWORD INVALID

Explanation

An attempt was made to log in using an account password that has expired, and all grace logins have also expired.

Action

See Reporting Error Code Problems to Novell.


0x89DF  PASSWORD EXPIRED

Explanation

An attempt was made to log in using an expired account password, but the login was allowed because the account had a grace login.

Action

See Reporting Error Code Problems to Novell.


0x89E0  LOGIN NO CONN AVAIL

Explanation

No login connection is available.

Action

See Reporting Error Code Problems to Novell.


0x89E7  E NO MORE USERS

Explanation

No more users exists.

Action

See Reporting Error Code Problems to Novell.


0x89E8  BIND NOT ITEM PROP

Explanation

An attempt was made to use an item not associated with this property group or an item that has been deleted from this group.

Action

See Reporting Error Code Problems to Novell.


0x89E8  BIND WRITE TO GROUP PROP

Explanation

An attempt was made to use an item not associated with this property group or an item that has been deleted from this group.

Action

See Reporting Error Code Problems to Novell.


0x89E8  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BIND NOT ITEM PROP

BIND WRITE TO GROUP PROP


0x89E9  BIND MEMBER ALREADY EXISTS

Explanation

An attempt was made to add an object to a group property that already exists.

Action

See Reporting Error Code Problems to Novell.


0x89EA  BIND NO SUCH MEMBER

Explanation

An attempt was made to use an object that is not a member of the defined group property.

Action

See Reporting Error Code Problems to Novell.


0x89EB  BIND NOT GROUP PROP

Explanation

An attempt was made to use a nongroup property.

Action

See Reporting Error Code Problems to Novell.


0x89EC  BIND NO SUCH SEGMENT

Explanation

An attempt was made to use a nonexisting segment. Note that segments must be written sequentially when a property is first created, but may be read and written in any order after they already exist.

Action

See Reporting Error Code Problems to Novell.


0x89ED  BIND PROP ALREADY EXISTS

Explanation

An attempt was made to create a property that already exists.

Action

See Reporting Error Code Problems to Novell.


0x89EE  BIND OBJ ALREADY EXISTS

Explanation

An attempt was made to create an object that already exists.

Action

See Reporting Error Code Problems to Novell.


0x89EF  BIND NAME INVALID

Explanation

A request was made with an object or property name containing illegal characters. Illegal characters in names are control characters, the comma, colon, semicolon, slash, backslash, question mark, asterisk, and tilde.

Action

Enter requests using valid characters.


0x89F0  BIND WILDCARD INVALID

Explanation

An attempt was made to use a wildcard character or wild object type in a call where wildcards are not allowed.

Action

See Reporting Error Code Problems to Novell.


0x89F1  BIND SECURITY INVALID

Explanation

An attempt was made to assign a security level of a bindery object or property to be higher than the user's security level. This would make the object or property inaccessible to the user.

Action

See Reporting Error Code Problems to Novell.


0x89F2  BIND OBJ NO READ PRIV

Explanation

An attempt to access object information or scan the object's properties was made by a station without the necessary security to access this information or object's properties.

Action

See Reporting Error Code Problems to Novell.


0x89F3  BIND OBJ NO RENAME PRIV

Explanation

An attempt was made to rename an object without the necessary rights. Only the Supervisor can rename objects. Note that if the user does not have the rights to see that the object exists, then NCP_NO_SUCH_OBJECT is returned.

Action

See Reporting Error Code Problems to Novell.


0x89F4  BIND OBJ NO DELETE PRIV

Explanation

An attempt was made to delete an object without the necessary rights to delete the object. Only the Supervisor can delete objects. Note that if the user does not have the right to see that the object exists, then NCP_NO_SUCH_OBJECT is returned.

Action

See Reporting Error Code Problems to Novell.


0x89F5  BIND OBJ NO CREATE PRIV

Explanation

An attempt was made to create an object without the necessary security to create or change an object. Only Supervisors are allowed to create objects.

Action

See Reporting Error Code Problems to Novell.


0x89F6  BIND PROP NO DELETE PRIV

Explanation

An attempt was made to delete a property without the necessary property rights. Note that if the user does not have the proper rights to view the property, then NCP_NO_SUCH_PROPERTY is returned.

Action

See Reporting Error Code Problems to Novell.


0x89F7  BIND PROP NO CREATE PRIV

Explanation

An attempt was made to create a property without the necessary property rights for the object.

Action

See Reporting Error Code Problems to Novell.


0x89F8  BIND PROP NO WRITE PRIV

Action

See Reporting Error Code Problems to Novell.


0x89F9  BIND PROP NO READ PRIV

Explanation

An attempt was made to read without the necessary Read rights to access the property data.

Action

See Reporting Error Code Problems to Novell.


0x89F9  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BIND PROP NO READ PRIV

NO FREE CONN SLOTS


0x89F9  NO FREE CONN SLOTS

Explanation

No connection slots are available.

Action

See Reporting Error Code Problems to Novell.


0x89FA  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

NO MORE SERVER SLOTS

TEMP REMAP ERROR


0x89FA  NO MORE SERVER SLOTS

Explanation

No server slots are available.

Action

See Reporting Error Code Problems to Novell.


0x89FA  TEMP REMAP ERROR

Explanation

An attempt was made to use an unknown path.

Action

See Reporting Error Code Problems to Novell.


0x89FB  BIND NO SUCH PROP

Explanation

An attempt was made to use a property that does not exist for the specified object.

Action

See Reporting Error Code Problems to Novell.


0x89FB  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BIND NO SUCH PROP

NCP NOT SUPPORTED

PARAMETERS INVALID


0x89FB  NCP NOT SUPPORTED

Action

See Reporting Error Code Problems to Novell.


0x89FB  PARAMETERS INVALID

Explanation

An attempt was made to use an invalid parameter (drive number, path, or flag value) during a set drive path call.

Action

See Reporting Error Code Problems to Novell.


0x89FC  BIND NO SUCH OBJ

Explanation

An attempt was made to use an object that could not be found in the context specified.

Action

See Reporting Error Code Problems to Novell.


0x89FC  INET PACKET REQ CANCELED

Action

See Reporting Error Code Problems to Novell.


0x89FC  MSG Q FULL

Explanation

An attempt was made to use a full message queue.

Action

See Reporting Error Code Problems to Novell.


0x89FC  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BIND NO SUCH OBJ

INET PACKET REQ CANCELED

MSG Q FULL

SERVER UNKNOWN


0x89FC  SERVER UNKNOWN

Explanation

An attempt was made to attach to a server using an invalid server name.

Action

See Reporting Error Code Problems to Novell.


0x89FD  CONN NUM INVALID

Explanation

An attempt was made to use a bad (undefined, unavailable, etc.) station number.

Action

See Reporting Error Code Problems to Novell.


0x89FD  LOCK COLLISION

Action

See Reporting Error Code Problems to Novell.


0x89FD  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

CONN NUM INVALID

LOCK COLLISION

PACKET LEN INVALID

UNKNOWN REQ


0x89FD  PACKET LEN INVALID

Explanation

The requesting packet did not have a 30 byte packet header as the first fragment, or its total length exceeded 576 characters.

Action

See Reporting Error Code Problems to Novell.


0x89FD  UNKNOWN REQ

Explanation

An unknown request was attempted.

Action

See Reporting Error Code Problems to Novell.


0x89FE  BIND LOCKED

Explanation

An attempt was made to use a server with a locked bindery.

Action

See Reporting Error Code Problems to Novell.


0x89FE  DIR LOCKED

Explanation

An attempt was made to use a locked directory.

Action

See Reporting Error Code Problems to Novell.


0x89FE  LOGIN DISABLED BY SUPER

Explanation

An attempt was made to log in when the supervisor has disabled logins from the console or the bindery was locked.

Action

See Reporting Error Code Problems to Novell.


0x89FE  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BIND LOCKED

DIR LOCKED

LOGIN DISABLED BY SUPER

PACKET NOT DELIVERABLE

SEM INVALID NAME LEN

SOCKET TABLE FULL

SPOOL DIR ERROR

TIMEOUT FAILURE

TRUSTEE NOT FOUND


0x89FE  PACKET NOT DELIVERABLE

Explanation

A packet cannot be delivered for any of the following possible reasons:

The destination node is on another network, and no router could be found with a path to the destination network.

The destination node address is on the local network, and the hardware detects that the destination node address is nonexistent or inactive.

The destination node is the same machine as the source node, and no pending listen request is on the destination socket number.

The destination socket number is not open.

Action

See Reporting Error Code Problems to Novell.


0x89FE  SEM INVALID NAME LEN

Explanation

An attempt was made to open a semaphore with an invalid semaphore name length. Semaphores use strings that are from 1 to 127 bytes long.

Action

See Reporting Error Code Problems to Novell.


0x89FE  SOCKET TABLE FULL

Action

See Reporting Error Code Problems to Novell.


0x89FE  SPOOL DIR ERROR

Explanation

An error occurred while spooling the directory.

Action

See Reporting Error Code Problems to Novell.


0x89FE  TIMEOUT FAILURE

Explanation

A failure occurred that was caused by the timeout limit expiring before the request was fulfilled.

Action

See Reporting Error Code Problems to Novell.


0x89FE  TRUSTEE NOT FOUND

Explanation

An operation tried to use an unknown trustee.

Action

See Reporting Error Code Problems to Novell.


0x89FF  BAD RECORD OFFSET

Explanation

The program tried to use an invalid offset value during physical locking calls.

Action

See Reporting Error Code Problems to Novell.


0x89FF  BAD SPOOL PRINTER

Explanation

An attempt was made to use a bad (undefined, unavailable, etc.) printer.

Action

See Reporting Error Code Problems to Novell.


0x89FF  DRIVE INVALID NUM

Explanation

An attempt was made to use a drive with an invalid number.

Action

See Reporting Error Code Problems to Novell.


0x89FF  FAILURE

Explanation

A failure has occurred.

Action

See Reporting Error Code Problems to Novell.


0x89FF  FCB CLOSE

Explanation

An error occurred closing the file.

Action

See Reporting Error Code Problems to Novell.


0x89FF  FILE EXT

Explanation

An attempt was made to use a file with a bad (undefined, unavailable, etc.) name or extension.

Action

See Reporting Error Code Problems to Novell.


0x89FF  FILE NAME

Explanation

An attempt was made to use a file with a bad (undefined, unavailable, etc.) name or extension.

Action

See Reporting Error Code Problems to Novell.


0x89FF  HARD FAILURE

Explanation

A hardware failure occurred.

Action

See Reporting Error Code Problems to Novell.


0x89FF  IO BOUND

Explanation

The program tried to write beyond the end of the file or disk.

Action

See Reporting Error Code Problems to Novell.


0x89FF  LOCK ERROR

Explanation

An attempt was made to use a locked file.

Action

See Reporting Error Code Problems to Novell.


0x89FF  Multiple causes

Explanation

NetWare could not identify the exact cause of this error.

Possible causes for this error are

BAD RECORD OFFSET

BAD SPOOL PRINTER

DRIVE INVALID NUM

FAILURE

FCB CLOSE

FILE EXT

FILE NAME

HARD FAILURE

IO BOUND

LOCK ERROR

NO FILES FOUND ERROR

NO OBJ OR BAD PASSWORD

NO RESPONSE FROM SERVER

PATH NOT LOCATABLE

Q FULL ERROR

REQ NOT OUTSTANDING

SEM INVALID HANDLE

SEM INVALID INIT VAL

SOCKET ALREADY OPEN


0x89FF  NO FILES FOUND ERROR

Explanation

No files were found that matched the search specification.

Action

See Reporting Error Code Problems to Novell.


0x89FF  NO OBJ OR BAD PASSWORD

Explanation

An attempt was made to use an unfound object, or attempt to use a bad (undefined, unavailable, etc.) password. On a login call, this indicates the password was correct, but it has expired and all grace logins have been used up. On a change password call, it indicates that the old password given was correct, but the account is not allowed to change the password (typical of the GUEST account).

Action

Make sure the user type the correct password.

If necessary, assign the user a new password.

If the error persist, see Reporting Error Code Problems to Novell.


0x89FF  NO RESPONSE FROM SERVER

Action

See Reporting Error Code Problems to Novell.


0x89FF  PATH NOT LOCATABLE

Explanation

The program tried to find an unknown path during a "get full path" call.

Action

See Reporting Error Code Problems to Novell.


0x89FF  Q FULL ERROR

Explanation

An attempt was made to use a queue with 99 entries in it. (99 is the maximum number of entries that can be placed in each print queue.)

Action

See Reporting Error Code Problems to Novell.


0x89FF  REQ NOT OUTSTANDING

Explanation

No NCP requests are outstanding.

Action

See Reporting Error Code Problems to Novell.


0x89FF  SEM INVALID HANDLE

Explanation

The program tried to examine, wait for, or signal a semaphore with an invalid semaphore handle. The semaphore handle is obtained through the "open a semaphore" call.

Action

See Reporting Error Code Problems to Novell.


0x89FF  SEM INVALID INIT VAL

Explanation

The program tried to open a semaphore with an invalid semaphore value. The semaphore value must be positive, and it must be initialized to a value from 0 to 127.

Action

See Reporting Error Code Problems to Novell.


0x89FF  SOCKET ALREADY OPEN

Explanation

The program tried to open a socket whose specified socket number is already open.

Action

See Reporting Error Code Problems to Novell.


0x8A 138 NO DELETE PRIVILEGES

Explanation

If this message is received, the user probably does not have rights to the SYS:SYSTEM\NDSDM directory on the NetWare* server.

Action

If appropriate, make the user a trustee of the SYS:SYSTEM\NDSDM directory. NetWare Administrator is one utility that can be used to accomplish this task.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0x96 150 SERVER OUT OF MEMORY

Explanation

The NetWare* server has run out of memory.

Action

Add memory or unload some unnecessary NLM* programs.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0xC0 192 NO ACCOUNT PRIVILEGES

Explanation

The user does not have sufficient rights to run operations in the integration utility, IGRATE.EXE, on the NetWare* server where the NDSDM.NLM resides.

Action

Before operating the IGRATE.EXE, make sure the user has Supervisor rights to the NetWare server where the NDSDM.NLM resides.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0xFE 254 NCPEXT NO HANDLER

Explanation

Three possible causes for this error are the following:

The NDSDM.NLM program has been unloaded.

The Integration Utility (IGRATE.EXE) or the Object Replication Service (ORS) agent on an NT** system tried to access the NLM* program, and the file was not available.

The NDSDM.NLM program tried to access a NetWare* server that did not have the NLM loaded and active.

Action

At the server console, type MODULES. If the NDSDM.NLM is not loaded, it will not appear in the list of modules displayed. If the NLM program is not loaded, load the program by typing LOAD NDSDM. If the NLM program is already loaded, call an IntranetWare* support provider for help with this error code.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


0xFF 255 NO RESPONSE FROM SERVER

Explanation

Two possible causes for this error are the following:

The Integration Utility, IGRATE.EXE, issued a command and the the Object Replication Service (ORS) agent was busy, down, or not responding on the Windows NT** machine.

If the NT Client was removed from the NT machine, one of the agent’s dependencies might be hampered.

Action

Try the following actions:

Retry the operation. If the error still occurs, go to the NT machine, open Control panel, then launch the Services applet. Locate the NDS* Object Replication Service (MWAAgent). This service should be started and left to run on automatic.

If the service is not started, reboot the machine.

If errors persist, call an IntranetWare support provider for assistance.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1048577  0x00100001  NWDP LE ATR NOT IN SET

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The specified attribute is not in the set.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1114113  0x00110001  NWDP LE RES NO NET ADDR ATTR

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The network address attribute is empty for the NDS* Broker object.

Action

Make sure the Broker object is loaded on a server, then try the action again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1179649  0x00120001  NWDP LE NTFY NO NET ADDR ATTR

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The network address attribute is empty for the NDS* Broker object.

Action

Make sure the Broker object is loaded on a server, then try the action again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1179652  0x00120004  NWDP LE NTFY NO SUCH PROFILE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The profile cannot be found.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1245186  0x00130002  NWDP LE PRT SPCD Broker NOT FND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An error occurred while downloading the drivers. The specified Broker was not found for the driver download.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1245188  0x00130004  NWDP LE PRT NO DEST PATH

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An error occurred while downloading the drivers. No destination path was specified in the driver download.

Action

Specify a destination path, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1245189  0x00130005  NWDP LE PRT DEVICE ID FMT BAD

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An error occurred while downloading the drivers. The Device ID format is invalid in the driver download.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1245190  0x00130006   NWDP LE PRT NO TMP DEST PATH

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An error occurred while downloading the drivers. No temporary destination path exists.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1245191  0x00130007   NWDP LE PRT WINDOWS RESTART RQD

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An error occurred while downloading the drivers.

Action

Restart Windows**.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1310721  0x00140001  NWDP LE COMPARE RESULT LT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

In a comparison of a:b, the result is that a is less than b.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1310722  0x00140002  NWDP LE COMPARE RESULT EQ

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

In a comparison of a:b, the result is that a is equal to b.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1310723  0x00140003  NWDP LE COMPARE RESULT GT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

In a comparison of a:b, the result is that a is greater than b.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1310724  0x00140004  NWDP LE COMPARE RESULT NE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

In a comparison of a:b, the result is that a is not equal to b.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1376257  0x00150001   NWDP LE OTHER NDPS ERROR RETURN

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The otherNDPSErrorReturnPtr of the accessorRef contains valid data.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1441793  0x00160001  NWDP LE NIOS INIT FAILURE
1441793L  0x00160001  NWDP LE NIOS INIT FAILURE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The NIOS.NLM failed to initialize.  NIOS is a component of the IntranetWare* Client*  for DOS or Windows** 3.1*, Windows 95*, and Windows NT*.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


1441794  0x00160002  NWDP LE NIOS GET SYSTEMDIR FAIL
1441794L  0x00160002  NWDP LE NIOS GET SYSTEMDIR FAIL

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An attempt to get the SYSTEM directory for the IntranetWare* Client* failed.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


16777220  0x01000004  NWDP EC STDIO

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

This error indicates that a standard IO error occurred.

Action

Take the appropriate action for the actual IO error. For the actual error, see the other error codes displayed with this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


16777221  0x01000005  NWDP EC NDS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

This error code indicates that an NDS* error occurred.

Action

Take the appropriate action for the actual NDS error. For the actual NDS error, see the other error codes displayed with this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


16777222  0x01000006  NWDP EC UNICODE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

This error code indicates that a Unicode** error occured.

Action

Take the appropriate action for the actual Unicode error. For the actual Unicode error, see the other error codes displayed with this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


17498119  0x010B0007  NWDP EC NSRV ATTR NOT IN SCHEMA

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The requested attribute is not in the NDS* schema. "Other"error is the index of the attribute object ID within the set of object IDs.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


196609  0x00030001  NWDP LE PSM CONNECTION LOST

Source

Novell* Distributed Print Services* (NDPS*), Library error

Explanation

The connection to the NDPS Manager was lost.

Action

Reestablish a connection, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117251  0x03700003  NWDP EC RPC CANTSEND

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The client workstation is unable to send the request.

Possible Cause

A network error has occurred.

Action

Verify that the network is functioning properly.

Possible Cause

A transport layer error has occurred.

Action

Verify that the correct versions of the WINSOCK and SPX_SKTS files are loaded.

Possible Cause

The client handle is already in use at the time the request was made.

Action

Contact the vendor of the software.

Possible Cause

An internal NDPS error has occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117252  0x03700004  NWDP EC RPC CANTRECV

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The client or NDPS system component is unable to receive data.

Possible Cause

A network error has occurred.

Action

Verify that the network is functioning properly.

Possible Cause

A transport layer error has occurred.

Action

Verify that the correct versions of the WINSOCK and SPX_SKTS files are loaded.

Possible Cause

The client handle is already in use at the time the request was made.

Action

Contact the vendor of the software.

Possible Cause

An internal NDPS error has occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117254  0x03700006  NWDP EC RPC VERSMISMATCH

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The version of the DPRPC being used by the client and the requested system component is incompatible.

Possible Cause

A mismatch exists between the versions of the NDPS client and the NDPS server components.

Action

Verify that the latest version of NDPS components is installed on the client and server.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117255  0x01700007  NWDP EC RPC AUTHERROR

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The credential passed was rejected by the NDPS system component that is being addressed.

Possible Cause

An internal NDPS error occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117257  0x03700009  NWDP EC RPC PROGVERSMISMATCH

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The version of the NDPS system component that is being addressed does not match what is expected by the client software.

Possible Cause

A mismatch exists between the versions of the NDPS client and the NDPS server components.

Action

Verify that the latest version of NDPS components is installed on the client and server.

Action

If you are debugging the program, verify that the program and version numbers are correct.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117266  0x03700012  NWDP EC RPC INTR

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

An NDPS call was interrupted before it completed.

Possible Cause

The user interrupted the request.

Possible Cause

An internal NDPS error occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


24117268  0x03700014  NWDP EC RPC TLIERROR

Source

Novell* Distributed Print Services* (NDPS*), RPC, TLI

Explanation

A Transport Layer Interface (TLI) error occurred.

Possible Cause

An incorrect version of transport software (on client DPTLIWXX.DLL, WINSOCK.DLL, WSOCK32.DLL, SPX_SKT.NLM on server TLI.NLM, SPXS.NLM, STREAMS.NLM).

Action

Verify that the correct version of the transport software is installed.

Possible Cause

The transport software was configured improperly.

Action

Verify that the transport software is configured properly.

Possible Cause

An internal NDPS or transport layer error occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


262145  0x00040001  NWDP LE FILE NO ACCESS RIGHTS

Source

Novell Distributed Print Services (NDPS), Library Error

Explanation

An attempt was made to access a file without access rights to the file.

Action

Make sure the necessary rights are assigned for the task being done and try the task again.


262146  0x00040002  NWDP LE FILE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

A file was not found.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


327681  0x00050001  NWDP LE SRS CONNECTION LOST

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The connection to the Service Registry Service (SRS) has been lost.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


327682  0x00050002  NWDP LE SRS NO SRVC REG FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Service Registry was not found.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


327683  0x00050003  NWDP LE SRS NOT ENABLED

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Service Registry Service (SRS) is not enabled.

Action

Make sure the SRS is enabled, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


393217  0x00060001  NWDP LE BRK CONNECTION LOST

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The connection to the NDPS Broker has been lost.

Action

Reestablish a connection to the Broker, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


50331653  0x03000005  NWDP EC NDS WITH POSITION

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An NDS* error occurred. The position of the error is a zero-relative index into the array of attributes that indicates the extent to which modifications succeeded before this failure.  If the index is 2, then two modify operations succeeded and a failure on the third stopped any further modifications.  The index of 2 indicates that the third attribute in the set caused the NDS error reported by the otherError field.

Action

Take the appropriate action for the actual NDS error. For the NDS error and its position, see the other error codes and information displayed with this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


50724865  0x03060001  NWDP EC Broker RESULT

Source

Novell* Distributed Print Services* (NDPS*), NDPS Broker NLM* program

Explanation

An error was generated by the NDPS Broker.

Action

To obtain more information on the error condition, examine the other error codes reported with this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


50724866  0x03060002  NWDP EC REGISTRY RESULT

Source

Novell* Distributed Print Services* (NDPS*), libError or N Failure

Explanation

The Service Registry Service (SRS) encountered an error condition.

Action

Obtain more information on the error condition by examining the other error codes reported with this error.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


50724867  0x03060003  NWDP EC NOTIFY RESULT

Source

Novell Distributed Print Services

Possible Cause

The error was generated as a result of the Event Notification Service (ENS) encountering an error condition.

Action

Obtain more information on the error condition by examining the other error codes reported with this error.


50987009  0x030A0001  NWDP EC NO MEMORY

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The server is out of available memory.

Possible Cause

The server does not have enough memory installed.

Action

View the other information displayed with this error to determine how much memory was supposed to be allocated and how much was actually allocated. Then add the required memory to the server.

Possible Cause

A program is running that is using too much memory.

Action

Identify the program that is using too much memory and unload it.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


524290  0x00080002  NWDP LE DOC ZERO LENGTH

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The document has zero length.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


524292  0x00080004  NWDP LE DOC NO SUCH DOC

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The document object cannot be found in the Managed Objects database.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


589829  0x00090005  NWDP LE JOB NO SUCH JOB

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The job object cannot be found in the Managed Objects database.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


655365  0x000A0005  NWDP LE UNKNOWN CALLBACK ERR

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An unknown error occurred in the callback routine.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


655367  0x000A0007  NWDP LE INVALID INTERNAL OP

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An internal library error occurred.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


655369  0x000A0009  NWDP LE FQN NOT NDPS MANAGER

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

A Fully Qualified Name (FQN) does not identify an NDPS Manager.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


655370  0x000A000A  NWDP LE FQN NOT NDPS PRINTER
655370  0x000A000AL  NWDP LE FQN NOT NDPS PRINTER

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

A Fully Qualified Name (FQN) does not identify an NDPS printer.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


655371  0x000A000B  NWDP LE FQN NOT NDPS Broker

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The fully qualified NDS* name provided does not identify an NDPS Broker.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720898  0x000B0002  NWDP LE NSRV OBJECT EXISTS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The object already exists in NDS*.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720899  0x000B0003  NWDP LE NSRV NO SUCH OBJECT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The object cannot be found in NDS*.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720900  0x000B0004  NWDP LE NSRV WRONG OBJECT TYPE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The object is the wrong object type.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720901  0x000B0005  NWDP LE NSRV NO ADDRESS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The network address is empty for the NDS* object.

Action

Make sure the object is loaded, then try the action again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720902  0x000B0006  NWDP LE NSRV VAL SIZE TOO LARGE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

A Broker network address value is too large.

Action

Make sure the values for the Broker network address are under 32 bytes.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720903  0x000B0007  NWDP LE NSRV NOT SAME TREE

=Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The NDS* object is not in the same tree.

Action

Make sure the object is in the same tree, and then try the action again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


720904  0x000B0008  NWDP LE NSRV INTERNAL

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An internal name service error has occurred.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


7340037  0x00700005  NWDP LE RPC TIMEDOUT

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

A Remote Procedure Call (RPC) timed out trying to communicate.

Possible Cause

The requested system component is no longer available at the specified address.

Action

Verify that the requested system component is loaded and functioning properly.

Possible Cause

A general network packet routing problems exists.

Action

Verify that the network is functioning properly.

Possible Cause

An invalid address was used while to trying to communicate with an NDPS system component (Broker, RMS, SRS, ENS, PSM, or PA).

Action

Contact a Novell support provider.

If you are debugging the program, verify that the network address is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


7340040  0x00700008  NWDP LE RPC PROGUNAVAIL

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The requested NDPS system component is not loaded or is not functioning properly at the requested address.

Possible Cause

The requested component is not currently active or is malfunctioning.

Action

Verify that the requested component is loaded and functioning properly at the indicated address. Verify that the address used is correct.

Action

If you are debugging the program, verify that the program number and version are correct.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


7340042  0x0070000A  NWDP LE RPC PROCUNAVAIL

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The function requested is not supported by the version of the NDPS system component that is being addressed.

Possible Cause

A mismatch between the client and server components of NDPS exists.

Action

Verify that the latest NDPS components are installed on both the client and server.

Possible Cause

The implementation of the NDPS component that is being addressed does not support the requested function.

Action

Contact a Novell support provider.

If you are debugging the program, verify that the program number and version are correct.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


7340043  0x0070000B  NWDP LE RPC CANTDECODEARGS

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

The NDPS system component is unable to decode the request that it received.

Possible Cause

A mismatched version of NDPS exists on the client or server.

Action

Verify that the client and server have the latest version of NDPS.

Possible Cause

Packet corruption has occurred.

Action

Verify that the network is functioning properly.

Possible Cause

An internal NDPS error occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


7340044  0x0070000C  NWDP LE RPC SYSTEMERROR

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

An unexpected system error has occurred.

Possible Cause

NDPS failed to initialize the transport layer because the WINSOCK.DLL or WSOCK32.DLL file cannot be found.

Action

Verify that you have the correct version of WINSOCK available in the path, the Windows** or Windows SYSTEM directory and that a correct version is being loaded.

Possible Cause

The SPX_SKTS.NLM is not loaded on the client.

Action

Verify that SPX_SKTS.NLM is loaded on the client and that it is the correct version.

Possible Cause

An internal NDPS error occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


7340048  0x00700010  NWDP LE RPC FAILED

Source

Novell* Distributed Print Services* (NDPS*), RPC

Explanation

An unexpected error occurred.

Possible Cause

An internal NDPS error occurred.

Action

If the error persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786433  0x000C0001  NWDP LE PRT NO SUCH LABEL

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

A label in the Installed Printers list cannot be found.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786434  0x000C0002  NWDP LE PRT NO DEFAULT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

No default printer has been assigned.

Action

Make sure a default printer has been assigned, and then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786436  0x000C0004  NWDP LE PRT DUPLICATE LABEL

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An attempt was made to add a printer to the Installed Printers list with a label that is already in the list.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786439  0x000C0007  NWDP LE PRT JOB CFG EXISTS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The job configuration already exists for this Installed List printer. Or a job configuration by the name specified already exists for this NDPS Printer object.

Action

Make sure the job configuration is unique, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786440  0x000C0008  NWDP LE PRT INVALID JOB CFG FMT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The job configuration is in an invalid format.

Possible Cause

The file data is unrecognizable.

Action

Make sure the syntax for the print job is correct, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786441  0x000C0009  NWDP LE PRT INTERNAL ERROR

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An internal error occurred during attempt to marshall job configurations.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786442  0x000C000A  NWDP LE PRT JOB CFG NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The requested job configuration cannot be found or no job configurations have been created for the specified printer.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786444  0x000C000C  NWDP LE PRT DEST TREE DIFFERS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The destination tree is different from the source tree.

Possible Cause

Moving jobs between trees is not currently supported by NDPS.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786446  0x000C000E  NWDP LE PRT ADDR NO LONGR VALID

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The previously valid network address for the installed printer is no longer valid.

Action

Make sure the network address is current, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786447  0x000C000F  NWDP LE PRT BAD CFG FILE VER

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Installed Printers list file is the wrong version.

Action

Make sure the configuration file contains the correct version of the shortlist, then try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786448  0x000C0010  NWDP LE PRT PO ALREADY ASSIGNED

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Printer object specified has already been assigned to the Printer Agent.

Action

Make sure the correct object is being specified, and if necessary try the task again.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786449  0x000C0011  NWDP LE PRT PO NOT ASSIGNED

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Printer object is not assigned to the Printer Agent.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786450  0x000C0012  NWDP LE PRT PA NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Printer Agent was not found.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786451  0x000C0013  NWDP LE PRT SHORTLIST NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Installed Printer list file was not found.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786452  0x000C0014  NWDP LE PRT WARNING WIN INI CHG

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The WIN.INI file has changed.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


786453  0x000C0015  NWDP LE PRT INSTALLR NOT A USER

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The person adding the NDPS Printer object to the Installed Printer List is not a user of that Printer object.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


801  0x321  NDPS W OBJECT NOT FOUND

 Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The requested object for an operation was not found.

Possible Cause

The object was not created or has been deleted.

Action

Make sure the object exists.

Possible Cause

The object ID is invalid.

Action

Make sure the object ID is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


802  0x322  NDPS W ATTRIBUTE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The requested object attribute for an operation was not found.

Possible Cause

The attribute was not created or has been deleted.

Action

Make sure the attribute exists.

Possible Cause

The ID of the attribute is invalid.

Action

Make sure the attribute ID is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


803  0x323  NDPS W VALUE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The requested object attribute value for an operation was not found.

Possible Cause

The attribute or attribute value was not created or has been deleted.

Action

Make sure the attribute or attribute value exists.

Possible Cause

The attribute ID is invalid.

Action

Make sure the attribute ID is valid.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


804  0x324  NDPS W REQUESTED SCH NOT LOADED

Source

Novell* Distributed Print Services* (NDPS*), NDPS Manager NLM* program

Explanation

The requested scheduler failed to load. The Printer Agent is using the First In First Out (FIFO) scheduler instead.

Possible Cause

The scheduler is not in the load path.

Action

Make sure the requested scheduler is in the load path and try loading it again. If the requested scheduler is in the load path but fails to load, check for an error report on the system console and error log. If possible, resolve any errors found and try the task again.

Possible Cause

The scheduler encountered a problem that prevented successful operation.

Action

If the problem persists, contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


85131270  0x05130006  NWDP EC PRT NEEDED FILE MISSING

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

A file needed to download the driver is missing.

Action

Make sure the needed file is in the specified directory.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851969  0x000D0001  NWDP LE OID INVALID ASCII

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The numbers of the form, 1.33.74.96, are expected.  Any other syntax is invalid.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851970  0x000D0002  NWDP LE OID NOT IN DATABASE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The object ID given is not in the database, and it cannot be translated to a human readable string.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851971  0x000D0003  NWDP LE OID UNSUPPORTED FORMAT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The format value given is not supported in this version of the library.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851972  0x000D0004  NWDP LE OID STRING NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The reverse string-to-object ID lookup failed.

Possible Cause

No matching string was found in the MONOID.IDX index file.

Action

Check for errors associated with the string specified such as spellings, word order, code page.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851973  0x000D0005  NWDP LE OID NO STRING THAT KIND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

Although the string exists in the MONOID.IDX as translatable to an object ID, this string’s Kind is not what was requested.  For example, if an attribute name is requested, but a value of the same name is found, then the string is found but not the right Kind.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851974  0x000D0006  NWDP LE OID MSG FILE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The OIDNAME.MSG file was not found.

Possible Cause

The OIDNAME.MSG file is not in the expected location in a language-specific subdirectory under the NLS that contains the OIDMSG.IDX file. The following areas were searched:

The current directory.

The NWLANGUAGE environment variable directory. If the NWLANGUAGE variable is set, it should contain a directory name or names which specify a language (for example, ENGLISH or FRENCH). The files are searched for in a child directory of the NLS directory as specified by the NWLANGUAGE variable. The NLS directory in this instance is itself a child directory of the load directory. (The load directory contains the current utility's .EXE file.)

The directories found under the child NLS subdirectory of the load directory.

The directories found under the sibling NLS subdirectory of the load directory.

Action

Find a current version of the message file. Then, copy it to a directory that is mapped to an existing search drive, or map a search drive to the directory containing the file.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851975  0x000D0007  NWDP LE OID MSTR IDX NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The OIDMSG.IDX file was not found.

Possible Cause

The OIDMSG.IDX file is not in the expected NLS subdirectory. The following areas were searched:

The current directory.

The NWLANGUAGE environment variable directory. If the NWLANGUAGE variable is set, it should contain a directory name or names which specify a language (for example, ENGLISH or FRENCH). The files are searched for in a child directory of the NLS directory as specified by the NWLANGUAGE variable. The NLS directory in this instance is itself a child directory of the load directory. (The load directory contains the current utility's .EXE file.)

The directories found under the child NLS subdirectory of the load directory.

The directories found under the sibling NLS subdirectory of the load directory.

Action

Find a current version of the message file. Then, copy it to a directory that is mapped to an existing search drive, or map a search drive to the directory containing the file.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851976  0x000D0008  NWDP LE OID MONOCASE NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The MONOID.IDX file was not found.

Possible Cause

The MONOID.IDX file was not in the expected location in a language-specific subdirectory under the NLS that contains the OIDMSG.IDX. The following areas were searched:

The current directory.

The NWLANGUAGE environment variable directory. If the NWLANGUAGE variable is set, it should contain a directory name or names which specify a language (for example, ENGLISH or FRENCH). The files are searched for in a child directory of the NLS directory as specified by the NWLANGUAGE variable. The NLS directory in this instance is itself a child directory of the load directory. (The load directory contains the current utility's .EXE file.)

The directories found under the child NLS subdirectory of the load directory.

The directories found under the sibling NLS subdirectory of the load directory.

Action

Find a current version of the message file. Then, copy it to a directory that is mapped to an existing search drive, or map a search drive to the directory containing the file.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851977  0x000D0009  NWDP LE OID ENUM XLAT NOT FOUND

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The translation for a specific ENUM value below the specified object ID was not found in this release of the object ID database.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851978  0x000D000A  NWDP LE OID NOT LANG CONTEXT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The Language Context ID used is not supported by this release of the library.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851982  0x000D000E  NWDP LE OID INVALID ASN1 TYPE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The first byte of an ASN.1 formatted object ID must contain a six (0x06), and the object ID given to the library routine does not conform.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851983  0x000D000F  NWDP LE OID IS OBJECT CLASS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An attempt to get Attribute Characteristics failed. The object ID in question is an Object Class.

Possible Cause

The object ID in question is not an attribute.  Attribute characteristics can only be obtained on an object ID that is an attribute.

Action

Make sure the object ID is an attribute.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851984  0x000D0010  NWDP LE OID IS VALUE CLASS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An attempt to get Attribute Characteristics failed. The OID in question is a Value Class.

Possible Cause

The object ID in question is not an attribute.  Attribute characteristics can only be obtained on an object ID that is an attribute.

Action

Make sure the object ID is an attribute.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851985  0x000D0011  NWDP LE OID IS VALUE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

An attempt to get Attribute Characteristics failed. The object ID in question is a Value.

Possible Cause

The object ID in question is not an attribute.  Attribute characteristics can only be obtained on an object ID that is an attribute.

Action

Make sure the object ID is an attribute.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


851986  0x000D0012  NWDP LE OID NO LANGUAGE PATH

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

For the given language number, no corresponding language name string exists.  No lookup is possible because the name of the directory is derived from the language name string.

Action

Contact a Novell support provider.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


85393409  0x05170001  NWDP EC PSM BOUND TO WRONG ONE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The bind for a Print Service Manager (PSM) returned the name of a different PSM than the one requested.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


85458945  0x05180001  NWDP EC BRK BOUND TO WRONG ONE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The bind for the Broker returned the name of a different Broker than the one requested.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


85458946  0x05180002  NWDP EC RES BOUND TO WRONG ONE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The bind for the Resource Manager returned the name of a different Broker than the one requested.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


85458947  0x05180003  NWDP EC SRS BOUND TO WRONG ONE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The bind for the Service Registry returned the name of a different Broker than the one requested.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


85458948  0x05180004  NWDP EC NTFY BOUND TO WRONG ONE

 Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The bind for the Notification returned the name of a different Broker than the one requested.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


917505  0x000E0001  NWDP LE TIRPC TRANSPORT UNSUP

Source

Novell Distributed Print Services (NDPS)

Explanation

An attempt to establish a connection with an NDPS entity failed, because an address was specified using an unsupported transport type.

Possible Cause

The requested transportation protocol stack is not loaded on the computer where the error occurred.

Action

Verify that the requested protocol is loaded and that it is supported by NDPS.

Possible Cause

A protocol that is not supported by NDPS was requested.

Action

If you are debugging the program, verify that the address and netconfig parameters are correct.


983041  0x000F0001  NWDP LE MODB NO SUCH OBJECT

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The object cannot be found in the Managed Objects Database.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


983042  0x000F0002  NWDP LE MODB NO SUCH ATTRIBUTE

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The attribute cannot be found on the Managed Objects Database object.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


983043  0x000F0003  NWDP LE MODB OBJ ALREADY EXISTS

Source

Novell* Distributed Print Services* (NDPS*), Library Error

Explanation

The object already exists in the Managed Objects Database.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Authentication Keys

NetWare 4 authentication uses a Public Key Encryption system that is virtually unbreakable. It consists of a private key and a public key. The keys are strings of numbers used in complex mathematical functions.

The workstation uses a private key to encode messages sent to the NetWare server. The server then uses a public key to decode the messages. The server knows that the workstation sent it because the workstation's private key is required to encode the message.

Neither the two keys nor the user's password are ever sent across the network.


File Server Error Codes

Overview

0x000F  DOS INVALID DRIVE

0x8800  ALREADY ATTACHED

0x8800  VLM ERROR

0x8801  CONN INVALID

0x8802  DRIVE IN USE

0x8803  DRIVE CANNOT MAP

0x8804  DRIVE BAD PATH

0x8805  NET RECEIVE

0x8806  NET UNKNOWN

0x8807  SERVER BAD SLOT

0x8808  SERVER NO SLOTS

0x8809  NET SEND

0x880A  SERVER NO ROUTE

0x880B  BAD LOCAL TARGET

0x880C  REQ TOO MANY REQ FRAGS

0x880D  CONN LIST OVERFLOW

0x880E  BUFFER OVERFLOW

0x880F  SERVER NO CONN

0x8810  NO ROUTER FOUND

0x8811  FUNCTION INVALID

0x8812  LIP RESIZE ERROR

0x8812  SCAN COMPLETE

0x8813  INVALID DIR HANDLE

0x8813  UNSUPPORTED NAME FORMAT TYP

0x8814  HANDLE ALREADY LICENSED

0x8814  OUT OF CLIENT MEMORY

0x8815  HANDLE ALREADY UNLICENSED

0x8815  PATH NOT OURS

0x8816  INVALID NCP PACKET LENGTH

0x8816  PATH IS PRINT DEVICE

0x8817  PATH IS EXCLUDED DEVICE

0x8817  SETTING UP TIMEOUT

0x8818  PATH IS INVALID

0x8818  SETTING SIGNALS

0x8819  NOT SAME DEVICE

0x8819  SERVER CONNECTION LOST

0x881A  OUT OF HEAP SPACE

0x881B  INVALID SEARCH HANDLE

0x881B  INVALID SERVICE REQUEST

0x881C  INVALID DEVICE HANDLE

0x881C  INVALID TASK NUMBER

0x881D  INVALID MESSAGE LENGTH

0x881D  INVALID SEM HANDLE

0x881E  EA SCAN DONE

0x881E  INVALID CFG HANDLE

0x881F  BAD CONNECTION NUMBER

0x881F  INVALID MOD HANDLE

0x8820  ASYN FIRST PASS

0x8820  MULT TREES NOT SUPPORTED

0x8821  INVALID DEVICE INDEX

0x8822  INVALID CONN HANDLE

0x8823  INVALID QUEUE ID

0x8824  INVALID PDEVICE HANDLE

0x8825  INVALID JOB HANDLE

0x8826  INVALID ELEMENT ID

0x8827  ALIAS NOT FOUND

0x8828  RESOURCE SUSPENDED

0x8829  INVALID QUEUE SPECIFIED

0x882A  DEVICE ALREADY OPEN

0x882B  JOB ALREADY OPEN

0x882C  QUEUE NAME ID MISMATCH

0x882D  JOB ALREADY STARTED

0x882E  SPECT DAA TYPE NOT SUPPORTED

0x882F  INVALID ENVIR HANDLE

0x8830  CONN NOT SAME

0x8831  CONN PRIMARY NOT SET

0x8832  KEYWORD NOT FOUND

0x8832  PRN CAPTURE NOT IN PROGRESS

0x8833  BUFFER INVALID LEN

0x8834  USER NO NAME

0x8835  PRN NO LOCAL SPOOLER

0x8836  PARAM INVALID

0x8837  CFG OPEN FAILED

0x8838  CFG NO FILE

0x8839  CFG READ FAILED

0x883A  CFG LINE TOO LONG

0x883B  CFG LINES IGNORED

0x883C  RESOURCE NOT OWNED

0x883D  DAEMON INSTALLED

0x883E  PRN SPOOLER INSTALLED

0x883F  CONN TABLE FULL

0x8840  CFG SECTION NOT FOUND

0x8841  TRAN INVALID TYPE

0x8842  TDS TAG IN USE

0x8843  TDS OUT OF MEMORY

0x8844  TDS INVALID TAG

0x8845  TDS WRITE TRUNCATED

0x8846  DS NO CONN

0x8846  SERVICE BUSY

0x8847  SERVER NOT FOUND

0x8848  VLM INVALID

0x8849  DRIVE ALREADY MAPPED

0x884A  DRIVE LOCAL IN USE

0x884B  DRIVE NONE AVAILABLE

0x884C  DEVICE NOT REDIRECTED

0x884D  FILE MAX REACHED

0x884E  UNLOAD FAILED

0x884F  CONN IN USE

0x8850  REQ TOO MANY REP FRAGS

0x8851  NAME TABLE FULL

0x8852  SOCKET NOT OPEN

0x8853  MEMORY MGR ERROR

0x8854  SFT3 ERROR

0x8855  DS PREFERRED NOT FOUND

0x8856  DEVICE NOT RECOGNIZED

0x8857  NET INVALID TYPE

0x8858  FILE OPEN FAILED

0x8859  DS PREFERRED NOT SPECIFIED

0x885A  REQUESTER FAILURE

0x885A  SOCKET OPEN FAILED

0x885B  RESOURCE ACCESS DENIED

0x8861  SIGNATURE LEVEL CONFLICT

0x8862  NO LOCK FOUND

0x8863  LOCK TABLE FULL

0x8864  INVALID MATCH DATA

0x8865  MATCH FAILED

0x8866  NO MORE ENTRIES

0x8867  INSUFFICIENT RESOURCES

0x8867  INSUFFICIENT SPACE

0x8868  STRING TRANSLATION

0x8869  ACCESS VIOLATION

0x886A  NOT AUTHENTICATED

0x886B  INVALID LEVEL

0x886C  RESOURCE LOCK

0x886D  INVALID NAME FORMAT

0x886E  UNSUPPORTED AUTHENTICATOR

0x8874  IO PENDING

0x8875  INVALID DRIVE NUMBER

0x8880  SVC ALREADY REGISTERED

0x8881  SVC REGISTRY FULL

0x8882  SVC NOT REGISTERED

0x8883  OUT OF RESOURCES

0x8884  RESOLVE SVC FAILED

0x8885  CONNECT FAILED

0x8886  PROTOCOL NOT BOUND

0x8887  AUTHENTICATION FAILED

0x8888  INVALID AUTHEN HANDLE

0x8889  AUTHEN HANDLE ALREADY EXISTS

0x8890  DIFF OBJECT ALREADY AUTHEN

0x8891  REQUEST NOT SERVICEABLE

0x8892  AUTO RECONNECT SO REBUILD

0x8893  AUTO RECONNECT RETRY REQUEST

0x8894  ASYNC REQUEST IN USE

0x8895  ASYNC REQUEST CANCELED

0x8896  SESS SVC ALREADY REGISTERED

0x8897  SESS SVC NOT REGISTERED

0x8899  PREVIOUSLY AUTHENTICATED

0x889A  RESOLVE SVC PARTIAL

0x889B  NO DEFAULT SPECIFIED

0x889C  HOOK REQUEST NOT HANDLED

0x889D  HOOK REQUEST BUSY

0x889E  AUTO RECONNECT SO IGNORE

0x889F  ASYNC REQUEST NOT IN USE

0x88A0  AUTO RECONNECT FAILURE

0x88A1  ERROR ABORT APPLICATION

0x88A2  ERROR SUSPEND APPLICATION

0x88A3  ERROR ABORTED PROCESS GROUP

0x88A5  ERROR PASSWORD HAS EXPIRED

0x88A6  ERROR NETWORK INACTIVE

0x88FF  REQUESTER FAILURE

0x8977  BUFFER TOO SMALL

0x8978  VOL FLAG NOT SET

0x8979  NO ITEMS FOUND

0x897A  CONN ALREADY TEMP

0x897B  CONN ALREADY LOGGED IN

0x897C  CONN NOT AUTHENTICATED

0x897D  CONN NOT LOGGED IN

0x897E  NCP BOUNDARY CHECK FAILED

0x897F  LOCK WAITING

0x8980  FILE IN USE

0x8980  LOCK FAIL

0x8981  FILE NO HANDLES

0x8982  FILE NO OPEN PRIV

0x8983  DISK IO ERROR

0x8984  FILE NO CREATE PRIV

0x8985  FILE NO CREATE DEL PRIV

0x8986  DIR TARGET INVALID

0x8986  FILE EXISTS READ ONLY

0x8987  FILE WILD CARDS IN NAME

0x8988  FILE INVALID HANDLE

0x8989  FILE NO SRCH PRIV

0x898A  FILE NO DEL PRIV

0x898B  FILE NO RENAME PRIV

0x898C  FILE NO MOD PRIV

0x898D  FILE SOME IN USE

0x898E  FILE NONE IN USE

0x898F  FILE SOME READ ONLY

0x8990  FILE NONE READ ONLY

0x8991  FILE SOME RENAMED EXIST

0x8992  FILE NONE RENAMED EXIST

0x8993  FILE NO READ PRIV

0x8994  FILE NO WRITE PRIV

0x8994  FILE READ ONLY

0x8995  FILE DETACHED

0x8996  SERVER OUT OF MEMORY

0x8997  DISK NO SPOOL SPACE

0x8998  VOL INVALID

0x8999  DIR FULL

0x899A  VOL RENAMING ACROSS

0x899B  DIRHANDLE INVALID

0x899C  PATH INVALID

0x899C  TRUSTEES NO MORE

0x899C  INSUFFICIENT RIGHTS INVALID PATH

0x899D  DIRHANDLE NO MORE

0x899E  FILE NAME INVALID

0x899F  DIR ACTIVE

0x89A0  DIR NOT EMPTY

0x89A1  DIR IO ERROR

0x89A2  FILE IO LOCKED

0x89A3  TTS TRANSACTION RESTARTED

0x89A3  TRANSACTION RESTARTED

0x89A3  TTS RANSACTION RESTARTED

0x89A4  DIR RENAME INVALID

0x89A5  FILE OPENCREAT MODE INVALID

0x89A6  ALREADY IN USE

0x89A7  RESOURCE TAG INVALID

0x89A8  ACCESS DENIED

0x89BE  DATA STREAM INVALID

0x89BF  NAME SPACE INVALID

0x89C0  ACCTING NO PRIV

0x89C1  ACCTING NO BALANCE

0x89C2  ACCTING NO CREDIT

0x89C3  ACCTING TOO MANY HOLDS

0x89C4  ACCTING DISABLED

0x89C5  LOGIN LOCKOUT

0x89C6  CONSOLE NO PRIV

0x89D0  Q IO FAILURE

0x89D1  Q NONE

0x89D2  Q NO SERVER

0x89D3  Q NO RIGHTS

0x89D4  Q FULL

0x89D5  Q NO JOB

0x89D6  PASSWORD UNENCRYPTED

0x89D6  Q NO JOB RIGHTS

0x89D7  PASSWORD NOT UNIQUE

0x89D7  Q IN SERVICE

0x89D8  PASSWORD TOO SHORT

0x89D8  Q NOT ACTIVE

0x89D9  LOGIN MAX EXCEEDED

0x89D9  LOGIN NO CONN

0x89D9  Q STN NOT SERVER

0x89DA  LOGIN UNAUTHORIZED TIME

0x89DA  Q HALTED

0x89DB  LOGIN UNAUTHORIZED STATION

0x89DB  Q MAX SERVERS

0x89DC  ACCT DISABLED

0x89DE  PASSWORD INVALID

0x89DF  PASSWORD EXPIRED

0x89E0  LOGIN NO CONN AVAIL

0x89E7  E NO MORE USERS

0x89E8  BIND NOT ITEM PROP

0x89E8  BIND WRITE TO GROUP PROP

0x89E9  BIND MEMBER ALREADY EXISTS

0x89EA  BIND NO SUCH MEMBER

0x89EB  BIND NOT GROUP PROP

0x89EC  BIND NO SUCH SEGMENT

0x89ED  BIND PROP ALREADY EXISTS

0x89EE  BIND OBJ ALREADY EXISTS

0x89EF  BIND NAME INVALID

0x89F0  BIND WILDCARD INVALID

0x89F1  BIND SECURITY INVALID

0x89F2  BIND OBJ NO READ PRIV

0x89F3  BIND OBJ NO RENAME PRIV

0x89F4  BIND OBJ NO DELETE PRIV

0x89F5  BIND OBJ NO CREATE PRIV

0x89F6  BIND PROP NO DELETE PRIV

0x89F7  BIND PROP NO CREATE PRIV

0x89F8  BIND PROP NO WRITE PRIV

0x89F9  BIND PROP NO READ PRIV

0x89F9  NO FREE CONN SLOTS

0x89FA  NO MORE SERVER SLOTS

0x89FA  TEMP REMAP ERROR

0x89FB  BIND NO SUCH PROP

0x89FB  NCP NOT SUPPORTED

0x89FB  PARAMETERS INVALID

0x89FC  BIND NO SUCH OBJ

0x89FC  INET PACKET REQ CANCELED

0x89FC  MSG Q FULL

0x89FC  SERVER UNKNOWN

0x89FD  CONN NUM INVALID

0x89FD  LOCK COLLISION

0x89FD  PACKET LEN INVALID

0x89FD  UNKNOWN REQ

0x89FE  BIND LOCKED

0x89FE  DIR LOCKED

0x89FE  LOGIN DISABLED BY SUPER

0x89FE  PACKET NOT DELIVERABLE

0x89FE  SEM INVALID NAME LEN

0x89FE  SOCKET TABLE FULL

0x89FE  SPOOL DIR ERROR

0x89FE  TIMEOUT FAILURE

0x89FE  TRUSTEE NOT FOUND

0x89FF  BAD RECORD OFFSET

0x89FF  BAD SPOOL PRINTER

0x89FF  DRIVE INVALID NUM

0x89FF  FAILURE

0x89FF  FCB CLOSE

0x89FF  FILE EXT

0x89FF  FILE NAME

0x89FF  HARD FAILURE

0x89FF  IO BOUND

0x89FF  LOCK ERROR

0x89FF  NO FILES FOUND ERROR

0x89FF  NO OBJ OR BAD PASSWORD

0x89FF  NO RESPONSE FROM SERVER

0x89FF  PATH NOT LOCATABLE

0x89FF  Q FULL ERROR

0x89FF  REQ NOT OUTSTANDING

0x89FF  SEM INVALID HANDLE

0x89FF  SEM INVALID INIT VAL

0x89FF  SOCKET ALREADY OPEN


How can I find information associated with an error code?

The topics in NetWare* Error Codes Help are organized by a decimal or hexadecimal code.

You can browse the navigation lists that are sorted numerically.

You can search for information by the error code number using  Search  in Windows** 3x or Find in Windows 95**.

Some error codes have several possible causes. While searching, if you see an error code that is associated with a topic Multiple Causes, choose this topic. This topic will list all the causes for that error code and link you to the associated topics with the explanations and actions for each cause.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Monitoring and Repairing NDS error codes
Monitoring and Repairing NDS Errors

NetWare* provides you with the following tools to monitor and repair error conditions with Novell* Directory Services* (NDS):

The NDS* Manager utility. Provides partitioning and replication services for the NDS database on a NetWare server. It also provides repair capabilities for repairing the database from a client workstation, which alleviates the network administrator's total dependence on working from the server console.

The DSREPAIR utility. Allows you to work from the server console to monitor and repair problems with the Directory database on a single-server basis. It does not correct problems on other servers from a single, centralized location. It must be run on each server that you want to correct Directory database errors on.

The DSTRACE utility. Allows you to work from the server console to diagnose NDS errors. These errors might appear when you are manipulating NDS objects with the administration utilities. NDS errors also show up on the DSTRACE screen.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


NCPX Error Codes

Overview

0x6C 108 BAD ACCESS

0x7D 125 CONNECTION NOT LOGGED IN

0x8A  138 NO DELETE PRIVILEGES

0x96 150 SERVER OUT OF MEMORY

0xC0 192 NO ACCOUNT PRIVILEGES

0xFE 254 NCPEXT NO HANDLER

0xFF 255 NO RESPONSE FROM SERVER


NDS Error Codes

Overview

-001  FFFFFFFFF  INSUFFICIENT SPACE

-119  FFFFFFF89  BUFFER TOO SMALL

-120  FFFFFFF88  VOLUME FLAG NOT SET

-121  FFFFFFF87  NO ITEMS FOUND

-122  FFFFFFF86  CONN ALREADY TEMPORARY

-123  FFFFFFF85  CONN ALREADY LOGGED IN

-124  FFFFFFF84  CONN NOT AUTHENTICATED

-125  FFFFFFF83  CONN NOT LOGGED IN

-126  FFFFFFF82  NCP BOUNDARY CHECK FAILED

-127  FFFFFFF81  LOCK WAITING

-128  FFFFFFF80  LOCK FAIL

-129  FFFFFFF7F  OUT OF HANDLES

-130  FFFFFFF7E  NO OPEN PRIVILEGE

-131  FFFFFFF7D  HARD IO ERROR

-132  FFFFFFF7C  NO CREATE PRIVILEGE

-133  FFFFFFF7B  NO CREATE DELETE PRIV

-134  FFFFFFF7A  R O CREATE FILE

-135  FFFFFFF79  CREATE FILE INVALID NAME

-136  FFFFFFF78  INVALID FILE HANDLE

-137  FFFFFFF77  NO SEARCH PRIVILEGE

-138  FFFFFFF76  NO DELETE PRIVILEGE

-139  FFFFFFF75  NO RENAME PRIVILEGE

-140  FFFFFFF74  NO SET PRIVILEGE

-141  FFFFFFF73  SOME FILES IN USE

-142  FFFFFFF72  ALL FILES IN USE

-143  FFFFFFF71  SOME READ ONLY

-144  FFFFFFF70  ALL READ ONLY

-145  FFFFFFF6F  SOME NAMES EXIST

-146  FFFFFFF6E  ALL NAMES EXIST

-147  FFFFFFF6D  NO READ PRIVILEGE

-148  FFFFFFF6C  NO WRITE PRIVILEGE

-149  FFFFFFF6B  FILE DETACHED

-150  FFFFFFF6A  INSUFFICIENT MEMORY

-150  FFFFFFF6A  NO ALLOC SPACE

-150  FFFFFFF6A  TARGET NOT A SUBDIR

-151  FFFFFFF69  NO SPOOL SPACE

-152  FFFFFFF68  INVALID VOLUME

-153  FFFFFFF67  DIRECTORY FULL

-154  FFFFFFF66  RENAME ACROSS VOLUME

-155  FFFFFFF65  BAD DIR HANDLE

-156  FFFFFFF64  INVALID PATH

-156  FFFFFFF64  NO SUCH EXTENSION

-157  FFFFFFF63  NO DIR HANDLES

-158  FFFFFFF62  BAD FILE NAME

-159  FFFFFFF61  DIRECTORY ACTIVE

-160  FFFFFFF60  DIRECTORY NOT EMPTY

-161  FFFFFFF5F  DIRECTORY IO ERROR

-162  FFFFFFF5E  IO LOCKED

-163  FFFFFFF5D  TRANSACTION RESTARTED

-164  FFFFFFF5C  RENAME DIR INVALID

-165  FFFFFFF5B  INVALID OPENCREATE MODE

-166  FFFFFFF5A  ALREADY IN USE

-167  FFFFFFF59  INVALID RESOURCE TAG

-168  FFFFFFF58  ACCESS DENIED

-190  FFFFFFF42  INVALID DATA STREAM

-191  FFFFFFF41  INVALID NAME SPACE

-192  FFFFFFF40  NO ACCOUNTING PRIVILEGES

-193  FFFFFFF3F  NO ACCOUNT BALANCE

-194  FFFFFFF3E  CREDIT LIMIT EXCEEDED

-195  FFFFFFF3D  TOO MANY HOLDS

-196  FFFFFFF3C  ACCOUNTING DISABLED

-197  FFFFFFF3B  LOGIN LOCKOUT

-198  FFFFFFF3A  NO CONSOLE RIGHTS

-208  FFFFFFF30  Q IO FAILURE

-209  FFFFFFF2F  NO QUEUE

-210  FFFFFFF2E  NO Q SERVER

-211  FFFFFFF2D  NO Q RIGHTS

-212  FFFFFFF2C  Q FULL

-213  FFFFFFF2B  NO Q JOB

-214  FFFFFFF2A  NO Q JOB RIGHTS

-214  FFFFFFF2A  UNENCRYPTED NOT ALLOWED

-215  FFFFFFF29  DUPLICATE PASSWORD

-215  FFFFFFF29  Q IN SERVICE

-216  FFFFFFF28  PASSWORD TOO SHORT

-216  FFFFFFF28  Q NOT ACTIVE

-217  FFFFFFF27  MAXIMUM LOGINS EXCEEDED

-217  FFFFFFF27  Q STN NOT SERVER

-218  FFFFFFF26  BAD LOGIN TIME

-218  FFFFFFF26  Q HALTED

-219  FFFFFFF25  NODE ADDRESS VIOLATION

-219  FFFFFFF25  Q MAX SERVERS

-220  FFFFFFF24  LOG ACCOUNT EXPIRED

-222  FFFFFFF22  BAD PASSWORD

-223  FFFFFFF21  PASSWORD EXPIRED

-224  FFFFFFF20  NO LOGIN CONN AVAILABLE

-232  FFFFFFF18  WRITE TO GROUP PROPERTY

-233  FFFFFFF17  MEMBER ALREADY EXISTS

-234  FFFFFFF16  NO SUCH MEMBER

-235  FFFFFFF15  PROPERTY NOT GROUP

-236  FFFFFFF14  NO SUCH VALUE SET

-237  FFFFFFF13  PROPERTY ALREADY EXISTS

-238  FFFFFFF12  OBJECT ALREADY EXISTS

-239  FFFFFFF11  ILLEGAL NAME

-240  FFFFFFF10  ILLEGAL WILDCARD

-241  FFFFFFF0F  BINDERY SECURITY

-242  FFFFFFF0E  NO OBJECT READ RIGHTS

-243  FFFFFFF0D  NO OBJECT RENAME RIGHTS

-244  FFFFFFF0C  NO OBJECT DELETE RIGHTS

-245  FFFFFFF0B  NO OBJECT CREATE RIGHTS

-246  FFFFFFF0A  NO PROPERTY DELETE RIGHTS

-247  FFFFFFF09  NO PROPERTY CREATE RIGHTS

-248  FFFFFFF08  NO PROPERTY WRITE RIGHTS

-249  FFFFFFF07  NO PROPERTY READ RIGHTS

-250  FFFFFFF06  TEMP REMAP

-251  FFFFFFF05  NO SUCH PROPERTY

-251  FFFFFFF05  UNKNOWN REQUEST

-252  FFFFFFF04  MESSAGE QUEUE FULL

-252  FFFFFFF04  NO SUCH OBJECT

-252  FFFFFFF04  TARGET ALREADY HAS MSG

-253  FFFFFFF03  BAD STATION NUMBER

-254  FFFFFFF02  BINDERY LOCKED

-254  FFFFFFF02  DIR LOCKED

-254  FFFFFFF02  SPOOL DELETE

-254  FFFFFFF02  TRUSTEE NOT FOUND

-254  FFFFFFF02  LOGIN DISABLED

-255  FFFFFFF01  BAD PARAMETER

-255  FFFFFFF01  BAD SPOOL PRINTER

-255  FFFFFFF01  CLOSE FCB

-255  FFFFFFF01  ERR OF SOME SORT

-255  FFFFFFF01  FILE EXISTS

-255  FFFFFFF01  FILE NAME

-255  FFFFFFF01  HARD FAILURE

-255  FFFFFFF01  IO BOUND

-255  FFFFFFF01  MUST FORCE DOWN

-255  FFFFFFF01  NO FILES FOUND

-255  FFFFFFF01  NO SPOOL FILE

-255  FFFFFFF01  NO TRUSTEE CHANGE PRIV

-255  FFFFFFF01  TARGET NOT ACCEPTING MSGS

-255  FFFFFFF01  TARGET NOT LOGGED IN

-301  FFFFFFED3  NOT ENOUGH MEMORY

-302  FFFFFFED2  BAD KEY

-303  FFFFFFED1  BAD CONTEXT

-304  FFFFFFED0  BUFFER FULL

-305  FFFFFFECF  LIST EMPTY

-306  FFFFFFECE  BAD SYNTAX

-307  FFFFFFECD  BUFFER EMPTY

-308  FFFFFFECC  BAD VERB

-309  FFFFFFECB  EXPECTED IDENTIFIER

-310  FFFFFFECA  EXPECTED EQUALS

-311  FFFFFFEC9  ATTR TYPE EXPECTED

-312  FFFFFFEC8  ATTR TYPE NOT EXPECTED

-313  FFFFFFEC7  FILTER TREE EMPTY

-314  FFFFFFEC6  INVALID OBJECT NAME

-315  FFFFFFEC6  EXPECTED RDN DELIMITER

-316  FFFFFFEC5  TOO MANY TOKENS

-317  FFFFFFEC3  INCONSISTENT MULTIAVA

-318  FFFFFFEC2  COUNTRY NAME TOO LONG

-319  FFFFFFEC1  SYSTEM ERROR

-320  FFFFFFEC0  CANT ADD ROOT

-321  FFFFFFEBF  UNABLE TO ATTACH

-322  FFFFFFEBE  INVALID HANDLE

-323  FFFFFFEBD  BUFFER ZERO LENGTH

-324  FFFFFFEBC  INVALID REPLICA TYPE

-325  FFFFFFEBB  INVALID ATTR SYNTAX

-326  FFFFFFEBA  INVALID FILTER SYNTAX

-328  FFFFFFEB8  CONTEXT CREATION

-329  FFFFFFEB7  INVALID UNION TAG

-330  FFFFFFEB6  INVALID SERVER RESPONSE

-331  FFFFFFEB5  NULL POINTER

-332  FFFFFFEB5  NO SERVER FOUND

-333  FFFFFFEB3  NO CONNECTION

-334  FFFFFFEB2  RDN TOO LONG

-335  FFFFFFEB1  DUPLICATE TYPE

-336  FFFFFFEB0  DATA STORE FAILURE

-337  FFFFFFEAF  NOT LOGGED IN

-338  FFFFFFEAE  INVALID PASSWORD CHARS

-339  FFFFFFEAD  FAILED SERVER AUTHENT

-340  FFFFFFEAC  TRANSPORT

-341  FFFFFFEAB  NO SUCH SYNTAX

-342  FFFFFFEAA  INVALID DS NAME

-343  FFFFFFEA9  ATTR NAME TOO LONG

-344  FFFFFFEA8  INVALID TDS

-345  FFFFFFEA7  INVALID DS VERSION

-346  FFFFFFEA6  UNICODE TRANSLATION

-347  FFFFFFEAS  SCHEMA NAME TOO LONG

-348  FFFFFFEA4  UNICODE FILE NOT FOUND

-349  FFFFFFEA3  UNICODE ALREADY LOADED

-350  FFFFFFEA2  NOT CONTEXT OWNER

-351  FFFFFFEA1  ATTEMPT TO AUTHENTICATE 0

-352  FFFFFFEA0  NO WRITABLE REPLICAS

-353  FFFFFFE9F  DN TOO LONG

-354  FFFFFFE9E  RENAME NOT ALLOWED

-489  FFFFFFE17  UNI ALREADY LOADED

-490  FFFFFFE16  UNI  FUTURE OPCODE

-491  FFFFFFE15  UNI NO SUCH FILE

-492  FFFFFFE14  UNI TOO MANY FILES

-493  FFFFFFE13  UNI NO PERMISSION

-494  FFFFFFE12  UNI NO MEMORY

-495  FFFFFFE11  UNI LOAD FAILED

-496  FFFFFFE10  UNI HANDLE BAD

-497  FFFFFFE0F  UNI HANDLE MISMATCH

-498  FFFFFFE0E  UNI RULES CORRUPT

-499  FFFFFFE0D  UNI NO DEFAULT

-500  FFFFFFE0C  UNI INSUFFICIENT BUFFER

-501  FFFFFFE0B  UNI OPEN FAILED

-502  FFFFFFE0A  UNI NO LOAD DIR

-503  FFFFFFE09  UNI BAD FILE HANDLE

-504  FFFFFFE08  UNI READ FAILED

-505  FFFFFFE07  UNI TRANS CORRUPT

-601  FFFFFFDA7  NO SUCH ENTRY

-602  FFFFFFDA6  NO SUCH VALUE

-603  FFFFFFDA5  NO SUCH ATTRIBUTE

-604  FFFFFFDA4  NO SUCH CLASS

-605  FFFFFFDA3  NO SUCH PARTITION

-606  FFFFFFDA2  ENTRY ALREADY EXISTS

-607  FFFFFFDA1  NOT EFFECTIVE CLASS

-608  FFFFFFDA0  ILLEGAL ATTRIBUTE

-609  FFFFFFD9F  MISSING MANDATORY

-610  FFFFFFD9E  ILLEGAL DS NAME

-611  FFFFFFD9D  ILLEGAL CONTAINMENT

-612  FFFFFFD9C  CANT HAVE MULTIPLE VALUES

-613  FFFFFFD9B  SYNTAX VIOLATION

-614  FFFFFFD9A  DUPLICATE VALUE

-615  FFFFFFD99  ATTRIBUTE ALREADY EXISTS

-616  FFFFFFD98  MAXIMUM ENTRIES EXIST

-617  FFFFFFD97  DATABASE FORMAT

-618  FFFFFFD96  INCONSISTENT DATABASE

-619  FFFFFFD95  INVALID COMPARISON

-620  FFFFFFD94  COMPARISON FAILED

-621  FFFFFFD93  TRANSACTIONS DISABLED

-622  FFFFFFD92  INVALID TRANSPORT

-623  FFFFFFD91  SYNTAX INVALID IN NAME

-624  FFFFFFD90  REPLICA ALREADY EXISTS

-625  FFFFFFD8F  TRANSPORT FAILURE

-626  FFFFFFD8E  ALL REFERRALS FAILED

-627  FFFFFFD8D  CANT REMOVE NAMING VALUE

-628  FFFFFFD8C  OBJECT CLASS VIOLATION

-629  FFFFFFD8B  ENTRY IS NOT LEAF

-630  FFFFFFD8A  DIFFERENT TREE

-631  FFFFFFD89  ILLEGAL REPLICA TYPE

-632  FFFFFFD88  SYSTEM FAILURE

-633  FFFFFFD87  INVALID ENTRY FOR ROOT

-634  FFFFFFD86  NO REFERRALS

-635  FFFFFFD85  REMOTE FAILURE

-636  FFFFFFD84  UNREACHABLE SERVER

-637  FFFFFFD83  PREVIOUS MOVE IN PROGRESS

-638  FFFFFFD82  NO CHARACTER MAPPING

-639  FFFFFFD81  INCOMPLETE AUTHENTICATION

-640  FFFFFFD80  INVALID CERTIFICATE

-641  FFFFFFD7F  INVALID REQUEST

-642  FFFFFFD7E  INVALID ITERATION

-643  FFFFFFD7D  SCHEMA IS NONREMOVABLE

-644  FFFFFFD7C  SCHEMA IS IN USE

-645  FFFFFFD7B  CLASS ALREADY EXISTS

-646 F FFFFFD7A  BAD NAMING ATTRIBUTES

-647  FFFFFFD79  NOT ROOT PARTITION

-648  FFFFFFD78  INSUFFICIENT STACK

-649  FFFFFFD77  INSUFFICIENT BUFFER

-650  FFFFFFD76  AMBIGUOUS CONTAINMENT

-651  FFFFFFD75  AMBIGUOUS NAMING

-652  FFFFFFD74  DUPLICATE MANDATORY

-653  FFFFFFD73  DUPLICATE OPTIONAL

-654  FFFFFFD72  PARTITION BUSY

-655  FFFFFFD71  MULTIPLE REPLICAS

-656  FFFFFFD70  CRUCIAL REPLICA

-657  FFFFFFD6F  SCHEMA SYNC IN PROGRESS

-658  FFFFFFD6E  SKULK IN PROGRESS

-659  FFFFFFD6D  TIME NOT SYNCHRONIZED

-660  FFFFFFD6C  RECORD IN USE

-661  FFFFFFD6B  DS VOLUME NOT MOUNTED

-662  FFFFFFD6A  DS VOLUME IO FAILURE

-663  FFFFFFD69  DS LOCKED

-664  FFFFFFD68  OLD EPOCH

-665  FFFFFFD67  NEW EPOCH

-666  FFFFFFD66  INCOMPATIBLE DS VERSION

-667  FFFFFFD65  PARTITION ROOT

-668  FFFFFFD64  ENTRY NOT CONTAINER

-669  FFFFFFD63  FAILED AUTHENTICATION

-670  FFFFFFD62  INVALID CONTEXT

-671  FFFFFFD61  NO SUCH PARENT

-672  FFFFFFD60  NO ACCESS

-673  FFFFFFD5F  REPLICA NOT ON

-674  FFFFFFD5E  INVALID NAME SERVICE

-675  FFFFFFD5D  INVALID TASK

-676  FFFFFFD5C  INVALID CONN HANDLE

-677  FFFFFFD5B  INVALID IDENTITY

-678  FFFFFFD5A  DUPLICATE ACL

-679  FFFFFFD59  PARTITION ALREADY EXISTS

-680  FFFFFFD58  TRANSPORT MODIFIED

-681  FFFFFFD57  ALIAS OF AN ALIAS

-682  FFFFFFD56  AUDITING FAILED

-683  FFFFFFD55  INVALID API VERSION

-684  FFFFFFD54  SECURE NCP VIOLATION

-685  FFFFFFD53  MOVE IN PROGRESS

-686  FFFFFFD52  NOT LEAF PARTITION

-687  FFFFFFD51  CANNOT ABORT

-688  FFFFFFD50  CACHE OVERFLOW

-689  FFFFFFD4F  INVALID SUBORDINATE COUNT

-690  FFFFFFD4E  INVALID RDN

-691  FFFFFFD4D  MOD TIME NOT CURRENT

-692  FFFFFFD4C  INCORRECT BASE CLASS

-693  FFFFFFD4B  MISSING REFERENCE

-694  FFFFFFD4A  LOST ENTRY

-695  FFFFFFD49  AGENT ALREADY REGISTERED

-696  FFFFFFD48  DS LOADER BUSY

-697  FFFFFFD47  DS CANNOT RELOAD

-698  FFFFFFD46  REPLICA IN SKULK

-699  FFFFFFD45  FATAL

-700  FFFFFFD44  OBSOLETE API

-701  FFFFFFD43  SYNCHRONIZATION DISABLED

-702  FFFFFFD42  INVALID PARAMETER

-703  FFFFFFD41  DUPLICATE TEMPLATE

-704  FFFFFFD40  NO MASTER REPLICA

-705  FFFFFFD3F  DUPLICATE CONTAINMENT

-706  FFFFFFD3E  NOT SIBLING

-707  FFFFFFD3D  INVALID SIGNATURE

-708  FFFFFFD3C  INVALID RESPONSE

-709  FFFFFFD3B  INSUFFICIENT SOCKETS

-710  FFFFFFD3A  DATABASE READ FAIL

-711  FFFFFFD39  INVALID CODE PAGE

-712  FFFFFFD38  INVALID ESCAPE CHAR

-713  FFFFFFD37  INVALID DELIMITERS

-714  FFFFFFD36  NOT IMPLEMENTED

-715  FFFFFFD35  CHECKSUM FAILURE

-716  FFFFFFD34  CHECKSUMMING NOT SUPPORTED

-717  FFFFFFD33  CRC FAILURE


NetWare Error Codes

Overview

What is a NetWare Error Code?

How can I find information associated with an error code?

Novell Directory Services Error Codes

Overview

List of Codes

List of Tools for Monitoring and Repairing NDS

File Server Error Codes

Overview

List of Codes

NDPS Error Codes

Overview

List of codes

NCPX Error Codes

Overview

List of Codes

Reference

Trademarks


Novell Distributed Print Services (NDPS) Error Codes

-801  0xFFFFFCDF  NDPS E NO MEMORY

-803  0xFFFFFCDD  NDPS E JOB STORAGE LIMIT

-804  0xFFFFFCDC  NDPS E JOB RETENTION LIMIT

-805  0xFFFFFCDB  NDPS E UNSUPPORTED TYPE

-806  0xFFFFFCDA  NDPS E UNDEFINED TYPE

-807  0xFFFFFCD9  NDPS E UNSUPPORTED OP

-809  0xFFFFFCD7  NDPS E NO PDS

-810  0xFFFFFCD6  NDPS E INVALID CLASS

-811  0xFFFFFCD5  NDPS E BAD PARAMETER

-812  0xFFFFFCD4  NDPS E OBJECT NOT FOUND

-813  0xFFFFFCD3  NDPS E ATTRIBUTE NOT FOUND

-814  0xFFFFFCD2  NDPS E VALUE NOT FOUND

-815  0xFFFFFCD1  NDPS E VALUES NOT COMPARABLE

-816  0xFFFFFCD0  NDPS E INVALID VALUE SYNTAX

-817  0xFFFFFCCF  NDPS E JOB NOT FOUND

-818  0xFFFFFCCE  NDPS E COMMUNICATION

-819  0xFFFFFCCD  NDPS E PA INITIALIZING

-820  0xFFFFFCCC  NDPS E PA GOING DOWN

-821  0xFFFFFCCB  NDPS E PA DISABLED

-822  0xFFFFFCCA  NDPS E PA PAUSED

-823  0xFFFFFCC9  NDPS E BAD PA HANDLE

-824  0xFFFFFCC8  NDPS E OBJECT NOT LOCKED

-826  0xFFFFFCC6  NDPS E PSM INITIALIZING

-827  0xFFFFFCC5  NDPS E PSM GOING DOWN

-828  0xFFFFFCC4  NDPS E NOTIF SVC ERROR

-829  0xFFFFFCC3  NDPS E MEDIUM NEEDS MOUNTED

-830  0xFFFFFCC2  NDPS E PDS NOT RESPONDING

-831  0xFFFFFCC1  NDPS E SESSION NOT FOUND

-832  0xFFFFFCC0  NDPS E RPC FAILURE

-833  0xFFFFFCBF  NDPS E DUPLICATE VALUE

-834  0xFFFFFCBE  NDPS E PDS REFUSES RENAME

-836  0xFFFFFCBC  NDPS E ALREADY ATTACHED

-837  0xFFFFFCBB  NDPS E CANT ATTACH

-838  0xFFFFFCBA  NDPS E TOO MANY NW SERVERS

-839  0xFFFFFCB9  NDPS E CANT CREATE DOC FILE

-840  0xFFFFFCB8  NDPS E CANT DELETE DOC FILE

-841  0xFFFFFCB7  NDPS E CANT OPEN DOC FILE

-842  0xFFFFFCB6  NDPS E CANT WRITE DOC FILE

-844  0xFFFFFCB4  NDPS E NO SCHEDULER

-845  0xFFFFFCB3  NDPS E CHANGING CONNECTION

-846  0xFFFFFCB2  NDPS E COULD NOT CREATE ACC REF

-900  0xFFFFFC7C  NWDP OE RM OUT OF MEMORY

-901  0xFFFFFC7B  DB E CANT CREATE FILE

-901  0xFFFFFC7B  NWDP OE RM BAD NETWARE VERSION

-902  0xFFFFFC7A  DB E CANT FIND DATA FILE

-903  0xFFFFFC79  DB E CANT OPEN DATA FILE

-904  0xFFFFFC78  DB E CANT OPEN INDEX FILE

-905  0xFFFFFC77  DB E INDEX FILE NOT OPEN

-906  0xFFFFFC76  DB E CANT RENAME FILE

-906  0xFFFFFC76  NWDP OE RM FAILED TO CRTE THRED

-907  0xFFFFFC75  DB E CANT READ DATA FILE

-907  0xFFFFFC75  NWDP OE RM SVC MUST BE FULL DIS

-908  0xFFFFFC74  DB E CANT READ INDEX FILE

-908  0xFFFFFC74  NWDP OE RM DS VAL SIZE TOO LARG

-909  0xFFFFFC73  DB E CANT WRITE DATA FILE

-909  0xFFFFFC73  NWDP OE RM NO ATTRIBUTE VALUES

-910  0xFFFFFC72  DB E CANT WRITE INDEX FILE

-910  0xFFFFFC72  NWDP OE RM UNKNOWN SESSION

-911  0xFFFFFC71  DB E CANT DELETE PA DIR

-911  0xFFFFFC71  NWDP OE RM ERROR READING FILE

-912  0xFFFFFC70  DB E ALREADY DELETED

-913  0xFFFFFC6F  DB E OBJECT EXISTS

-913  0xFFFFFC6F  NWDP OE RM SERVICE DISABLED

-914  0xFFFFFC6E  DB E DESCRIPTOR IN USE

-914  0xFFFFFC6E  NWDP OE RM UNKNOWN MODIFY OPER

-915  0xFFFFFC6D  DB E DESCRIPTOR BEING DELETED

-915  0xFFFFFC6D  NWDP OE RM DUPLICATE SESSION ID

-916  0xFFFFFC6C  NWDP OE RM INVALID CREDENTIAL

-919  0xFFFFFC69  NWDP OE RM FAIL TO GET MSGS

-920  0xFFFFFC68  NWDP OE RM FAIL TO CRTE CONTEXT

-921  0xFFFFFC67  NWDP OE RM FAIL TO LOGIN

-922  0xFFFFFC66  NWDP OE RM NPD FILE GEN ERR

-923  0xFFFFFC65  NWDP OE RM INF FILE FORMAT ERR

-924  0xFFFFFC64  NWDP OE RM NO PRT TYPE IN INF

-925  0xFFFFFC63  NWDP OE RM NO INF FILES PRESENT

-926  0xFFFFFC62  NWDP OE RM FILE OPEN ERROR

-927  0xFFFFFC61  NWDP OE RM READ FILE ERROR

-928  0xFFFFFC60  NWDP OE RM WRITE FILE ERROR

-929  0xFFFFFC5F  NWDP OE RM RESRC TYPE INVALID

-930  0xFFFFFC5E  NWDP OE RM NO SUCH FILENAME

-931  0xFFFFFC5D  NWDP OE RM BANR TYPE INVALID

-932  0xFFFFFC5C  NWDP OE RM LIST TYPE UNKNOWN

-933  0xFFFFFC5B  NWDP OE RM OS NOT SUPPORTED

-934  0xFFFFFC5A  NWDP OE RM NO BANR FILES PRESNT

-936  0xFFFFFC58  NWDP OE RM NO PRN TYPES IN LIST

-937  0xFFFFFC57  NWDP OE RM OPTION NOT SUPPORTED

-938  0xFFFFFC56  NWDP OE RM UNICODE CONV ERR

-939  0xFFFFFC55  NWDP OE RM INVALID ARGUMENTS

-940  0xFFFFFC54  NWDP OE RM INITIALIZATION ERROR

-941  0xFFFFFC53  NWDP OE RM NO SRV REG AVAILABLE

-942  0xFFFFFC52  NWDP OE RM FAIL RGSTR TO ANY SR

-944  0xFFFFFC50  NWDP OE RM NOT ADMIN SESSION

-945  0xFFFFFC4F  NWDP OE RM NO EFFECTIVE RIGHTS

-946  0xFFFFFC4E  NWDP OE RM BAD FILE ATTRIBUTE

-947  0xFFFFFC4D  NWDP OE RM DID FORMAT ERROR

-948  0xFFFFFC4C  NWDP OE RM UNKNOWN RPC SESSION

-949  0xFFFFFC4B  NWDP OE RM SESSN BEING REMOVED

-951  0xFFFFFC49  NWDP OE RM FMGR IO ERROR

-952  0xFFFFFC48  NWDP OE RM FMGR REENTRANCY

-953  0xFFFFFC47  NWDP OE RM FMGR SEQ ERROR

-954  0xFFFFFC46  NWDP OE RM FMGR CRPT INDEX FILE

-955  0xFFFFFC45  NWDP OE RM FMGR NO SUCH FONT

-956  0xFFFFFC44  NWDP OE RM FMGR NOT INITIALIZED

-957  0xFFFFFC43  NWDP OE RM FMGR SYSTEM ERROR

-958  0xFFFFFC42  NWDP OE RM FMGR BAD PARM

-960  0xFFFFFC40  NWDP OE RM FMGR FAILURE

-961  0xFFFFFC3F  NWDP OE RM DUP TIRPC SESSION

-962  0xFFFFFC3E  NWDP OE RM CONN LOST RMS DATA

-1000  0xFFFFFC18  NWDP OE BK OUT OF MEMORY

-1001  0xFFFFFC17  NWDP OE BK BAD NETWARE VERSION

-1002  0xFFFFFC16  NWDP OE BK WRONG CMD LINE ARGS

-1003  0xFFFFFC15  NWDP OE BK Broker NAME NOT GIVN

-1004  0xFFFFFC14  NWDP OE BK NOT Broker CLASS

-1005  0xFFFFFC13  NWDP OE BK INVALID Broker PWORD

-1006  0xFFFFFC12  NWDP OE BK INVALID Broker NAME

-1007  0xFFFFFC11  NWDP OE BK FAILED TO CRTE THRED

-1008  0xFFFFFC10  NWDP OE BK FAILED TO INIT NUT

-1009  0xFFFFFC0F  NWDP OE BK FAILED TO GET MSGS

-1010  0xFFFFFC0E  NWDP OE BK FAILED TO ALLOC RES

-1011  0xFFFFFC0D  NWDP OE BK SVC MUST BE FULL DIS

-1012  0xFFFFFC0C  NWDP OE BK UNINITIALIZED MODULE

-1013  0xFFFFFC0B  NWDP OE BK DS VAL SIZE TOO LARG

-1014  0xFFFFFC0A  NWDP OE BK NO ATTRIBUTE VALUES

-1015  0xFFFFFC09  NWDP OE BK UNKNOWN SESSION

-1016  0xFFFFFC08  NWDP OE BK SERVICE DISABLED

-1017  0xFFFFFC07  NWDP OE BK UNKNOWN MODIFY OPER

-1018  0xFFFFFC06  NWDP OE BK INVALID ARGUMENTS

-1019  0xFFFFFC05  NWDP OE BK DUPLICATE SESSION ID

-1020  0xFFFFFC04  NWDP OE BK UNKNOWN SERVICE

-1021  0xFFFFFC03  NWDP OE BK SRVC ALREADY ENABLED

-1022  0xFFFFFC02  NWDP OE BK SRVC ALREADY DISABLD

-1023  0xFFFFFC01  NWDP OE BK INVALID CREDENTIAL

-1026  0xFFFFFBFE  NWDP OE BK NOT ADMIN TYPE SESN

-1027  0xFFFFFBFD  NWDP OE BK OPTION NOT SUPPORTED

-1029  0xFFFFFBFB  NWDP OE BK COULD NOT FIND FILE

-1030  0xFFFFFBFA  NWDP OE BK ERROR READING FILE

-1031  0xFFFFFBF9  NWDP OE BK NOT NLM FILE FORMAT

-1032  0xFFFFFBF8  NWDP OE BK WRONG NLM FILE VER

-1034  0xFFFFFBF6  NWDP OE BK ALREADY IN PROGRESS

-1035  0xFFFFFBF5  NWDP OE BK INITIALIZE FAILURE

-1038  0xFFFFFBF2  NWDP OE BK AUTO MODULS NOT LOAD

-1039  0xFFFFFBF1  NWDP OE BK UNRESOLVED EXTERNAL

-1041  0xFFFFFBEF  NWDP OE BK OTHER BRKR USING OBJ

-1042  0xFFFFFBEE  NWDP OE BK SRVC FAILED TO INIT

-1100  0xFFFFFBB4  NWDP OE RG OUT OF MEMORY

-1101  0xFFFFFBB3  NWDP OE RG BAD NETWARE VERSION

-1102  0xFFFFFBB2  NWDP OE RG FAIL CREATE CONTEXT

-1103  0xFFFFFBB1  NWDP OE RG FAIL LOGIN

-1104  0xFFFFFBB0  NWDP OE RG FAIL CREATE THREAD

-1105  0xFFFFFBAF  NWDP OE RG FAIL GET MSGS

-1106  0xFFFFFBAE  NWDP OE RG SVC MUST BE FULL DIS

-1107  0xFFFFFBAD  NWDP OE RG DS VAL SIZE TOO LARG

-1108  0xFFFFFBAC  NWDP OE RG NO ATTRIBUTE VALUES

-1109  0xFFFFFBAB  NWDP OE RG UNKNOWN SESSION

-1110  0xFFFFFBAA  NWDP OE RG SERVICE DISABLED

-1111  0xFFFFFBA9  NWDP OE RG UNKNOWN MODIFY OPER

-1112  0xFFFFFBA8  NWDP OE RG CANT START ADVERTISE

-1114  0xFFFFFBA6  NWDP OE RG CANT BIND 2 REGISTRY

-1115  0xFFFFFBA5  NWDP OE RG CANT CREATE CLIENT

-1116  0xFFFFFBA4  NWDP OE RG INVALID ARGUMENTS

-1117  0xFFFFFBA3  NWDP OE RG DUPLICATE SESSION ID

-1118  0xFFFFFBA2  NWDP OE RG UNKNOWN SERVER ENTRY

-1119  0xFFFFFBA1  NWDP OE RG INVALID CREDENTIAL

-1125  0xFFFFFB9B  NWDP OE RG OPTION NOT SUPPORTED

-1127  0xFFFFFB99  NWDP OE RG INVLD CONTNUATN HNDL

-1200  0xFFFFFB50  NWDP OE NF OUT OF MEMORY

-1201  0xFFFFFB4F  NWDP OE NF BAD NETWARE VERSION

-1202  0xFFFFFB4E  NWDP OE NF FAIL CREATE THREAD

-1203  0xFFFFFB4D  NWDP OE NF FAIL GET MSGS

-1204  0xFFFFFB4C  NWDP OE NF FAIL CREATE CONTEXT

-1205  0xFFFFFB4B  NWDP OE NF FAIL LOGIN

-1206  0xFFFFFB4A  NWDP OE NF SVC MUST BE FULL DIS

-1207  0xFFFFFB49  NWDP OE NF DS VAL SIZE TOO LARG

-1208  0xFFFFFB48  NWDP OE NF NO ATTRIBUTE VALUES

-1209  0xFFFFFB47  NWDP OE NF UNKNOWN SESSION

-1210  0xFFFFFB46  NWDP OE NF UNKNOWN NOTIFY PROF

-1211  0xFFFFFB45  NWDP OE NF ERROR READING FILE

-1212  0xFFFFFB44  NWDP OE NF ERROR WRITING FILE

-1213  0xFFFFFB43  NWDP OE NF WRONG NOTIFY DB VERS

-1214  0xFFFFFB42  NWDP OE NF CORRUPTED NOTIFY DB

-1216  0xFFFFFB40  NWDP OE NF METHOD ALREADY INST

-1217  0xFFFFFB3F  NWDP OE NF UNKNOWN METHOD

-1218  0xFFFFFB3E  NWDP OE NF SERVICE DISABLED

-1219  0xFFFFFB3D  NWDP OE NF UNKNOWN MODIFY OP

-1222  0xFFFFFB3A  NWDP OE NF NOTIFY QUEUE EMPTY

-1223  0xFFFFFB39  NWDP OE NF CANT LOAD DELVR METH

-1224  0xFFFFFB38  NWDP OE NF INVALID ARGUMENTS

-1225  0xFFFFFB37  NWDP OE NF DUPLICATE SESSION ID

-1226  0xFFFFFB36  NWDP OE NF INVALID CREDENTIAL

-1227  0xFFFFFB35  NWDP OE NF UNKNOWN CHOICE

-1228  0xFFFFFB34  NWDP OE NF UNKNOWN ATTR VALUE

-1230  0xFFFFFB32  NWDP OE NF UNKNOWN OBJECT ID

-1232  0xFFFFFB30  NWDP OE NF FAIL MAKE CHG PERMNT

-1234  0xFFFFFB2E  NWDP OE NF NOT SUPPLY TYPE SESN

-1235  0xFFFFFB2D  NWDP OE NF NOT ADMIN TYPE SESN

-1236  0xFFFFFB2C  NWDP OE NF NO SRVC REGIST AVAIL

-1237  0xFFFFFB2B  NWDP OE NF FAIL TO REG W ANY SR

-1238  0xFFFFFB2A  NWDP OE NF EMPTY EVENT OBJ SET

-1239  0xFFFFFB29  NWDP OE NF UNKNOWN NTFY HANDLE

-1240  0xFFFFFB28  NWDP OE NF OPTION NOT SUPPORTED

-1241  0xFFFFFB27  NWDP OE NF UNKNOWN RPC SESSION

-1242  0xFFFFFB26  NWDP OE NF INITIALIZATION ERROR

-1244  0xFFFFFB24  NWDP OE NF NO PERSISTENT STORAG

-1245  0xFFFFFB23  NWDP OE NF BAD METHOD FILENAME

-1246  0xFFFFFB22  NWDP OE NF UNKNOWN CONT HANDLE

-1247  0xFFFFFB21  NWDP OE NF INVALID CONT HANDLE

-1248  0xFFFFFB20  NWDP OE NF COULD NOT FIND FILE

-1249  0xFFFFFB1F  NWDP OE NF L ERROR READING FILE

-1250  0xFFFFFB1E  NWDP OE NF NOT NLM FILE FORMAT

-1251  0xFFFFFB1D  NWDP OE NF WRONG NLM FILE VER

-1253  0xFFFFFB1B  NWDP OE NF ALREADY IN PROGRESS

-1254  0xFFFFFB1A  NWDP OE NF INITIALIZE FAILURE

-1257  0xFFFFFB17  NWDP OE NF AUTO MODULS NOT LOAD

-1258  0xFFFFFB16  NWDP OE NF UNRESOLVED EXTERNAL

-1260  0xFFFFFB14  NWDP OE NF USING UNKNOWN METHDS

-1261  0xFFFFFB13  NWDP OE NF SRVC NOT FULL ENABLD

-1262  0xFFFFFB12  NWDP OE NF FOREIGN NDS TREE NAM

-1263  0xFFFFFB11  NWDP OE NF DLVYMETH REJCTD ADDR

-1264  0xFFFFFB10  NWDP OE NF UNSUPRT DLVYADDRTYPE

-1265  0xFFFFFB0F  NWDP OE NF USR OBJ NO DEFLTSERV

-1266  0xFFFFFB0E  NWDP OE NF FAILED TO SEND NOTIF

-1267  0xFFFFFB0D  NWDP OE NF BAD VOLUME IN ADDR

-1268  0xFFFFFB0C  NWDP OE NF Broker NO FILE RIGHT

       801               0x321  NDPS W OBJECT NOT FOUND

       802               0x322  NDPS W ATTRIBUTE NOT FOUND

       803               0x323  NDPS W VALUE NOT FOUND

       804               0x324  NDPS W REQUESTED SCH NOT LOADED

 196609  0x00030001  NWDP LE PSM CONNECTION LOST

 262145  0x00040001  NWDP LE FILE NO ACCESS RIGHTS

 262146  0x00040002  NWDP LE FILE NOT FOUND

 327681  0x00050001  NWDP LE SRS CONNECTION LOST

 327682  0x00050002  NWDP LE SRS NO SRVC REG FOUND

 327683  0x00050003  NWDP LE SRS NOT ENABLED

 393217  0x00060001  NWDP LE BRK CONNECTION LOST

 524290  0x00080002  NWDP LE DOC ZERO LENGTH

 524292  0x00080004  NWDP LE DOC NO SUCH DOC

 589829  0x00090005  NWDP LE JOB NO SUCH JOB

 655365  0x000A0005  NWDP LE UNKNOWN CALLBACK ERR

 655367  0x000A0007  NWDP LE INVALID INTERNAL OP

 655369  0x000A0009  NWDP LE FQN NOT NDPS MANAGER

 655370  0x000A000A  NWDP LE FQN NOT NDPS PRINTER

 655371  0x000A000B  NWDP LE FQN NOT NDPS Broker

 720898  0x000B0002  NWDP LE NSRV OBJECT EXISTS

 720899  0x000B0003  NWDP LE NSRV NO SUCH OBJECT

 720900  0x000B0004  NWDP LE NSRV WRONG OBJECT TYPE

 720901  0x000B0005  NWDP LE NSRV NO ADDRESS

 720902  0x000B0006  NWDP LE NSRV VAL SIZE TOO LARGE

 720903  0x000B0007  NWDP LE NSRV NOT SAME TREE

 720904  0x000B0008  NWDP LE NSRV INTERNAL

 786433  0x000C0001  NWDP LE PRT NO SUCH LABEL

 786434  0x000C0002  NWDP LE PRT NO DEFAULT

 786436  0x000C0004  NWDP LE PRT DUPLICATE LABEL

 786439  0x000C0007  NWDP LE PRT JOB CFG EXISTS

 786440  0x000C0008  NWDP LE PRT INVALID JOB CFG FMT

 786441  0x000C0009  NWDP LE PRT INTERNAL ERROR

 786442  0x000C000A  NWDP LE PRT JOB CFG NOT FOUND

 786444  0x000C000C  NWDP LE PRT DEST TREE DIFFERS

 786446  0x000C000E  NWDP LE PRT ADDR NO LONGR VALID

 786447  0x000C000F  NWDP LE PRT BAD CFG FILE VER

 786448  0x000C0010  NWDP LE PRT PO ALREADY ASSIGNED

 786449  0x000C0011  NWDP LE PRT PO NOT ASSIGNED

 786450  0x000C0012  NWDP LE PRT PA NOT FOUND

 786451  0x000C0013  NWDP LE PRT SHORTLIST NOT FOUND

 786452  0x000C0014  NWDP LE PRT WARNING WIN INI CHG

 786453  0x000C0015  NWDP LE PRT INSTALLR NOT A USER

 851969  0x000D0001  NWDP LE OID INVALID ASCII

 851970  0x000D0002  NWDP LE OID NOT IN DATABASE

 851971  0x000D0003  NWDP LE OID UNSUPPORTED FORMAT

 851972  0x000D0004  NWDP LE OID STRING NOT FOUND

 851973  0x000D0005  NWDP LE OID NO STRING THAT KIND

 851974  0x000D0006  NWDP LE OID MSG FILE NOT FOUND

 851975  0x000D0007  NWDP LE OID MSTR IDX NOT FOUND

 851976  0x000D0008  NWDP LE OID MONOCASE NOT FOUND

 851977  0x000D0009  NWDP LE OID ENUM XLAT NOT FOUND

 851978  0x000D000A  NWDP LE OID NOT LANG CONTEXT

 851982  0x000D000E  NWDP LE OID INVALID ASN1 TYPE

 851983  0x000D000F  NWDP LE OID IS OBJECT CLASS

 851984  0x000D0010  NWDP LE OID IS VALUE CLASS

 851985  0x000D0011  NWDP LE OID IS VALUE

 851986  0x000D0012  NWDP LE OID NO LANGUAGE PATH

 917505  0x000E0001  NWDP LE TIRPC TRANSPORT UNSUP

 983041  0x000F0001  NWDP LE MODB NO SUCH OBJECT

 983042  0x000F0002  NWDP LE MODB NO SUCH ATTRIBUTE

 983043  0x000F0003  NWDP LE MODB OBJ ALREADY EXISTS

 7340037  0x00700005  NWDP LE RPC TIMEDOUT

 7340040  0x00700008  NWDP LE RPC PROGUNAVAIL

 7340042  0x0070000A  NWDP LE RPC PROCUNAVAIL

 7340043  0x0070000B  NWDP LE RPC CANTDECODEARGS

 7340044  0x0070000C  NWDP LE RPC SYSTEMERROR

 7340048  0x00700010  NWDP LE RPC FAILED

 1048577  0x00100001  NWDP LE ATR NOT IN SET

 1114113  0x00110001  NWDP LE RES NO NET ADDR ATTR

 1179649  0x00120001  NWDP LE NTFY NO NET ADDR ATTR

 1179652  0x00120004  NWDP LE NTFY NO SUCH PROFILE

 1245186  0x00130002  NWDP LE PRT SPCD Broker NOT FND

 1245188  0x00130004  NWDP LE PRT NO DEST PATH

 1245189  0x00130005  NWDP LE PRT DEVICE ID FMT BAD

 1245190  0x00130006   NWDP LE PRT NO TMP DEST PATH

 1245191  0x00130007   NWDP LE PRT WINDOWS RESTART RQD

 1310721  0x00140001  NWDP LE COMPARE RESULT LT

 1310722  0x00140002  NWDP LE COMPARE RESULT EQ

 1310723  0x00140003  NWDP LE COMPARE RESULT GT

 1310724  0x00140004  NWDP LE COMPARE RESULT NE

 1376257  0x00150001   NWDP LE OTHER NDPS ERROR RETURN

1441793L  0x00160001  NWDP LE NIOS INIT FAILURE

1441794L  0x00160002  NWDP LE NIOS GET SYSTEMDIR FAIL

16777220  0x01000004  NWDP EC STDIO

16777221  0x01000005  NWDP EC NDS

16777222  0x01000006  NWDP EC UNICODE

17498119  0x010B0007  NWDP EC NSRV ATTR NOT IN SCHEMA

24117251  0x03700003  NWDP EC RPC CANTSEND

24117252  0x03700004  NWDP EC RPC CANTRECV

24117254  0x03700006  NWDP EC RPC VERSMISMATCH

24117255  0x01700007  NWDP EC RPC AUTHERROR

24117257  0x03700009  NWDP EC RPC PROGVERSMISMATCH

24117266  0x03700012  NWDP EC RPC INTR

24117268  0x03700014  NWDP EC RPC TLIERROR

50331653  0x03000005  NWDP EC NDS WITH POSITION

50724865  0x03060001  NWDP EC Broker RESULT

50724866  0x03060002  NWDP EC REGISTRY RESULT

50724867  0x03060003  NWDP EC NOTIFY RESULT

50987009  0x030A0001  NWDP EC NO MEMORY

85131270  0x05130006  NWDP EC PRT NEEDED FILE MISSING

85393409  0x05170001  NWDP EC PSM BOUND TO WRONG ONE

85458945  0x05180001  NWDP EC BRK BOUND TO WRONG ONE

85458946  0x05180002  NWDP EC RES BOUND TO WRONG ONE

85458947  0x05180003  NWDP EC SRS BOUND TO WRONG ONE

85458948  0x05180004  NWDP EC NTFY BOUND TO WRONG ONE


Online Service, Internet

The Technical Support Database and NetWire* forum are available on the Internet. The Novell FTP sites support access through FTP, Gopher, and World Wide Web (WWW) systems. Over 9,000 documents exist on the WWW system for providing technical hints and information.

Email

To access the Novell Internet FTP sites, log in as ANONYMOUS and use your E-mail address as your password. Contact one of the following site addresses:

In the United States: ftp.novell.com

In Germany: ftp.novell.de

In the United Kingdom: ftp.salford.ac.uk

In Canada: novell.nrc.ca

See public areas in these sites for possible listings of other sites' addresses.

Web

To access the Novell Internet WWW site, contact the following site address:

http://support.novell.com/

See information areas in this sites for possible listings of other sites' addresses.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Online Service, NetWire forum on CompuServe

Using the NetWire* forum on the CompuServe** bulletin board is a fairly inexpensive way to get up-to-date advice and patches.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Overview, File Server Error Codes

This portion of the help lists NetWare* file server error codes. Use this information to manage file system problems when error conditions exist.

File server errors usually are displayed in hexadecimal values.

An application usually displays these error codes as part of a message.

For example:

918: This utility was unable to get connection information. Error code: 89FF.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Overview, NCPX Error Codes

This portion of the help lists NCPX error codes (displayed using hexadecimal values) that are returned by the Novell* Administrator for Windows NT** utility. Use this information to understand and troubleshoot your network and workstation systems when error conditions exist.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Overview, NDPS Error Codes
NDPS Error Codes, Overview

This portion of the help lists NDPS error codes (displayed using decimal values) that are returned by the Novell* Distributed Print Services server component and the product's associated utilities and libraries.

Use this information to understand and troubleshoot your network and workstation systems when error conditions exist.

Many of the error codes listed for NDPS should only be seen by a developer.  They have been included in this document just in case they are seen by end-users. If, as an end-user, you see these type of errors, look for updates to NDPS on Novell's Web support connection that will resolve the error before calling support provider.


Overview, NDS Error Codes

This portion of the help lists Novell* Directory Services* (NDS) error codes. Use this information to manage your NDS* servers when error conditions exist.

NDS errors codes are usually displayed in decimal numbers. Sometimes an application displays these codes using hexadecimal values. Error code numbers can be categorized as follows:

Error Codes numbered -1 through -256 (or FFFF through FF01) represent errors from the file system, IPX, NCP, and other NetWare operating system services. These one-byte errors are mapped to -1 to -256 when returned through Directory Services.

Error Codes numbered -301 through -399 (or FED3 through FDA6) represent errors that originated in the NetWare Client library software that are returned through Directory Services.

Error codes numbered -601 through -799 (or FDA7 through F9FE) represent errors that originated in the Directory Services Agent software in the server that are returned through Directory Services.

Because the Directory database is designed as a loosely consistent database, temporary errors are normal. You should not be alarmed if NDS error conditions exist temporarily. However, some errors might persist until the error condition is resolved.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Reporting Error Code Problems to Novell

To improve the information Novell* has about resolving error code problems, we need to know when and how users are seeing them occur. Please help us gather this information by doing the following:

1.	Record the error number.

2. 	Record the circumstances in which the error occurred.

3. 	If you were able to resolve the error, record what you did to resolve the problem.

4. 	Report this information to Novell through E-mail. Send the E-mail to SYSMSG@Novell.com.

If you want an updated copy of the NetWare* Error Codes Help, type HELP in the subject line.

If you are unable to resolve the problem, please contact an IntranetWare support provider.

You may also obtain an updated copy of this file, NWEC.HLP,  from the following online services:

Internet

NetWire*

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


Source Server, definition
Source Server

When running DSTRACE, this is the server where the DSTRACE error is displayed.

In NDS Manager, this is the server represented by a row on the Partition Continuity screen.


Synthetic Time

A type of time stamp used by Novell Directory Services (NDS) to prevent objects from being timestamped incorrectly.

For example, if the time on the server is set back and it no longer matches the timestamp of the partition, then a synthetic timestamp is issued to NDS to prevent objects from being timestamped incorrectly.


Target Server, definition
Target Server

When running DSTRACE, this is the server whose name is listed in DSTRACE with the error message.

In NDS Manager, this is the server represented by a column on the Partition Continuity screen.


Trademarks, Copyright, and Disclaimer

Copyright © 1996-1997 Novell, Inc.  All rights reserved.  No part of this publication may be reproduced, photocopied, stored on a retrieval system, or transmitted without the express written consent of the publisher.

U.S. Patent Nos. 5,157,663; 5,349,642; and 5,455,932.  U.S. Patent Applicaton No. 5,572,528. U.S. and International Patent Pending.

Novell, Inc. makes no representations or warranties with respect to the contents or use of this documentation and specifically disclaims any express or implied warranties of merchantability or fitness for any particular purpose.  Further, Novell, Inc. reserves the right to revise this publication and to make changes to its content, at any time, without obligation to notify any person or entity of such revisions or changes.

Further, Novell, Inc. makes no representations or warranties with respect to any NetWare/IntranetWare software, and specifically disclaims any express or implied warranties of merchantability or fitness for any particular purpose.  Further, Novell, Inc. reserves the right to make changes to any and all parts of NetWare/IntranetWare software, at any time, without any obligation to notify any person or entity of such changes.

Novell Trademarks

Client 32 is a trademark of Novell, Inc.

GroupWise is a trademark of Novell, Inc.

Internetwork Packet Exchange and IPX are trademarks of Novell, Inc.

IntranetWare is a trademark of Novell, Inc.

IPX/SPX is a trademark of Novell, Inc.

NetWare is a registered trademark of Novell, Inc. in the United States and other countries.

NetWare 3 is a trademark of Novell, Inc.

NetWare 4 is a trademark of Novell, Inc.

NetWare Client is a trademark of Novell, Inc.

NetWire is a registered service mark of Novell, Inc. in the United States and other countries.

Novell is a registered trademark of Novell, Inc. in the United States and other countries.

Novell Directory Services and NDS are trademarks of Novell, Inc.

Novell Labs is a trademark of Novell, Inc.

Novell Network Registry is a service mark of Novell, Inc.

Open Data-Link Interface and ODI are trademarks of Novell, Inc.

Sequenced Packet Exchange and SPX are trademarks of Novell, Inc.

Transaction Tracking System and TTS are trademarks of Novell, Inc.

Virtual Loadable Module and VLM are trademarks of Novell, Inc.

Third-Party Trademarks

AppleTalk is a registered trademark of Apple Computer, Inc.

ARCNet is a registered trademark of DataPoint Corporation.

COMPAQ is a registered trademark of Compaq Computer Corporation.

CompuServe is a registered trademark of CompuServe Incorporated.

DS Migrate is a trademark of Preferred Systems, Inc.

Excel is a trademark of Microsoft Corporation.

Hayes is a registered trademark of Hayes Microcomputer Products, Inc.

IBM is a registered trademark of International Business Machines Corporation.

Lotus Notes is a registered trademark of Lotus Development Corporation.

Macintosh is a registered trademark of Apple Computer, Inc.

Microsoft is a registered trademark of Microsoft Corporation.

NFS is a registered trademark of Sun Microsystems, Inc.

OS/2 is a registered trademark of International Business Machines Corporation.

PageMarq is a registered trademark of Compaq Computer Corporation.

PCL is a registered trademark of Hewlett-Packard Company.

PerfectOffice is a trademark of Corel Corporation Limited.

PostScript is a registered trademark of Adobe Systems Incorporated.

PowerPoint is a registered trademark of Microsoft Corporation.

Preferred Systems and PSI are trademarks of Preferred Systems, Inc.

Quattro Pro is a registered trademark of Corel Corporation Limited.

The Assistant is a  trademark of Preferred Systems, Inc.

UNIX is a registered trademark in the United States and other countries, licensed exclusively through X/Open Company, Ltd.

Windows is a registered trademark of Microsoft Corporation.

Windows 95 is a trademark of Microsoft Corporation.

Windows NT is a trademark of Microsoft Corporation.

WNIM is a registered trademark of Gateway Communications, Inc.

WordPerfect is a registered trademark of Corel Corporation Limited.

WordPerfect Presentations is a registered trademark of Corel Corporation Limited.


UNKNOWN ERROR

Explanation

An error has occurred that NetWare* is unable to identify.

Action

See Reporting Error Code Problems to Novell.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.


What is a NetWare Error Code?

A NetWare* error code is a hexadecimal or decimal number that is usually displayed within an error message for an application. When an error code is displayed, it indicates that a software or hardware error has occurred that does not allow NetWare to continue processing.

Many error codes display only a few digits of the hexadecimal error code. Often a number code is truncated to two digits, so it is not the actual decimal equivalent of the hexadecimal code.

* Novell trademark.  ** Third-party trademark.  For more information, see Trademarks.