; vsdept2.def : Declares the module parameters for the application.

NAME         VSDEPT2
DESCRIPTION  'VSDEPT2 Windows Application'
EXETYPE      WINDOWS

CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024   ; initial heap size
; Stack size is passed as argument to linker's /STACK option


