Copyright: Copyright ¸


Partitionsoperation abbrechen

Zweck

Verwenden Sie diese Funktion, wenn Sie eine Partitionsoperation abbrechen möchten, oder das NDS*-Netzwerk nach einer Partitionsoperation NDS-Fehler meldet oder keine Synchronisation stattfindet.

Sie können Partitionsoperationen entweder in der Baumanzeige oder der Liste der Partitionen und Server abbrechen.

Partitionsoperation abbrechen

1.	Die Partition mit laufender Operation wählen.

Hinweis: Wenn Sie das Zusammenführen von Partitionen abbrechen möchten, wählen Sie die (untergeordnete) Partition, die mit der übergeordneten Partition zusammengeführt wird. Wenn Sie das Erstellen von Partitionen abbrechen möchten, wählen Sie die übergeordnete Partition.

2.	Mit der rechten Maustaste auf die Partition klicken.

3.	Operation abbrechen wählen.

4.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Abbrechen einer Partitionsoperation.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Reproduktion hinzufügen

Zweck

Wenn Sie mehrere NDS*-Partitionen erstellen, wird nicht automatisch die Fehlertoleranz oder die Leistungsfähigkeit des Verzeichnisses erhöht. Sie können dies aber durch die strategische Verwendung mehrerer Reproduktionen erreichen.

Wenn Sie die Reproduktion einer Partition zum Server hinzufügen, erhöht sich die Leistungsfähigkeit des Verzeichnisbaums durch folgende Merkmale:

Fehlertoleranz

Schnellerer Zugriff auf NDS-Daten

Schnellerer Zugriff über eine WAN-Verbindung

Zugriff auf NDS-Objekte in einem festgelegten Kontext (Verwenden von Bindery-Services)

Sie können Reproduktionen von Partitionen entweder in der Baumanzeige oder der Liste der Partitionen und Server zum Server hinzufügen.

Reproduktion hinzufügen

1.	Die Partition wählen, deren Reproduktion zu einem Server hinzugefügt werden soll.

2.	Mit der rechten Maustaste klicken und Reproduktion hinzufügen wählen oder Reproduktion hinzufügen [image] anklicken.

3.	Die Schaltfläche "Durchsuchen" [image] anklicken, um den Server auszuwählen, dem die Reproduktion hinzugefügt werden soll.

4.	Im Browser das NetWare* Server-Objekt wählen und anschließend die Eingabe mit OK bestätigen.

5.	Schreib-/Lesezugriff oder Nur-Lesezugriff wählen.

6.	OK wählen.

7.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Hinzufügen einer Reproduktion.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Neue Hauptreproduktion zuweisen

Zweck

Wichtiger Hinweis: Diese Funktion dient nicht dem Ändern eines Reproduktionstyps, sondern vielmehr Reparaturzwecken. Sie sollte nur unter folgenden Voraussetzungen verwendet werden:

Die aktuelle Hauptreproduktion ist fehlerhaft

Der Server der aktuellen Hauptreproduktion hat an Datenintegrität verloren

Es liegt ein nicht behebbarer Festplattenfehler des Servers vor

Sie benötigen eine Hauptreproduktion zur Durchführung von Partitionsoperationen. Wenn Sie eine neue Hauptreproduktion zuweisen, können Sie eine bestehende Reproduktion in die Hauptreproduktion ändern und somit Partitionsoperationen durchführen.

Vor dem Zuweisen einer neuen Hauptreproduktion sollten Sie versuchen, in der Baumanzeige oder der Liste der Partitionen und Server mit der Operation Reproduktionstyp ändern eine bestehende Reproduktion in die Hauptreproduktion zu ändern.

Neue Hauptreproduktion zuweisen

1.	In der Baumanzeige oder der Liste der Partitionen und Server die Partition wählen, deren Hauptreproduktion fehlerhaft oder nicht wiederherstellbar ist.

2.	Partitionsdiagnose [image] wählen.

3.	In der Ansicht Partitionsdiagnose den Server (d. h. die entsprechende Zeile) für die Hauptreproduktion der Partition wählen.

4.	Neue Hauptreproduktion zuweisen [image] wählen.

5.	Anforderung bestätigen.


Reproduktionstyp ändern

Zweck

Wenn Sie den Reproduktionstyp ändern, können Sie den Zugriff auf Reproduktionsdaten steuern. Ändern Sie z. B. eine bestehende Schreib-/Lese-Reproduktion in eine Nur-Lese-Reproduktion, um zu verhindern, daß andere Benutzer die Reproduktion beschreiben oder Verzeichnisdaten ändern.

Anmerkung: Der Hauptreproduktionstyp läßt sich mit diesem Verfahren nicht ändern. Definieren Sie eine neue Hauptreproduktion, indem Sie den Typ einer bestehenden Schreib-/Lese- oder Nur-Lese-Reproduktion in Hauptreproduktion ändern; die ursprüngliche Hauptreproduktion wird automatisch in eine Schreib-/Lese-Reproduktion geändert.

Sie können den Reproduktionstyp entweder in der Baumanzeige oder der Liste der Partitionen und Server ändern.

Reproduktionstyp ändern

1.	Eine Partition oder einen Server wählen.

2.	Unter "Reproduktion" die Reproduktion wählen, die geändert werden soll.

3.	Reproduktionstyp ändern [image] wählen.

4.	Neuen Typ wählen und die Auswahl anschließend mit OK bestätigen.

5.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Ändern des Reproduktionstyps.


Partitionskontinuität überprüfen

Zweck

Mit dieser Operation können Sie überprüfen, ob Reproduktionen der Partition Synchronisationsfehler aufweisen.

Sie können die Partitionskontinuität entweder in der Baumanzeige oder der Liste der Partitionen und Server überprüfen.

Partitionskontinuität überprüfen

1.	Die Partition wählen, deren Reproduktionsliste angezeigt werden soll.

2.	Partitionsdiagnose [image] wählen.

In der Ansicht Partitionsdiagnose werden Reproduktionen mit Synchronisationsfehlern durch ein Symbol mit einem Ausrufezeichen gekennzeichnet. Wenn Sie auf das Symbol doppelklicken, erhalten Sie kontextabhängige Hilfe zum jeweiligen Fehler.

Weitere Informationen finden Sie unter Übersicht zum Überprüfen der Partitionskontinuität.


Synchronisationsstatus einer Partition überprüfen

Zweck

Der NDS*-Manager findet Synchronisationsfehler, indem er das Statusattribut der Partition liest. Diese Diagnose auf niedriger Ebene kann jederzeit problemlos durchgeführt werden.

Sie können den Synchronisationsstatus einer Partition entweder in der Baumanzeige oder der Liste der Partitionen und Server überprüfen.

Synchronisationsstatus einer Partition überprüfen

1.	 Die Partition wählen, die überprüft werden soll.

2.	Synchronisation überprüfen [image] wählen.

3.	(Optional) Wenn Sie diese Operation von der Liste der Partitionen und Server aus durchführen, können Sie den Synchronisationsstatus aller Partitionen im Verzeichnisbaum anzeigen lassen.

4.	OK wählen.

5.	Anforderung bestätigen.

Weitere Informationen finden Sie unter “Übersicht zum Überprüfen des Synchronisationsstatus einer Partition” im Hilfethema Übersicht zum Anzeigen von Partitionsdaten.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Kompatibilität

Kompatibilität des NDS-Managers

Wir empfehlen die Aktualisierung aller NetWare v4.10 Server mit der neuesten auf NetWire für NetWare v4.10 verfügbaren NDS-Version. Hinweis: NDS in Green River ist kompatibel mit den NDS-Versionen für NetWare 4.10 vor v4.89a.

Wir empfehlen die Verwendung von NetWare Client 32, wenn der NDS-Manager ausgeführt wird.

Kompatibilität der NDS-Version

Der NDS-Manager bietet volle Unterstützung für NDS v4.89a und höher und für DSREPAIR.NLM v4.31 und höher.

Der NDS Manager bietet keine Unterstützung für DSREPAIR.NLM-Versionen vor 4.31.

Der NDS-Manager bietet partielle Unterstützung für NDS-Versionen vor v4.89a, die auf NetWare v4.10 Servern ausgeführt werden. NDS v4.89a bietet das Attribut "Partitionsstatus", das Synchronisierungsfehler speichert, die bei der Synchronisierung einer Reproduktion mit anderen Servern in der Reproduktionsliste auftreten. Durch dieses Attribut ist der NDS-Manager in der Lage, Synchronisierungsinformationen über Partitionen bereitzustellen. Folgende Informationen für NDS vor v4.89a werden bereitgestellt:

Wurde die Operation "Synchronisierung überprüfen" für eine Partition ausgeführt, deren gesamte Reproduktionen sich auf v4.10-Servern befinden, auf denen NDS-Versionen vor v4.89a ausgeführt werden, so wird ein Synchronisierungsfehler gemeldet, selbst wenn keiner vorliegt.

Wurde die Operation "Synchronisierung überprüfen" für eine Partition ausgeführt, von der sich einige Reproduktionen auf v4.10-Servern befinden, auf denen NDS-Versionen vor v4.89a ausgeführt werden, und einige auf v4.10-Servern, auf denen die NDS-Version 4.89 oder höher ausgeführt wird, so tritt folgendes auf: Wenn der NDS-Manager die Partitionsinformationen von einem der Server liest, auf denen eine NDS-Version vor v4.89a ausgeführt wird, dann wird ein Synchronisierungsfehler gemeldet, selbst wenn keiner vorliegt. Liest der NDS-Manager die Partitionsinformationen von einem der Server, auf denen die NDS-Version 4.89a oder höher läuft, wird ein Synchronisierungsfehler nur gemeldet, wenn er tatsächlich vorliegt.

Partitions- und Reproduktionsinformationen für einige Felder werden nicht angezeigt, wenn die Informationen für die Partition bzw. die Reproduktion von einem Server gelesen wird, auf dem eine NDS-Version vor 4.89a ausgeführt wird.

Das Partitionsdiagnoseraster zeigt keine Synchronisierungsfehler an (auch nicht, wenn dieser vorliegt) für Reproduktionen, die sich auf Servern befinden, auf den NDS-Versionen vor 4.89a ausgeführt werden.

Kompatibilität von Windows 95

Wenn Sie den NDS-Manager unter Windows 95 ausführen, sollten Sie folgendes beachten:

Der NDS-Manager verwendet viele Kontextroutinen. (Jeder Vorgang in Windows 95 besteht aus maximal 16 Kontextroutinen.)

Tritt bei der Ausführung des NDS-Managers unter Windows 95 Fehler -328 auf, so schließen Sie einige der geöffneten Fenster im NDS Manager und versuchen, die Operation erneut auszuführen.

Kompatibilität der Client Software

Wenn Sie den NDS-Manager für virtuell ladbare Module ausführen, beachten Sie folgende Punkte (die Sie durch die Aktualisierung auf Client 32 ausschließen können):

VLMs belegen standardmäßig maximal acht simultane Verbindungen zu Servern. Dadurch können Fehler wie "Anschließen nicht möglich" und "Lesen nicht möglich" (häufig in Form des Status -321, x8801 und x8809) im NDS-Manager auftreten.

Es kann jedoch auch auftreten, daß Server irrtümlich als heruntergefahren gemeldet werden (weil der NDS-Manager aufgrund fehlender freier Leitungen keine Verbindung herstellen kann). Sie erhöhen die Zahl der maximal möglichen simultanen Verbindungen bei der Ausführung virtuell ladbarer Module durch Hinzufügen des Eintrags "CONNECTIONS=n" zum Abschnitt "NetWare DOS Requester" der Ihrer Datei NET.CFG. Virtuell ladbare Module unterstützen zwischen zwei und 50 Verbindungen. Für die Benutzung des NDS-Managers sollte die Arbeitsstation so konfiguriert sein, daß die Anzahl der Verbindungen mit der Anzahl der Server in Ihrem Baum übereinstimmt. Über den dynamisch verknüpften Text erhalten Sie Hinweise zu Kompatibilität dieser Konfigurationsoption, wenn Sie mit NetWare v3.x Servern in Ihrem Netzwerk arbeiten.

Wenn Sie virtuell ladbare Module zu Zeiten extremen Netzwerkverkehrs ausführen und der NDS-Manager versucht, eine Verbindung zu einem heruntergefahrenen Server herzustellen, dann kann es u. U. einige Zeit dauern, bis der Fehler "Anschließen nicht möglich" ausgegeben wird.

Da der NDS-Manager eine Verbindung zu jedem in der Reproduktionsliste der Partition aufgeführten Server herstellen muß, um ein Partitionsdiagnoseraster anzuzeigen, werden u. U. eine Vielzahl von Fehlermeldungen "Lesen nicht möglich" angezeigt, wenn virtuell ladbare Module ausgeführt werden und die konfigurierte Zahl der Verbindungen unter der der Server im Baum liegt.

Wenn Ihre Arbeitsstation so konfiguriert ist, werden die Verbindungen bei der Erstellung des Rasters häufig mehrfach benutzt, um die verschiedenen Server zu lesen. Aktionen nach Zeilen, die Daten anzeigen, können Fehlermeldungen "Anschließen nicht möglich" verursachen. Durch die Aktualisierung der Synchronisierungsinformationen werden diese Zeilen durch "Lesen nicht möglich" aktualisiert.

* Novell Marken.  ** Marken anderer Hersteller.  Weitere Informationen erhalten Sie unter Marken.


 Partition erstellen

Zweck

Wenn Sie Partitionen erstellen, teilen Sie Ihren NDS*-Baum nach logischen Gesichtspunkten auf. Von den einzelnen Unterbäumen können Reproduktionen erstellt und auf verschiedene NetWare 4* Server im Netzwerk verteilt werden.

Beim Erstellen einer neuen Partition wird die übergeordnete Partition in zwei Partitionen aufgeteilt. Die neue Partition wird zur untergeordneten Partition. Weitere Informationen finden Sie in den Richtlinien für das Partitionieren und Reproduzieren Ihres Baums.

Sie können Partitionen nur in der Baumanzeige erstellen.

Partition erstellen

1.	Baumanzeige [image] wählen.

2.	Im Browser den Behälter wählen, der als Partition erstellt werden soll.

3.	Partition erstellen [image] wählen.

4.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Erstellen einer Partition.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Server-Objekt löschen
NetWare Server-Objekt löschen

Zweck

Warnung: Wenn Sie ein NetWare* Server-Objekt löschen, wird es dauerhaft aus dem Netzwerk entfernt. Ebenso werden die Daten und Ressourcen des Servers dauerhaft entfernt.

Das Löschen eines NetWare Server-Objekts kann zu einer Beschädigung Ihrer NDS*-Datenbank führen, insbesondere, wenn das NetWare Server-Objekt im Zusammenhang mit der NDS-Datenbank eingesetzt wird (z. B. für das Speichern von Reproduktionen).

Löschen Sie mit Hilfe des NDS-Managers die Reproduktionen vom Server, und achten Sie darauf, daß Sie nicht den Server löschen, der die einzige Reproduktion einer Partition des Verzeichnisbaums enthält.

Sie können einen Server entweder in der Baumanzeige oder der Liste der Partitionen und Server löschen.

NetWare Server-Objekt löschen

1.	Das NetWare Server-Objekt wählen, das gelöscht werden soll.

Anmerkung: In der Baumanzeige müssen Sie den Baum durchsuchen, indem Sie die Behälter solange erweitern, bis Sie das NetWare Server-Objekt im richtigen Kontext gefunden haben. Wenn Sie den Server-Kontext kennen, können Sie ihn im Anzeigemenü einstellen.

2.	Mit der rechten Maustaste klicken und Löschen wählen.

Weitere Informationen finden Sie unter Übersicht zum Löschen eines NetWare Server-Objekts.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Reproduktion löschen

Zweck

Wenn Sie eine Reproduktion löschen, wird sie vom Server entfernt.

Sie können eine Reproduktion entweder in der Baumanzeige oder der Liste der Partitionen und Server löschen.

Reproduktion löschen

1.	Die Partition wählen, deren Reproduktion gelöscht werden soll.

2.	Unter "Reproduktion" die Reproduktion wählen, die gelöscht werden soll.

3.	Mit der rechten Maustaste klicken und Löschen wählen.

4.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Löschen einer Reproduktion.


Beschreibung des Reproduktionsstatus

Der Reproduktionsstatus hängt von den Operationen ab, die im Hintergrund ablaufen.

Klicken Sie auf einen Status, um eine Beschreibung zu erhalten.

Ein

Neu

Läuft ab

Gesperrt

Typ 0 ändern

Typ 1 ändern

Übergang ein

Übergangsverschiebung

Übergangsaufteilung

0 teilen

1 teilen

0 verbinden

1 verbinden

2 verbinden

0 verschieben

1 verschieben

2 verschieben


Beschreibung der Reproduktionstypen

NDS* verwendet vier Reproduktionstypen:

Hauptreproduktion

Eine Hauptreproduktion ist eine beschreibbare Reproduktion, die alle Objektinformationen einer Partition enthält. Sämtliche Operationen (Erstellen, Zusammenführen, Verschieben, Löschen) gehen auf die entsprechende Hauptreproduktion der Partition zurück.

Für jede Partition kann nur eine Hauptreproduktion definiert werden.

Schreib-/Lese-Reproduktion

Eine Schreib-/Lese-Reproduktion enthält die gleichen Objektinformationen wie die Hauptreproduktion. Mit ihr lassen sich durch Schreibzugriff Änderungen durchführen, wenn an einer anderen Stelle bereits eine Hauptreproduktion der Partition definiert wurde.

Die Anzahl an Schreib-/Lese-Reproduktionen ist unbegrenzt.

Auf Client-Arbeitsstationen können nur Haupt- und Schreib-/Lese-Reproduktionen aktualisiert werden.

Nur-Lese-Reproduktion

Eine Nur-Lese-Reproduktion enthält die gleichen Objektinformationen wie die Partition, mit dem Unterschied, daß diese nur gelesen werden können. Sie wird verwendet, wenn von der Partition nur gelesen und ein Schreibzugriff verhindert werden soll.

Nur-Lese-Reproduktionen sind für Server mit Bindery-Services nicht geeignet. In diesem Fall sind beschreibbare Reproduktionen erforderlich. Wenn auf einem Server Bindery-Services erforderlich sind, verwenden Sie entweder Haupt- oder Schreib-/Lese-Reproduktionen. Standardmäßig sorgt das NetWare 4 Installationsprogramm dafür, daß dem installierten Server eine Schreib-/Lese-Reproduktion des Stammverzeichnisses des aktuellen Baums hinzugefügt wird, wenn weniger als drei Reproduktionen dieses Stammverzeichnisses im Baum vorhanden sind.

Untergeordnete Referenz-Reproduktionen

Eine untergeordnete Referenz-Reproduktion kann von Benutzern nicht geändert werden. Sie wird automatisch von NDS einem Server zugewiesen, wenn auf diesem für die übergeordnete Partition eine Haupt-, Schreib-/Lese- oder Nur-Lese-Reproduktion, jedoch keine untergeordnete Partition existiert.

Wenn Sie dem Server eine Schreib-/Lese- oder Nur-Lese-Reproduktion der untergeordneten Partition hinzufügen, wird die untergeordnete Referenz-Reproduktion entfernt.

Die Netzwerkressourcen befinden sich in den Haupt-, Schreib-/Lese- und Nur-Lese-Reproduktionen.  Nur-Lese-Reproduktionen haben einen begrenzten Einsatzbereich und werden für gewöhnlich nicht implementiert. Untergeordnete Referenz-Reproduktionen werden automatisch erstellt und zugeordnet und verbinden die einzelnen Baumpartitionen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Richtlinien für das Erstellen von Baumpartitionen und -reproduktionen

Die folgenden Richtlinien sind lediglich Faustregeln, die für die meisten Netzwerke Gültigkeit besitzen. Abhängig von der speziellen Konfiguration Ihres Netzwerks, der Hardware und des Datendurchsatzes müssen Sie allerdings einige dieser Richtlinien an Ihrer speziellen Anforderungen anpassen. Zusätzliche Informationen zum Erstellen Ihres NDS*-Baums, dem Verwalten von Partitionen und Reproduktionen sowie der Zeitsynchronisierung erhalten Sie im Handbuch zu NetWare 4 Netzwerken.

Richtlinien für das Partitionieren

Standort

In einem Netzwerk mit WAN-Verbindungen sollten sich einzelne Partitionen nicht über mehrere Standorte erstrecken.

Nehmen Sie Partitionierungen jeweils in der Nähe der einzelnen Server vor. (Positionieren Sie physisch voneinander entfernte Server in separaten Partitionen.)

Plazieren Sie im oberen Teil der Baums weniger Partitionen, unten mehr.

Größe

Halten Sie die Größe der Partitionen möglichst klein.

Der Stamm der aktuellen Baumpartition sollte möglichst klein bleiben.

In der Regel sollte eine Partition weniger als 1.500 Objekte enthalten, nie jedoch mehr als 3.500.

In der Regel sollte eine Partition weniger als zehn bis 15 untergeordnete Partitionen enthalten, nie jedoch mehr als 40.

Beispiel

In der folgenden Grafik ist eine typische Baumstruktur dargestellt. Beachten Sie, daß die organisatorische Einheit "Sales" eine Partition ist. Der mögliche Grund ist, daß die OU "Sales" sich über eine WAN-Verbindung hinweg erstreckt, oder weil sie eine große Anzahl von Benutzerobjekten enthält.

Richtlinien für Reproduktionen

Plazierung

 Erstellen Sie Reproduktionen lokal und nicht über eine WAN-Verbindung hinweg. (Reproduktionen, die sich über eine WAN-Verbindung hinweg erstrecken müssen NDS-Synchronisierungsinformationen senden/empfangen, was zur Verlangsamung des Netzwerkverkehrs auf einer WAN-Verbindung führen kann.)

Plazieren Sie Hauptreproduktionen nach Möglichkeit in der Nähe der über- oder untergeordneten Hauptpartitionen.

Anzahl

Erstellen Sie immer zwei oder drei Reproduktionen pro Partition, nie jedoch mehr als zehn.

Speichern Sie niemals mehr als zehn Reproduktionen auf einem Server.

* Novell Marken.  ** Marken anderer Hersteller.  Weitere Informationen finden Sie unter Marken.


IDH_Partitionsoperation abbrechen
Partitionsoperation abbrechen

Zweck

Sie können das Erstellen oder Zusammenführen von Partitionen bis zu einem bestimmten Punkt während der Operation abbrechen. Verwenden Sie diese Funktion, wenn Sie eine Operation abbrechen möchten, das NDS*-Netzwerk NDS-Fehler meldet oder nach einer Partitionsoperation keine Synchronisierung stattfindet.

Weitere Informationen finden Sie unter Übersicht zum Abbrechen einer Partitionsoperation.

Optionen

Im Textfeld wird der vollständige Name der gewählten Partition angezeigt. Wenn Sie das Zusammenführen von Partitionen abbrechen möchten, wählen Sie die (untergeordnete) Partition, die mit der übergeordneten Partition zusammengeführt wird. Wenn Sie das Erstellen von Partitionen abbrechen möchten, wählen Sie die übergeordnete Partition.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Reproduktion hinzufügen
Reproduktion hinzufügen

Zweck

Wenn Sie mehrere Partitionen erstellen, wird nicht automatisch die Fehlertoleranz oder die Leistungsfähigkeit des Verzeichnisses erhöht. Sie können dies aber durch die strategische Verwendung mehrerer Reproduktionen erreichen.

Wenn genügend Server für den Verzeichnisbaum vorhanden sind, werden von Novell* drei Reproduktionen je Partition empfohlen. Weitere Informationen finden in den Richtlinien für das Partionieren und Reproduzieren Ihres Baums.

Wenn Sie die Reproduktion einer Partition zum Server hinzufügen, erhöht sich die Leistungsfähigkeit des Verzeichnisbaums durch folgende Merkmale:

Fehlertoleranz des Verzeichnisses

Schnellerer Zugriff über eine WAN-Verbindung

Schnellerer Zugriff auf Verzeichnisdaten

Zugriff auf Bindery-Services

Weitere Informationen finden Sie unter Übersicht zum Hinzufügen einer Reproduktion.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Neue Hauptreproduktion zuweisen
Neue Hauptreproduktion zuweisen

Wichtiger Hinweis: Diese Funktion dient nicht dem Ändern eines Reproduktionstyps, sondern vielmehr Reparaturzwecken. Sie sollte nur unter folgenden Voraussetzungen verwendet werden:

Die aktuelle Hauptreproduktion ist fehlerhaft

Der Server der aktuellen Hauptreproduktion hat an Datenintegrität verloren

Es liegt ein nicht behebbarer Festplattenfehler des Servers vor

Sie benötigen eine Hauptreproduktion zur Durchführung von Partitionsoperationen. Wenn Sie eine neue Hauptreproduktion zuweisen, können Sie eine bestehende Reproduktion in die Hauptreproduktion ändern und somit Partitionsoperationen durchführen.

Vor dem Zuweisen einer neuen Hauptreproduktion sollten Sie versuchen, in der Baumanzeige oder der Liste der Partitionen und Server mit der Operation Reproduktionstyp ändern eine bestehende Reproduktion in die Hauptreproduktion zu ändern.


IDH_Reproduktionstyp ändern
Reproduktionstyp ändern

Zweck

Wenn Sie den Reproduktionstyp ändern, können Sie den Zugriff auf Verzeichnisdaten einer Reproduktion steuern.

Ändern Sie z. B. eine bestehende Schreib-/Lese-Reproduktion in eine Nur-Lese-Reproduktion, um zu verhindern, daß andere Benutzer die Reproduktion beschreiben oder Verzeichnisdaten ändern.

Weitere Informationen finden Sie unter Übersicht zum Ändern des Reproduktionstyps.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Synchronisation überprüfen
Synchronisation überprüfen

Mit dieser Operation können Sie den Synchronisationsstatus einer Partition oder aller Partitionen in Ihrem Baum überprüfen. Diese Diagnose auf niedriger Ebene kann jederzeit problemlos durchgeführt werden.

Der NDS*-Manager findet Synchronisationsfehler, indem er das Statusattribut der Partition liest. Das Ergebnis dieser Überprüfung wird in einem Dialogfeld angezeigt. Anschließend können Sie die Kontinuität jeder fehlerhaften Partition überprüfen und entsprechende Reparaturoperationen durchführen.

Anmerkung: Die Option Alle Partitionen in der Partitionsliste ist nur verfügbar, wenn Sie diese Operation in der Liste der Partitionen und Server gewählt haben.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Partition erstellen
Partition erstellen

Wenn Sie Partitionen erstellen, teilen Sie Ihren NDS*-Baum nach logischen Gesichtspunkten auf. Von den einzelnen Unterbäumen können Reproduktionen erstellt und auf verschiedene NetWare* 4*-Server im Netzwerk verteilt werden.

Beim Erstellen einer neuen Partition wird die übergeordnete Partition in zwei Partitionen aufgeteilt. Die neue Partition wird zur untergeordneten Partition.

Beispiel: Wenn Sie eine organisatorische Einheit als neue Partition erstellen möchten, trennen Sie die organisatorische Einheit mit allen ihren untergeordneten Objekten von der übergeordneten Partition.

Weitere Informationen finden Sie unter Übersicht zum Erstellen einer Partition.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Reproduktion löschen
Reproduktion löschen

Wenn Sie eine Reproduktion löschen, wird sie vom Server entfernt.

Wenn Sie einen Server aus dem Verzeichnisbaum entfernen möchten, sollten Sie vorher Reproduktionen vom Server löschen. Dadurch werden Probleme beim Entfernen des Servers vermieden.

Ebenso können Sie durch das Entfernen von Reproduktionen den Synchronisationsverkehr auf dem Netzwerk reduzieren. Für gewöhnlich reichen sechs Reproduktionen je Partition aus.

Anmerkung: Hauptreproduktionen können nicht gelöscht werden.

Halten Sie sich beim Löschen von Reproduktionen an folgende Richtlinien:

Wegen der Fehlertoleranz sollten auf verschiedenen Servern mindestens drei Reproduktionen der [Root]-Partition vorhanden sein.

Beim Löschen einer Reproduktion wird eine Kopie eines Teils der Verzeichnisdatenbank vom Ziel-Server entfernt.

Auf die Datenbank kann von anderen Netzwerk-Servern aus weiterhin zugegriffen werden, und der Ziel-Server bleibt in NDS* eingebunden.

Untergeordnete Referenz-Reproduktionen können nicht gelöscht oder verwaltet werden. Sie werden für einen Server von NDS automatisch erstellt, wenn auf dem Server eine Reproduktion der Partition, jedoch nicht der untergeordneten Partition existiert.

Weitere Informationen finden Sie unter Übersicht zum Löschen einer Reproduktion.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Server löschen
Server löschen

Warnung: Wenn Sie ein NetWare* Server-Objekt löschen, wird es dauerhaft aus dem NDS*-Baum entfernt (der Server verfügt weiterhin über SAP-Funktionen, sofern er nicht dauerhaft vom Netz genommen wird).

Ebenso werden die Daten und Ressourcen des Servers dauerhaft entfernt.

Das Löschen eines NetWare Server-Objekts kann zu einer Beschädigung Ihrer NDS*-Datenbank führen, insbesondere, wenn das NetWare Server-Objekt im Zusammenhang mit der NDS-Datenbank eingesetzt wird
(z. B. für das Speichern von Reproduktionen).

Löschen Sie mit Hilfe des NDS-Managers die Reproduktionen vom NetWare Server und achten Sie darauf, daß Sie keinen NetWare Server löschen, der die einzige Reproduktion einer Partition des Verzeichnisbaums enthält.

Bevor Sie das NetWare Server-Objekt löschen können, müssen Sie den Server herunterfahren. Ein gelöschtes NetWare Server-Objekt kann nur wiederhergestellt werden, indem Sie NDS mit dem INSTALL.NLM-Programm erneut auf dem Server installieren oder den Server wieder hochfahren und anschließend das Objekt neu erstellen. Davon wird allerdings abgeraten.

Es gibt folgende Gründe für das Löschen eines Servers:

Es gibt Probleme mit dem Festplattenlaufwerk des Servers, und Sie möchten den Server neu installieren.

Ihr Unternehmen wird verkleinert, und der Server wird im Baum nicht mehr benötigt.

Die bevorzugte Methode zum Löschen eines Servers besteht darin, das NetWare Server-Objekt mit dem NetWare Administrator in einen anderen Kontext zu verschieben (es ist nicht notwendig, das NetWare Server-Objekt zu löschen und in einem anderen Kontext erneut zu erstellen).

Mit dem NetWare Administrator können Sie auch die entsprechenden Volume-Objekte zum gelöschten Server-Objekt löschen.

Wenn der Server problemlos läuft, führen Sie vor dem Löschen folgende Schritte aus:

Ändern Sie die Hauptreproduktionen auf dem Server in eine Schreib-/Lese-Reproduktionen, und löschen Sie anschließend alle Reproduktionen auf dem NetWare Server. Sobald diese Schritte ausgeführt wurden, können Sie das NetWare Server-Objekt löschen.

Entfernen Sie mit dem INSTALL.NLM-Programm NDS vom Server. Dadurch wird verhindert, daß Services in der NDS-Datenbank verlorengehen. Dieser Vorgang löscht automatisch den Server.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Fehlerinformationen
Fehlerinformationen

Zweck

Mit diesem Dialogfeld können Sie die Fehlerinformationen zur Reproduktion einer gewünschten Partition anzeigen lassen.

In der Ansicht Partitionsdiagnose können Sie im Raster Reproduktionen mit Synchronisationsfehlern feststellen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Liste der Partitionen und Server
Liste der Partitionen und Server

Zweck

Die Liste der Partitionen und Server ist eine von drei Ansichten, die Sie zum Arbeiten im NDS*-Manager aufrufen können (daneben gibt es noch die Baumanzeige und die Ansicht Partitionsdiagnose).

In dieser Ansicht werden alle Partitionen und Server im aktuellen Kontext und unterhalb des aktuellen Kontexts angezeigt. Die Partitionshierarchie, d. h. die Aufteilung in über- und untergeordnete Partitionen, können Sie in der Baumanzeige anzeigen lassen.

Für Reparaturen müssen Sie zunächst eine Partition und anschließend Partitionsdiagnose [image] wählen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Protokolldateifehler
Protokolldateifehler

Zweck

Das Dialogfeld Protokolldateifehler wird angezeigt, wenn der NDS*-Manager nach einer NDS-Aktualisierung die Protokolldatei nicht beschreiben kann.

Es gibt unter anderem folgende Ursachen für diese Fehlfunktion:

Die Datei befindet sich nicht im angegebenen Verzeichnis

Das Verzeichnis der Protokolldatei wurde in den Präferenzen festgelegt, die Sie im Objektmenü anzeigen lassen können.

Es handelt sich um eine Nur-Lese-Datei

Die Datei ist fehlerhaft

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Partition zusammenführen
Partition zusammenführen

Zweck

Beim Zusammenführen einer Partition wird die gewählte Partition einschließlich ihrer Reproduktionen mit der übergeordneten Partition verknüpft. Danach existiert nur noch eine, nämlich die übergeordnete Partition.

Weitere Informationen finden Sie unter Übersicht zum Zusammenführen einer Partition.

Optionen

Partition

Zeigt den vollständigen Namen der Partition an, die zusammengeführt werden soll. Wählen Sie Nein, wenn Sie eine andere Partition zusammenführen möchten.

Übergeordnete Partition

Zeigt den vollständigen Namen der übergeordneten Partition an. Die Angabe in diesem Feld läßt sich nicht ändern. Es wird stets die Partition angezeigt, die der gewählten Partition übergeordnet ist.


IDH_Partition verschieben
Partition verschieben

Zweck

Durch das Verschieben einer Partition können Sie einen Unterbaum in Ihren Verzeichnisbaum verschieben. Das Stammobjekt einer Partition (also ein Behälterobjekt) kann nur verschoben werden, wenn keine untergeordneten Partitionen existieren.

Weitere Informationen finden Sie unter Übersicht zum Verschieben einer Partition.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Partition verschieben - Alias vorhanden
Partition verschieben

Zweck

Dieser Bildschirm wird angezeigt, wenn Sie versuchen, eine Partition in einen Kontext zu verschieben, in dem ein Alias bereits vorhanden ist.


IDH_Fehler bei NDS-Aktualisierung
Fehler bei NDS-Aktualisierung

Zweck

Aufgrund von Server-Problemen kann der NDS*-Manager die Aktualisierung einer NDS-Version nicht beenden. Dafür gibt es unter anderem folgende mögliche Ursachen:

Der Server ist heruntergefahren oder beschäftigt

Der Server ist beschädigt

Sie haben keine Zugriffsrechte auf den Server

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Protokoll für NDS-Aktualisierung
Protokoll für NDS-Aktualisierung

Zweck

Sie können angeben, wo der NDS*-Manager die Protokolldatei nach einer NDS-Versionsaktualisierung speichern soll.

Dieses Register kann entweder über Objekt > Einstellungen oder über Objekt > NDS-Version > Aktualisieren > Einstellungen aufgerufen werden.

Hinweis: Wenn Sie über NDS-Version > Aktualisieren > Einstellungen auf dieses Register zugreifen, sind die in diesem Fenster durchgeführten Änderungen nur für diese Versionsaktualisierungssitzung aktiv.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_NDS-Aktualisierungsoptionen
NDS-Aktualisierungsoptionen

Zweck

Mit dieser Option können Sie die Standardeinstellungen vornehmen, wie der NDS*-Manager bei der NDS-Versionsaktualisierung vorgeht.

Dieses Register kann entweder über Objekt > Einstellungen oder über Objekt > NDS-Version > Aktualisieren > Einstellungen geöffnet werden.

Hinweis: Wenn Sie über NDS-Version > Aktualisieren > Einstellungen auf dieses Register zugreifen, sind die in diesem Fenster durchgeführten Änderungen nur für diese Versionsaktualisierungssitzung aktiv.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Aktualisierung der NDS-Version
Aktualisierung der NDS-Version

Zweck

Aktualisieren Sie die NDS*-Version auf einem Server, wenn Sie von Novell* eine Aktualisierung des DS.NLM-Programms erhalten. Diese aktualisierten Versionen werden regelmäßig über das elektronische Forum NetWire* verschickt.

Mit jeder NDS-Aktualisierung werden Probleme behoben und die Funktionalität gesteigert. Nach der Aktualisierung sind die neuen Funktionen in NDS erst dann verfügbar, wenn alle Server im Reproduktionsring einer Partition dieselbe NDS-Version verwenden.

Wichtiger Hinweis: Durch das Aktualisieren einer Version wird keine betriebssystemübergreifende Aktualisierung durchgeführt. Daher wird die NDS-Version eines NetWare* 4.1-Servers nicht mit der NDS-Version eines NetWare 4.11-Servers aktualisiert. Dagegen wird die alte NDS-Version eines NetWare 4.1-Servers (z. B. 489) mit der neueren NDS-Version für NetWare 4.1 (z. B. 496) aktualisiert.

Wenn eine neue Version von NDS für NetWare 4.11 über NetWire herausgegeben wird, können Sie NetWare 4.11-Server mit der neuen Version aktualisieren.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Aktualisierung der NDS-Version beendet
Aktualisierung der NDS-Version beendet

Zweck

Der NDS*-Manager hat die Aktualisierung der NDS-Version beendet.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Reproduktionsinformationen
Reproduktionsinformationen

Zweck

Mit diesem Dialogfeld können Sie die Informationen zu einer bestimmten Reproduktion anzeigen lassen.

Schnelleren Zugriff auf die Informationen haben Sie, wenn Sie im Partitionsraster auf eine Reproduktion doppelklicken.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Ansicht Partitionsdiagnose
Partitionsdiagnose

Zweck

In der Ansicht Partitionsdiagnose können Sie Synchronisationsfehler bei den Reproduktionen feststellen und Reparaturen durchführen.

In der Ansicht Partitionsdiagnose wird die Liste der Reproduktionen (Spalten) der Server (Zeilen) angezeigt, für die Reproduktionen der gewählten Partition existieren.

Hinweis: Um das Partitionsraster verstehen zu können, lesen Sie es horizontal und Server für Server. Jede Reihe repräsentiert die Reproduktionsliste des jeweiligen Servers.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Partitionsinformationen
Partitionsinformationen

Zweck

Mit Hilfe von Partitionsinformationen können Sie den allgemeinen Zustand einer Partition überprüfen. Rufen Sie das Dialogfeld Partitionsinformationen auf, um die Anzahl an Reproduktionen und Informationen zur Synchronisierung einer Partition anzeigen zu lassen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Partitions-Alias-Informationen
Aliasinformationen

Zweck

Im Dialogfeld Aliasinformationen ist das Behälterobjekt mit einem Alias angegeben. Im NDS*-Manager werden nur Behälteraliase angegeben. Aliase werden erstellt, damit Benutzer nicht die Speicherposition eines Objekts im Verzeichnisbaum kennen müssen, um auf das Objekt zugreifen zu können. Ein Systemverwalter kann z. B. ein Behälterobjekt an eine neue Position verschieben. Dabei bleibt der Zugriff über eine alte Speicherposition erhalten.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Partition umbenennen
Umbenennen

Zweck

Hier können Sie eine Partition umbenennen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Partitionssynchronisierungsprüfung
Partitionssynchronisierungsprüfung

Zweck

Dieses Dialogfeld bietet Informationen über den allgemeinen Zustand der geprüften Partitionen nach einer Synchronisierungsprüfung.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Standardeinstellungen
Standardeinstellungen

Zweck

Definieren Sie, wie der NDS*-Manager Informationen anzeigt, wie er NDS-Versionsaktualisierungen verarbeitet und wo er die Protokolldatei nach einer NDS-Versionsaktualisierung speichert.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Drucken
Drucken

Zweck

Sie können Informationen zu Behältern, Servern, Partitionen und Reproduktionen drucken. Es stehen je nach Objekt verschiedene Optionen zur Verfügung.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Partitionsraster drucken
Partitionsraster drucken

Zweck

Wenn Sie das Partitionsraster drucken, müssen Sie die Reproduktionsliste einer Partition nicht manuell festhalten.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Aktualisierungen empfangen
Aktualisierungen empfangen

Zweck

Durch diese Operation empfängt die Reproduktion auf dem gewählten Server alle NDS*-Objekte von der Hauptreproduktion der Partition. Während dieses Vorgangs wird die Reproduktion auf dem gewählten Server als neue Reproduktion gekennzeichnet.

Der Status der Reproduktionen ist aus der Reproduktionsliste des Servers in der Baumanzeige oder der Liste der Partitionen und Server ersichtlich. Die aktuellen Daten der Reproduktion werden mit den Daten der Hauptreproduktion überschrieben.

Obwohl die Verzeichnisdaten der Reproduktionen automatisch synchronisiert werden (damit jede Reproduktion die zuletzt aktualisierten Verzeichnisobjekte erhält), können Sie mit dieser Operation die Verzeichnisobjekte der Reproduktionen manuell synchronisieren, falls einige Nicht-Hauptreproduktionen nicht mehr synchron sind.

Führen Sie diese Operation aus, wenn eine Reproduktion beschädigt wird oder seit längerer Zeit keine aktualisierten Daten erhalten hat.

In der Ansicht Partitionsdiagnose können Sie feststellen, welche Reproduktionen nicht synchron mit den Daten der Hauptreproduktion sind. Sie werden im Partitionsraster mit einem Ausrufezeichen (!) auf dem Reproduktionssymbol dargestellt. Eine Schreib-/Lese-Reproduktion mit einem Synchronisationsfehler wird beispielsweise im Raster als [image] dargestellt.

Asynchrone Reproduktionen sollten mit Hilfe der Hauptreproduktion aktualisiert werden.

Diese Option kann nicht in einer Hauptreproduktion gewählt werden. Die Hauptreproduktion gilt als die aktuellste und genaueste Kopie der Partition. Ist dies nicht der Fall, weisen Sie mit der Operation Reproduktionstyp ändern einer der anderen Reproduktionen den Status "Hauptreproduktion" zu. Die aktuelle Hauptreproduktion wird automatisch in eine Schreib-/Lese-Reproduktion umgewandelt.

Hinweis: Durch diese Operation wird das Netzwerk unter Umständen stark belastet. Daher ist es empfehlenswert, diese Operation nur dann durchzuführen, wenn das Netzwerk wenig beansprucht wird.

Optionen

Server

Kennzeichnet den Server mit der Reproduktion, die durch die Hauptreproduktion aktualisiert wird.

Partition

Kennzeichnet die Partition, mit deren Hauptreproduktion die gewählte Reproduktion aktualisiert wird.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Server entfernen
Server entfernen

Warnung:  Der falsche Gebrauch dieser Operation kann zu nicht behebbaren Schäden im NDS-Baum führen.

Wenn ein Server im Reproduktionsring erscheint, der entweder nicht länger Bestandteil des Baums oder auf dem keine Reproduktion mehr vorhanden ist, sollten Sie nicht den Server entfernen, sondern das Server-Objekt löschen.

Das Server-Objekt wird für einen bestimmten Zeitraum gelöscht, der Minuten oder mehrere Stunden dauern kann, und der Reproduktionsring wird entsprechend aktualisiert.

Sie sollten den Server entfernen, wenn es beim Löschen von Server-Objekten wegen starker Beschädigung des NDS-Baums zu Problemen kommt.

Entfernen Sie einen Server von der Reproduktionsliste, wenn eine Synchronisierung anderer Server mit einem Server stattfinden soll, auf dem sich keine Reproduktionen der Partition befinden.

Beispiel: Sie entdecken in der Ansicht Partitionsdiagnose oder beim Ausführen des DSTRACE-Programms auf dem Server Fehler, die besagen, daß sich auf dem Server Informationen über einen anderen Server in seiner Reproduktionsliste befinden, der zweite Server jedoch nicht über eine Reproduktion der in Frage kommenden Partition verfügt. Verwenden Sie die Funktion "Server entfernen", um den zweiten Server aus der Reproduktionsliste des ersten Servers zu entfernen.

Hinweis: Der NDS-Manager versucht, eine zuverlässigere Löschoperation für die Reproduktion auszuführen, wenn eine Anforderung zur Entfernung des Servers ausgegeben wird. Kann die Reproduktion nicht gelöscht werden, wird der Benutzer durch den NDS-Manager aufgefordert, fortzufahren. Bei Bestätigung wird der Löschvorgang für den Server ausgeführt. Kann der NDS-Manager den Löschvorgang für die Reproduktion ausführen, wird dieser Vorgang in der Titelleiste dargestellt und keine Protokolldatei danach angezeigt. Wurde der Löschvorgang für den Server erfolgreich ausgeführt, dann zeigt der NDS-Manager nach Beendigung der Operation eine Protokolldatei an.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Server entfernen
Server entfernen

Ein oder mehrere Server im Feld Zu aktualisierende Zielserver haben eine neuere Version von DS.VLM (NDS) als der ausgewählte Ursprungsserver. Wählen Sie OK, um die Server mit der aktuelleren DS-Version aus der Zielliste zu entfernen.

Oder

Ein oder mehrere Server im Feld Zu aktualisierende Zielserver haben ein anderes Betriebssystem als der ausgewählte Ursprungsserver, (z. B. könnte der Zielserver unter Netware  4.11 oder umgekehrt.) Wählen Sie OK, um alle nicht kompatiblen Server mit der aktuelleren DS-Version aus der Zielliste zu entfernen.


IDH_Lokale Datenbank reparieren
Lokale Datenbank reparieren

Sie können die Datensätze Ihrer lokalen Datenbank reparieren, wenn Ihre NDS*-Datenbank beschädigt ist. Mit dieser Operation werden Inkonsistenzen in der lokalen NDS-Datenbank behoben. Danach kann die Datenbank geöffnet und auf sie zugegriffen werden.

Nach Beendigung der Reparatur wird ein Protokoll angezeigt, mit dem Sie die vollständige Durchführung der Reparatur überprüfen können.

Wenn Objekte in einer Reproduktion beschädigt sind, löschen Sie die Reproduktion, und fügen Sie sie wieder hinzu. Sie können auch eine Aktualisierung durch die Hauptreproduktion durchführen, damit eine Synchronisation mit den anderen Reproduktionen in der Partition sichergestellt ist.

Wenn Sie diese Operation durchführen, ist der Benutzerzugriff auf die Ressourcen des entsprechenden Servers kurzzeitig eingeschränkt.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Netzwerkadressen reparieren
Netzwerkadressen reparieren

Durch das Reparieren von Netzwerkadressen wird gewährleistet, daß die Server im Netzwerk die richtigen Adressen versenden.

Bei dieser Operation werden die Netzwerkadressen des gewünschten Servers in der lokalen NDS*-Datenbank überprüft, indem das System in den lokalen SAP-Tabellen nach dem Server-Namen sucht.

Eine in SAP gefundene Adresse wird mit der IPX-Netzwerkadresseneigenschaft des NetWare Server-Objekts und den Adressen in jeder Reproduktionseigenschaft aller Partitionsstammobjekte verglichen. Weicht die gefundene Adresse davon ab, wird sie aktualisiert.

Wenn dem SAP-Namen keine Adressen zugeordnet werden können, finden keine Reparaturen statt.

Wenn NDS-Fehler wegen Kommunikationsstörungen zwischen Servern auftreten, können Sie als erste Fehlerbehebungsmaßnahme die Netzwerkadressen reparieren. Bei dieser Operation bleibt der Zugriff auf die NDS-Datenbank erhalten. Sie kann jederzeit problemlos durchgeführt werden.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Reproduktion reparieren
Reproduktion reparieren

Mit dieser Operation wird eine gewählte Reproduktion repariert. Dabei werden die Informationen zum Reproduktionsring auf jedem Server überprüft, auf dem sich eine Reproduktion befindet, und die Informationen zu Fern-IDs validiert.

Wenn Sie die Operation Lokale Datenbank reparieren nicht während der letzten 30 Minuten ausgeführt haben, sollten Sie dies vor dem Ausführen dieser Operation nachholen.


IDH_Volume-Objekte reparieren
Volume-Objekte reparieren

Zweck

Mit dieser Operation wird die Verbindung aller aktivierten Volumes mit den Volume-Objekten in der NDS*-Datenbank überprüft.

Wenn das Volume nicht mit einem Volume-Objekt verbunden ist, wird nach einem Volume im Kontext des NetWare* Server-Objekts gesucht. Ist das Volume gefunden worden, wird das Volume-Objekt an das Volume angefügt. Andernfalls wird versucht, eines zu erstellen.

Zum Erstellen eines Volumes müssen Sie sich mit den entsprechenden Rechten zum Erstellen eines Volume-Objekts im Server-Kontext anmelden.

Optionen

Trustee-IDs prüfen

Mit dieser Option werden vom NDS-Manager Trustee-Zuordnungen im Dateisystem anhand von Benutzerobjekt-IDs validiert und ungültige gelöst.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Reproduktionsinformationen
Reproduktionsinformationen

Zweck

Wenn Sie überprüfen möchten, ob eine Reproduktion den Status Ein hat und mit dem Rest des Baums synchron ist, können Sie die Reproduktionsinformationen anzeigen lassen. Diese geben Auskunft über den allgemeinen Zustand und Status der Reproduktion. Bei etwaigen Synchronisationsfehlern können Sie die Operation Partitionskontinuität überprüfen für die jeweilige Partition der Reproduktion ausführen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Objekt auswählen
Objekt auswählen

Zweck

Sie können den Verzeichnisbaum durchsuchen, um einen Behälter (einen Kontext) im Verzeichnis zu finden.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Aktualisierungen senden
Aktualisierungen senden

Zweck

Wenn Sie Aktualisierungen einer Reproduktion senden, werden die NDS*-Objekte dieser Reproduktion vom Server, auf dem sich die Reproduktion befindet, an alle anderen Reproduktionen der Partition gesendet (einschließlich der Hauptreproduktion).

Die anderen Reproduktionen der Partition kombinieren die neuen übermittelten Objekte mit den bereits vorhandenen Objekten. Wenn die anderen Reproduktionen zusätzliche Daten zu den gesendeten Daten haben, werden diese beibehalten.

Obwohl die Verzeichnisdaten der Reproduktionen automatisch synchronisiert werden (damit jede Reproduktion die zuletzt aktualisierten Verzeichnisobjekte erhält), können Sie mit dieser Operation die Verzeichnisobjekte der Reproduktionen manuell synchronisieren, falls einige Reproduktionen nicht mehr synchron sind.

Optionen

Server gibt den Server an, der die Verzeichnisdaten seiner Reproduktion der Partition sendet.

Partition gibt die Partition an, deren Daten zu den einzelnen Reproduktionen gesendet werden.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Server-Informationen
Server-Informationen

Zweck

Mit Hilfe von Server-Informationen können Sie den allgemeinen Zustand und Status eines Servers im Baum überprüfen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].


IDH_Baumanzeige
Baumanzeige

Zweck

Die Baumanzeige (Standardanzeige) ist eine von drei Ansichten, die Sie zum Arbeiten im NDS*-Manager aufrufen können (daneben gibt es noch die Liste der Partitionen und Server und die Ansicht Partitionsdiagnose).

In der Baumanzeige werden nur Behälterobjekte und NetWare* Server-Objekte des aktuellen Kontexts in ihrer hierarchischen Struktur angezeigt. Wenn Sie Behälter und Server unterhalb des aktuellen Kontexts anzeigen lassen möchten, durchsuchen Sie den Baum, indem Sie die Behälter erweitern.

Wählen Sie Ansicht > Partitionen und Server, oder wählen Sie [image] aus der Tastenleiste, um eine Liste aller Partitionen und Server im aktuellen Kontext und darunter anzeigen zu lassen, ohne die Behälter erweitern zu müssen.

Für Reparaturen müssen Sie zunächst eine Partition und anschließend Objekt > Partitionsdiagnose oder [image] aus der Tastenleiste wählen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Synchronisationsinformationen aktualisieren
Synchronisationsinformationen aktualisieren

Zweck

Mit dieser Operation wird der Status der gewählten Partition vom NDS*-Manager erneut gelesen. Sie kann jederzeit durchgeführt werden. Der Partitionsstatus wird einfach aktualisiert und neu angezeigt.

Es empfiehlt sich, den Synchronisationsstatus zu aktualisieren, wenn NDS-Fehler auftreten oder kürzlich Partitionsoperationen durchgeführt wurden. Beim Aktualisieren des Partitionsstatus lassen sich Synchronisationsfehler der gewählten Partition feststellen, indem Sie die Option Partitionskontinuität überprüfen wählen.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Fern-Server-IDs prüfen
Fern-Server-IDs prüfen

In einem NDS*-Baum gibt es auf jedem Server für alle Objekte eindeutige IDs. Die Liste der Fern-Server-IDs enthält die IDs eines Server-Objekts in anderen Server-Datenbanken. Ist die Fern-ID falsch, wird von diesem Server ein NDS-Fehler zurückgegeben, weil er die ID nicht beglaubigen kann.

Mit dieser Operation werden folgende Informationen überprüft: der Name des Fern-Servers, die ID des Fern-Servers in dieser Server-Datenbank sowie die Fern-ID, d. h. die ID dieses Servers in der Datenbank des Fern-Servers. Wenn Fehler entdeckt werden, erfolgt automatisch der Versuch, die Server-IDs zu reparieren.

Bei dieser Operation bleibt der Zugriff auf die NDS-Datenbank erhalten. Daher können Sie sie als erste Fehlerbehebungsmaßnahme ausführen, wenn Sie in der Ansicht Partitionsdiagnose NDS-Fehler festgestellt haben.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_NDS-Version anzeigen
NDS-Version anzeigen

Zweck

Lassen Sie sich die NDS*-Version für die Server im Verzeichnisbaum anzeigen, um zu überprüfen, ob gemäß der Version des Betriebssystems die aktuellsten DS.NLM-Versionen verwendet werden.

Wenn Sie beispielsweise feststellen, daß auf bestimmten Servern des Baums die NDS-Version 463 läuft (eine NetWare* 4.1 Version von DS.NLM), während auf anderen Servern die Version 496 läuft (eine aktualisierte NetWare 4.1 Version von DS.NLM), dann sollten Sie den Server mit der Version 463 aktualisieren, und zwar ausgehend vom Server mit der Version 489.

In NetWire*, dem elektronischen Forum von Novell, erfahren Sie, welches die aktuellsten NDS-Versionen für bestimmte Betriebssysteme sind.

Optionen

Wenn Sie Beschreibungen der Funktionen erhalten möchten, klicken Sie auf das Symbol [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Protokoll anzeigen
Protokoll anzeigen

Nach einer Reparatur wird eine Protokolldatei über die erfolgreiche bzw. nicht erfolgreiche Durchführung einer Operation angezeigt.

Bei Reparaturen können Sie anhand der Informationen in der Protokolldatei beispielsweise feststellen, ob die Reparatur erfolgreich war, oder ob weitere Schritte zur Behebung von Synchronisationsfehlern notwendig sind.

Die Protokolldatei einer Reparatur (DSREPR.LOG) wird vom NDS-Manager intern gespeichert. Sie finden sie im Verzeichnis SYS:SYSTEM des Servers, auf dem die Reparaturoperation ausgeführt wird. Wenn Sie die Protokollinformationen angezeigt haben, können Sie sie in einer anderen Datei speichern. Sie können jedoch keine andere Protokolldatei festlegen, in die die Ergebnisse geschrieben werden sollen. Die Datei wird nach jeder Reparatur zurückgesetzt. Sie können der Datei nichts anfügen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


IDH_Protokoll für Aktualisierung anzeigen
Protokolldatei für Aktualisierung der Version anzeigen

Nach der Ausführung einer Operation zur Aktualisierung der NDS-Version zeigt der NDS-Manager diese Protokolldatei an, anhand der Sie nach eventuellen Fehlern suchen können.

Über zahlreiche Optionen können Sie festlegen, wie der NDS-Manager die Protokolldatei für die Aktualisierungen der NDS-Version anlegt. Der standardmäßige Standort der Protokolldatei ist Ihr WINDOWS**-Verzeichnis; Sie können jedoch auch einen anderen Standort unter Präferenzen (im Objekt menü) angeben.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Installationsanweisungen
Installationsanweisungen für den NDS-Manager

Sie können den NDS*-Manager so installieren, daß man ihn als Einzelplatzversion von SYS:PUBLIC aus oder im Werkzeugmenü im NetWare* Administrator als Werkzeug ausführen kann.

Wenn Sie den NDS-Manager als Einzelplatzversion unter Windows 3.1** ausführen möchten, erstellen Sie ein Symbol, das auf die Datei NDSMGR16.EXE im Verzeichnis SYS:PUBLIC verweist. Unter Windows 95** erstellen Sie ein Icon oder eine Zugriffstaste, die auf die Datei NDSMGR32.EXE im Verzeichnis SYS:PUBLIC\WIN95 verweist.

WINDOWS 3.1

Wenn Sie den NDS-Manager so installieren möchten, daß man ihn über das Werkzeugmenü im NetWare Administrator aufrufen kann (sofern nicht bereits NetWare Administrator verwendet wurde), müssen Sie den NetWare Administrator öffnen und schließen und anschließend im WINDOWS-Verzeichnis die Datei NWADMR3X.INI bearbeiten. Fügen Sie dem Abschnitt [Snapin Object DLLs WIN3X] folgende Zeile hinzu:

NDSMGR = NMSNAP16.DLL

Beim nächsten Start des NetWare Administrators sollte NDS-Manager als Option im Werkzeugemenü erscheinen.

Wenn Sie den NetWare Administrator mit dem Befehlszeilenparameter /N ausführen (dies bewirkt eine Registrierung Ihrer Einstellungen in Ihrem Benutzerobjekt im NDS-Verzeichnis), dann müssen Sie den NetWare Administrator öffnen und schließen und anschließend folgendermaßen vorgehen:

1.	Das Benutzerobjekt des Benutzers wählen, der den NDS-Manager verwenden wird.

2.	Mit der rechten Maustaste auf dieses Benutzerobjekt klicken und Details wählen.

3.	Schaltfläche Netware Registry Editor auswählen.

4.	Unter Schlüssel SNAPIN OBJECT DLLS WIN3X wählen.

Hinweis: Falls im Netware Registry Editor keine Einträge vorhanden sind, fügen Sie SNAPIN OBJECT DLLS WIN3X hinzu, indem Sie unter Schlüssel die Schaltfläche Hinzufügen wählen.

5.	Unter Werte die Schaltfläche Hinzufügen wählen.

6.	Bei Wertname NDSMGR eingeben.

7.	Bei Wert NMSNAP16.DLL eingeben.

8.	Als Typ Zeichenfolge auswählen.

9.	Hinzufügen wählen.

Beim nächsten Start des NetWare Administrators sollte NDS-Manager als Option im Werkzeugemenü erscheinen.

WINDOWS 95

Wenn Sie den NDS-Manager so installieren möchten, daß man ihn im Werkzeugmenü im NetWare Administrator ausführen kann, müssen Sie den 32-Bit NetWare Administrator mindestens einmal ausführen und anschließend Ihre Registrierung bearbeiten.

Führen Sie folgende Schritte aus:

1.	REGEDIT ausführen (zum Bearbeiten der Registrierung).

2.	HKEY_CURRENT_USER\Software\NetWare\Parameters\NetWare Administrator wählen.

3.	Bei markiertem NetWare Administrator im Bearbeitungsmenü zuerst die Option Neu und anschließend Schlüssel wählen.

4.	Snapin Object DLLs eingeben und <Enter> drücken.

5.	Bei markiertem Snapin Objects DLLs im Bearbeitungsmenü zuerst die Option Neu und anschließend Zeichenkettenwert wählen.

6.	NDSMGR eingeben und <Enter> drücken.

7.	Bei markiertem NDSMGR im Bearbeitungsmenü die Option Ändern wählen.

8.	Im Feld Wert den Wert NMSNAP32.DLL eingeben und anschließend die Eingabe mit OK bestätigen.

Ab sofort sollte der NDS-Manager als Option im Werkzeugmenü des NetWare Administrators angezeigt werden.

Wenn Sie den NetWare Administrator mit dem Befehlszeilenparameter /N ausführen (wodurch Ihre Einstellungen in Ihrem Benutzerobjekt im Verzeichnis registriert werden), führen Sie die folgenden Schritte aus:

1.	NetWare Administrator für Windows NT öffnen.

2.	Das entsprechende Benutzerobjekt für den NDS-Manager auswählen.

3.	Mit der rechten Maustaste klicken und Details auswählen.

4.	Die Schaltfläche NetWare Registry Editor auswählen.

5.	Unter Schlüssel die Option SNAPIN OBJECT DLLS WIN95 auswählen.

Hinweis: Wenn im Netware Registry Editor nichts angezeigt wird, SNAPIN OBJECT DLLS WIN95 über die Schaltfläche Hinzufügen unter Schlüssel. hinzufügen

6.	Unter Werte die Option Hinzufügen auswählen.

7.	In Wertname NDSMGR eingeben.

8.	In Wert NMSNAP32.DLL eingeben.

9.	Als Typ Zeichenkette auswählen.

10. Hinzufügen auswählen.

Beim nächsten Start des NetWare Administrator sollte NDS Manager als Option unter dem Werkzeugmenü angezeigt werden.

Windows NT

Wenn Sie den NDS-Manager so einrichten möchten, daß man ihn vom Werkzeugmenü im NetWare* Administrator ausführen kann, führen Sie die folgenden Schritte aus:

1.	Windows NT NetWare Administrator (ohne Befehlszeilenparameter) starten.

2.	Im Optionsmenü die Option Einstellungen beim Beenden speichern auswählen.

3.	NetWare Administrator schließen.

4.	REGEDT32.EXE (zur Bearbeitung der Registrierung) starten.

5.	HKEY_CURRENT_USER\Software\NetWare\Parameter\NetWare Administrator auswählen.

6.	Wenn Snapin Object DLLs WINNT markiert ist, im Bearbeitungsmenü die Option Wert hinzufügen auswählen.

7.	Im Feld Wertname NMSNAPNT.DLL eingeben.

8.	Im Feld Datentyp REG_MULTI_SZ aus dem Pulldown-Menü auswählen.

9.	OK auswählen.

10.	NMSNAPNT.DLL in das Feld Daten eingeben und OK auswählen.

11.Den Registrierungseditor beenden.

Beim nächsten Start des NetWare Administrator sollte der NDS-Manager als Option im Werkzeugmenü angezeigt werden.

Wenn Sie den NetWare Administrator mit dem Befehlszeilenparameter /N ausführen (wodurch Ihre Einstellungen in Ihrem Benutzerobjekt im Directory registriert werden), führen Sie die folgenden Schritte aus:

1.	NetWare Administrator für Windows NT öffnen.

2.	Das entsprechende Benutzerobjekt für den NDS-Manager auswählen.

3.	Mit der rechten Maustaste klicken und Details auswählen.

4.	Die Schaltfläche NetWare Registry Editor auswählen.

5.	 Unter Schlüssel die Option SNAPIN OBJECT DLLS WINNT auswählen.

Hinweis: Wenn im NetWare Registry Editor nichts angezeigt wird, SNAPIN OBJECT DLLS WINNT über die Schaltfläche Hinzufügen unter Schlüssel hinzufügen.

6.	Unter Werte die Option Hinzufügen auswählen.

7.	In Wertname NDSMGR eingeben.

8.	In Wert NMSNAPNT.DLL eingeben.

9.	Als Typ Zeichenkette auswählen.

10. Hinzufügen auswählen.

11.	OK auswählen.

12.	Den Registry Editor beenden.

Beim nächsten Start des NetWare Administrator sollte der NDS-Manager als Option unter dem Werkzeugmenü angezeigt werden.

Zugriffssteuerung

Sie können den Zugriff auf den NDS-Manager steuern, indem Sie den Zugriff auf folgende Dateien beschränken:

Wenn Sie Windows 95 verwenden: NDSGMR16.EXE\ NMSNAP16.DLL

Wenn Sie Windows 95 verwenden: NDSMGR32.EXE\ NMSNAP32.DLL

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Partition mit übergeordneter Partition zusammenführen

Zweck

Beim Zusammenführen einer Partition wird die gewählte Partition einschließlich ihrer Reproduktionen mit der übergeordneten Partition zu einer einzigen Partition vereint.

Sie können Partitionen entweder in der Baumanzeige oder der Liste der Partitionen und Server zusammenführen.

Partition zusammenführen

1.	Die Partition auswählen, die mit der übergeordneten Partition zusammengeführt werden soll.

2.	Partition zusammenführen [image] wählen.

3.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Zusammenführen einer Partition.


Partition (Behälter) verschieben

Zweck

Durch das Verschieben einer Partition können Sie einen Unterbaum in Ihren Verzeichnisbaum verschieben. Das Stammobjekt einer Partition (also ein Behälterobjekt) kann nur verschoben werden, wenn keine untergeordneten Partitionen existieren.

Sie können Partitionen entweder in der Baumanzeige oder der Liste der Partitionen und Server verschieben.

Partition verschieben

1.	Die Partition wählen, die verschoben werden soll

2.	Partition verschieben [image] wählen.

3.	(Optional) Wenn Sie eine Partition in einen anderen Kontext als das Stammverzeichnis des aktuellen Baums verschieben möchten, geben Sie entweder in das Feld In Kontext einen neuen Kontext ein, oder wählen Sie das Symbol für "Durchsuchen" [image] und anschließend im Browser die Zielpartition.

4.	(Optional) Einen Alias für dieses Behälterobjekt erstellen aktivieren.

Siehe hierzu Erstellen eines Alias beim Verschieben eines Behälterobjekts.

5.	Ja wählen.

6.	Anforderung bestätigen.

Weitere Informationen zu diesem Thema und zum Erstellen eines Alias beim Verschieben eines Behälters finden Sie unter Übersicht zum Verschieben einer Partition.


 Inhaltsübersicht der Hilfe zum NDS-Manager

Einführung zum NDS-Manager

Übersicht zum NDS-Manager

Richtlinien für das Erstellen von Baumpartitionen und -reproduktionen

Arbeiten mit dem NDS-Manager

Übersicht zum Arbeiten mit dem NDS-Manager

Arbeiten mit Partitionen

Arbeiten mit Reproduktionen

Arbeiten mit Servern

Arbeiten mit Reparaturoperationen

Arbeiten mit Präferenzen und Druckoptionen

Arbeiten mit dem Schemaverwalter

Referenz

NDS-Fehlercodes

Kompatibilität

Installationsanweisungen für den NDS-Manager

Marken


Übersicht zum Erstellen und Zusammenführen von Partitionen

Übersicht zum Erstellen einer Partition

Wenn Sie Partitionen erstellen, teilen Sie Ihren NDS*-Baum nach logischen Gesichtspunkten auf. Von den einzelnen Elementen können Reproduktionen erstellt und auf verschiedene NetWare 4*-Server im Netzwerk verteilt werden.

Beim Erstellen einer neuen Partition wird die übergeordnete Partition in zwei Partitionen aufgeteilt. Die neue Partition wird zur untergeordneten Partition.

Beispiel: Wenn Sie eine organisatorische Einheit als neue Partition erstellen möchten, trennen Sie die organisatorische Einheit mit allen ihren untergeordneten Objekten von der übergeordneten Partition.

Die gewählte organisatorische Einheit wird zum Stamm (Root) einer neuen Partition. Die Reproduktionen der neuen Partition werden denselben Servern zugeordnet, auf denen die Reproduktionen der übergeordneten Partition vorhanden sind, und Objekte in der neuen Partition gehören zum Stammobjekt dieser Partition.

Eine Partition besteht aus mindestens einem Behälterobjekt und den zugehörigen untergeordneten Objekten. Der oberste Behälter der Partition wird als "Stamm" bezeichnet.

Das Erstellen einer Partition kann einige Zeit in Anspruch nehmen, da sämtliche Reproduktionen anhand der neuen Partitionsinformationen synchronisiert werden müssen.

Beim Erstellen einer neuen Partition werden Sie vom NDS-Manager benachrichtigt, daß NDS den Befehl zum Erstellen einer Partition empfangen hat. Wenn Sie eine weitere Partitionsoperation durchführen, während die Partition erstellt wird, erhalten Sie eine Nachricht, daß die Partition momentan beschäftigt ist.

Sie können in der Reproduktionsliste der neuen Partition überprüfen, ob die Operation beendet wurde. In diesem Fall haben alle Reproduktionen den Status Ein. Sie müssen die Ansicht regelmäßig manuell aktualisieren, damit Statusänderungen angezeigt werden.

Übersicht zum Zusammenführen einer Partition

Beim Zusammenführen einer Partition wird die gewählte Partition einschließlich ihrer Reproduktionen mit der übergeordneten Partition vereint. Es werden keine Partitionen gelöscht, sondern nur zusammengeführt und erstellt. Damit teilen Sie Ihren Verzeichnisbaum nach logischen Gesichtspunkten auf.

Es gibt verschiedene Gründe für das Zusammenführen einer Partition mit der übergeordneten Partition:

Die Verzeichnisdaten in den beiden Partitionen hängen eng zusammen

Sie möchten eine untergeordnete Partition löschen, jedoch nicht die zugehörigen Objekte

Sie möchten die Objekte in der Partition löschen

Sie möchten alle Reproduktionen der Partition löschen (die Hauptreproduktion der Partition läßt sich nur löschen, indem man die Partition mit der übergeordneten Partition zusammenführt)

Nach dem Verschieben eines Behälters (der Behälter muß ein Partitionsstamm ohne untergeordnete Partitionen sein) soll der Behälter als Partition entfernt werden

Die Organisationsstruktur Ihres Unternehmens hat sich geändert, und Sie müssen die Partitionsstruktur im Verzeichnisbaum anpassen

Umfangreiche Partitionen mit Hunderten von Objekten sollten Sie nicht zusammenführen, da große Partitionen die Antwortzeiten im Netz erheblich verlangsamen.

Die Stammpartition des Baums kann nicht zusammengeführt werden, da es sich um die oberste Partition handelt, der keine Partition übergeordnet ist.

Die Partitionen sind zusammengeführt, wenn der Vorgang auf den Servern beendet ist. Dies kann einige Zeit in Anspruch nehmen.

Warnung: Prüfen Sie vor dem Zusammenführen einer Partition die Synchronisation beider Partitionen und beheben Sie alle Fehler, bevor Sie fortfahren. Dadurch können Sie Probleme im Verzeichnis isolieren und vermeiden, daß sich die Fehler ausbreiten oder neue entstehen.

Vergewissern Sie sich, daß alle Server mit Reproduktionen (einschließlich untergeordneter Referenzen) der Partition, die zusammengeführt werden soll, hochgefahren sind, bevor Sie mit dem Zusammenführen beginnen. Andernfalls kann die Operation nicht durchgeführt werden, da NDS die Reproduktionen der Server nicht lesen kann.

Wenn beim Zusammenführen einer Partition Fehler auftreten, sollten diese sofort behoben werden. Wenn Sie statt dessen weitere Operationen durchführen, werden nur weitere Fehler auftreten.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Verschieben einer Partition und Abbrechen einer Partitionsoperation

Übersicht zum Verschieben einer Partition

Durch das Verschieben einer Partition können Sie einen Unterbaum in Ihren Verzeichnisbaum verschieben. Das Stammobjekt einer Partition (also ein Behälterobjekt) kann nur verschoben werden, wenn keine untergeordneten Partitionen existieren.

Anmerkung: Beim Verschieben einer Partition müssen Sie sich an die NDS*-Inhaltsregeln halten. Sie können beispielsweise eine organisatorische Einheit nicht unmittelbar unter das Stammverzeichnis des aktuellen Baums verschieben, da die entsprechenden Inhaltsregeln des Stammverzeichnisses nur "Standort" bzw. "Land oder Organisation" zulassen und nicht "Organisatorische Einheit".

Wenn Sie eine Partition verschieben, ändert NDS alle Referenzen zum Stammobjekt der Partition. Der Eigenname der Objekts bleibt zwar gleich, jedoch wird der vollständige Name des Behälters (einschließlich aller untergeordneter Elemente) geändert.

Beim Verschieben einer Partition sollten Sie das Erstellen eines Aliasobjekts in Erwägung ziehen, das den Platz des Behälters einnimmt, den Sie verschieben. Damit wird den Benutzern weiterhin ermöglicht, sich beim Netzwerk anzumelden und Objekte in ihrem ursprünglichen Verzeichnis zu suchen.

Das Aliasobjekt erhält den Eigennamen des verschobenen Behälters und verweist auf dessen neuen vollständigen Namen.

Warnung: Wenn Sie eine Partition verschieben, ohne sie durch ein Aliasobjekt zu ersetzen, haben andere Benutzer eventuell Schwierigkeiten, die Partitionsobjekte im Verzeichnisbaum zu finden, da sie im ursprünglichen Verzeichnis danach suchen werden.

Das kann auch dazu führen, daß sich Client-Arbeitsstationen nicht mehr anmelden können, wenn der Parameter für den Namenskontext auf das ursprüngliche Verzeichnis im Baum verweist, in dem sich der Behälter befand.

Da sich durch das Verschieben der Kontext eines Objekts ändert, müssen Benutzer, deren Namenskontext auf das verschobene Objekt verweist, den Parameter für den Namenskontext auf ihrer Arbeitsstation aktualisieren, damit dieser auf den neuen Objektnamen verweist.

Wenn Sie nach dem Verschieben eines Behälterobjekts den Namenskontext für Benutzer automatisch aktualisieren möchten, verwenden Sie das NCUPDATE-Dienstprogramm.

Führen Sie nach dem Verschieben die Partition mit der übergeordneten Partition zusammen, wenn Sie sie nicht selbständig beibehalten möchten.

Vor dem Verschieben einer Partition müssen Sie sicherstellen, daß die Synchronisierung im Verzeichnisbaum fehlerfrei abläuft. Bei Synchronisationsfehlern in der zu verschiebenden oder in der Zielpartition dürfen keine Partitionsoperationen durchgeführt werden, solange die Fehler nicht behoben sind.

Übersicht zum Abbrechen einer Partitionsoperation

Sie können das Erstellen oder Zusammenführen von Partitionen bis zu einem bestimmten Punkt während der Operation abbrechen.

Verwenden Sie diese Funktion, wenn Sie eine Operation abbrechen möchten, das NDS-Netzwerk nach einer Partitionsoperation NDS-Fehler meldet oder keine Synchronisierung stattfindet.

Anmerkung: Bei Synchronisationsfehlern von Reproduktionen im Verzeichnisbaum wird durch das Abbrechen der Operation nicht automatisch das Problem behoben. Sie können diese Funktion jedoch als erste Fehlerbehebungsmaßnahme verwenden.

Wenn eine Partitionsoperation nicht beendet werden kann, weil ein Server heruntergefahren ist oder aus einem anderen Grund nicht zur Verfügung steht, dann sorgen Sie dafür, daß das Netzwerk den Server zur Durchführung der Operation erkennt, oder brechen Sie die Operation ab. Wenn wegen Beschädigung der Datenbank keine Synchronisierung stattfindet, sollten Sie sämtliche Partitionsoperationen abbrechen.

Bei vielen Partitionsoperationen kann es einige Zeit in Anspruch nehmen, bis eine netzwerkweite Synchronisierung stattfindet. Dies hängt von der Anzahl der beteiligten Reproduktionen, der Erkennbarkeit der Server und der Auslastung des Netzes ab.

Wenn Sie die Fehlermeldung erhalten, daß eine Partition beschäftigt ist, müssen Sie deshalb die Operation nicht abbrechen. Partitionsoperationen werden in der Regel innerhalb von 24 Stunden abgeschlossen. Wenn eine bestimmte Operation diesen Zeitraum überschreitet, sollten Sie die laufende Operation abbrechen.

Hinweis: Wenn Sie das Zusammenführen von Partitionen abbrechen möchten, wählen Sie die (untergeordnete) Partition, die mit der übergeordneten Partition zusammengeführt wird. Wenn Sie das Erstellen von Partitionen abbrechen möchten, wählen Sie die übergeordnete Partition.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum NDS-Manager

Der Novell Directory Services*-Manager (NDS*-Manager) ersetzt in NetWare* 4.11 das Dienstprogramm Partition Manager, das in früheren NetWare 4 Versionen im "Werkzeugemenü" des NetWare Administrators aufgerufen werden konnte.

Mit dem NDS-Manager haben Sie folgende Möglichkeiten:

Partitionen und Reproduktionen für NDS auf einem NetWare Server erstellen

Die NDS-Datenbank von einer Client-Arbeitsstation aus reparieren, wodurch der Netzwerkverwalter nicht mehr notwendigerweise RCONSOLE verwenden muß

NDS-Versionen aktualisieren, damit NetWare 4*-Server in einem Netzwerk mit einer neueren DS NLM-Version aktualisiert werden können

Eine Liste der Partitionen im Verzeichnisbaum, die Reproduktionsliste (den Reproduktionsring) und Server-Daten drucken

Diagnosefunktionen, mit denen der Verwalter den allgemeinen Zustand des Verzeichnisbaums überprüfen kann

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Einstellen von Präferenzen und Druckoptionen

Mit Hilfe des NDS-Managers können Sie Einstellungen vornehmen, die festlegen, wie Informationen angezeigt werden sollen. Sie können ebenfalls von allen Ansichten im NDS-Manager aus Informationen drucken.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Arbeiten mit dem NDS-Manager

Der NDS*-Manager hilft Ihnen beim Verwalten von Partitionen, Reproduktionen und Servern, bei der Durchführung von Reparaturen, der Aktualisierung von DS.NLM-Versionen sowie bei Druckvorgängen und der Einstellung von Präferenzen.

Arbeiten in Ansichten

Der größte Teil der Operationen kann entweder über die hierarchische Baumanzeige oder die Liste der Partitionen und Server ausgeführt werden. Sie werden in der Tastenleiste durch die Symbole [image] und [image] repräsentiert. Schließlich steht Ihnen zum Arbeiten mit dem NDS-Manager noch die Ansicht Partitionsdiagnose zur Verfügung, in der Sie sich den Zustand Ihres Baums anzeigen und Reparaturoperationen durchführen können. Vor der Benutzung des NDS-Managers sollten Sie sich die Zeit nehmen und kurz in diese Ansichten gehen, um sich mit den darin enthaltenen Funktionen und Optionen vertraut zu machen.

Ausführen von Operationen

Auf die Optionen für die auszuführenden Operationen greifen Sie über die Schaltflächen oder Menüleiste bzw. durch Klicken mit der rechten Maustaste zu. Wenn Sie mit der rechten Maustaste auf einen Server, eine Reproduktion oder eine Partition klicken, erscheint ein Pop-up-Menü mit den meisten der für dieses Objekt verfügbaren Optionen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Hinzufügen, Löschen und Ändern des Reproduktionstyps

Wenn Sie dieses Thema durchsuchen möchten, ohne einen Bildlauf durchzuführen, klicken Sie auf Siehe auch.

Übersicht zum Hinzufügen einer Reproduktion

Wenn Sie mehrere NDS*-Partitionen erstellen, wird nicht automatisch die Fehlertoleranz oder die Leistungsfähigkeit des Verzeichnisses erhöht. Sie können dies aber durch die strategische Verwendung mehrerer Reproduktionen erreichen.

Wenn genügend Server für den Verzeichnisbaum vorhanden sind, werden von Novell* mindestens drei echte Reproduktionen je Partition empfohlen. Mit "echten Reproduktionen" sind Haupt-, Schreib-/Lese- oder Nur-Lese-Reproduktionen gemeint. Untergeordnete Referenz-Reproduktionen werden nicht vom Verwalter, sondern von NDS erstellt und verwaltet.

Mit NDS-Reproduktionen haben Sie folgende Möglichkeiten:

Fehlertoleranz festlegen

Bei einem schwerwiegenden Plattenfehler oder beim Ausfall eines Servers ermöglichen die Reproduktionen auf anderen Servern, daß Benutzer weiterhin im Netzwerk beglaubigt und Objektinformationen zu Partitionen des fehlerhaften Servers abgerufen werden können.

Da die gleichen Informationen auf verschiedenen Servern vorhanden sind, sind Sie bei der Beglaubigung im Netzwerk oder beim Abrufen von Services (z. B. Anmelden) nicht vom Funktionieren eines einzelnen Servers abhängig.

Ein Server kann die Reproduktionen mehrerer Partitionen speichern.

Anmerkung: Die Verzeichnisreproduktion stellt keine Fehlertoleranz für das Dateisystem zur Verfügung. Es werden nur Informationen zu Verzeichnisobjekten reproduziert.

Wenn Sie Fehlertoleranz für Ihre Dateien festlegen möchten, müssen Sie Ihre Festplatten spiegeln oder duplizieren und die Funktion zur Transaktionsverfolgung TTS* (Transaction Tracking System*) aktivieren. Mit der Installation des Servers ist TTS automatisch aktiviert.

Schnellerer Zugriff über eine WAN-Verbindung

Wenn Benutzer spezielle Verzeichnisinformationen mit Hilfe einer WAN-Verbindung abrufen, kann der Zugriff beschleunigt und der WAN-Verkehr reduziert werden, wenn eine Reproduktion mit den benötigten Informationen einem Server zugewiesen wird, auf den vom Benutzer lokal zugegriffen werden kann.

Es besteht jedoch die Möglichkeit, daß der WAN-Verkehr durch die erforderliche Synchronisation zunimmt.

Schnellerer Zugriff auf Verzeichnisdaten

Das Verteilen von Reproduktionen auf Netzwerk-Servern ermöglicht ein schnelles und zuverlässiges Abrufen von Informationen, da im Normalfall auf den nächsten verfügbaren Server mit den gewünschten Informationen zugegriffen wird.

Bindery-Services

Wenn Sie die Reproduktion einer Partition zu einem Server hinzufügen und den Bindery-Kontext entsprechend einstellen, können Benutzer Bindery-Services von NDS-Objekten in dieser Partition abrufen.

Es müssen jedoch echte Objekte auf dem Server vorhanden sein, damit ein Benutzer auf NDS-Objekte mit Bindery-Services zugreifen kann. Wenn Sie die Reproduktion einer Partition zu einem Server hinzufügen, bedeutet dies die Zuweisung echter Objekte. Daher können sich Benutzer mit Benutzerobjekten in dieser Partition durch eine Bindery-Verbindung beim Server anmelden.

Wenn eine Partition auf einem Server nicht gespeichert ist, kann der Befehl zum Einstellen des Bindery-Kontexts für Kontexte dieser Partition nicht ausgeführt werden.

Es kann nur eine Hauptreproduktion geben. Bei zusätzlichen Reproduktionen muß es sich um Schreib-/Lese- oder Nur-Lese-Reproduktionen handeln.

Auf einem Server können Sie nur eine Reproduktion für jede Partition speichern. Ein Server kann allerdings die Reproduktionen mehrerer Partitionen speichern.

Die meisten Reproduktionen sollten den Schreib-/Lese-Status haben. Diese Reproduktionen sind beschreibbar und stehen genau wie die Hauptreproduktion für das Anzeigen und Verwalten von Objekten und die Benutzeranmeldung zur Verfügung. Bei Änderungen senden sie Synchronisationsinformationen.

Nur-Lese-Reproduktionen sind nicht beschreibbar. Sie dienen der Suche nach und dem Anzeigen von Objekten und werden bei der Synchronisation der Reproduktionen einer Partition aktualisiert.

Übersicht zum Löschen einer Reproduktion

Wenn Sie eine Reproduktion löschen, wird sie vom Server entfernt.

Wenn Sie einen Server aus dem Verzeichnisbaum entfernen möchten, können Sie zuvor Reproduktionen vom Server löschen. Dadurch werden Probleme beim Entfernen des Servers vermieden.

Ebenso können Sie durch das Entfernen von Reproduktionen den Synchronisierungsverkehr auf dem Netzwerk reduzieren. Für gewöhnlich reichen sechs Reproduktionen je Partition aus.

Anmerkung: Hauptreproduktionen können nicht gelöscht werden.

Wenn Sie dennoch eine Hauptreproduktion löschen möchten, haben Sie folgende Möglichkeiten:

Bestimmten Sie einen Server, auf dem sich eine weitere Reproduktion der Partition befindet, und machen Sie sie zur neuen Hauptreproduktion.

Dadurch wird die Hauptreproduktion automatisch in eine Schreib-/Lese-Reproduktion geändert, die dann gelöscht werden kann.

Führen Sie die Partition mit der übergeordneter Partition zusammen.

Dadurch werden die Reproduktionen der Partition mit denen der übergeordneten Partition zusammengeführt und von den Servern gelöscht. Beim Zusammenführen werden zwar die Abgrenzungen zwischen den Partitionen, nicht aber die Objekte gelöscht. Diese Objekte bleiben auf den Servern erhalten, auf denen sich Reproduktionen der zusammengeführten Partition befanden.

Halten Sie sich beim Löschen von Reproduktionen an folgende Richtlinien:

Wegen der Fehlertoleranz sollten auf verschiedenen Servern mindestens drei Reproduktionen der [Root]-Partition vorhanden sein.

Beim Löschen einer Reproduktion wird eine Kopie eines Teils der Verzeichnisdatenbank vom Ziel-Server entfernt.

Auf die Datenbank kann von anderen Netzwerk-Servern aus weiterhin zugegriffen werden, und der Server, auf dem die Reproduktion gespeichert war, bleibt in NDS* eingebunden.

Untergeordnete Referenz-Reproduktionen können nicht gelöscht oder verwaltet werden. Sie werden für einen Server automatisch erstellt, wenn auf dem Server eine Reproduktion der Partition, jedoch nicht der untergeordneten Partition existiert.

Übersicht zum Ändern des Reproduktionstyps

Sie können den Typ einer Schreib-/Lese- oder einer Nur-Lese-Reproduktion ändern. Dies ist bei Hauptreproduktionen nicht möglich.

Allerdings können Sie eine Schreib-/Lese- oder Nur-Lese-Reproduktion zur Hauptreproduktion machen. Dadurch wird die Hauptreproduktion automatisch in eine Schreib-/Lese-Reproduktion geändert.

Die meisten Reproduktionen sollten den Schreib-/Lese-Status haben. Dann können Sie mit Operationen von Arbeitsstationen beschrieben werden. Bei Änderungen sendet dieser Reproduktionstyp Synchronisationsinformationen. Nur-Lese-Reproduktionen können von Arbeitsstationen aus nicht beschrieben werden. Sie werden jedoch beim Synchronisationsvorgang aktualisiert.

Eine untergeordnete Referenz-Reproduktion kann nicht in einen anderen Typ geändert werden. Wenn Sie einem Server die Reproduktion einer Partition zuweisen möchten, für die eine untergeordnete Referenz-Reproduktion existiert, müssen Sie den Befehl zum Hinzufügen einer Reproduktion ausführen.

Untergeordnete Referenz-Reproduktionen sind nur unvollständige Kopien einer Partition. Die Zuweisung und Verwaltung erfolgt durch NDS. Sie werden für einen Server automatisch erstellt, wenn auf dem Server eine Reproduktion der Partition, jedoch nicht der untergeordneten Partition existiert.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Reparieren der NDS-Datenbank

Wenn Sie dieses Thema durchsuchen möchten, ohne einen Bildlauf durchzuführen, klicken Sie auf Siehe auch.

Übersicht zum Überprüfen der Fern-Server-IDs

In einem NDS*-Baum gibt es auf jedem Server für alle Objekte eindeutige IDs. Die Liste der Fern-Server-IDs enthält die IDs eines Server-Objekts auf anderen Server-Datenbanken. Ist die Fern-ID falsch, wird von diesem Server ein NDS-Fehler zurückgegeben, weil er die ID nicht beglaubigen kann.

Mit dieser Operation werden folgende Informationen überprüft: der Name des Fern-Servers, die ID des Fern-Servers in dieser Server-Datenbank sowie die Fern-ID, d. h. die ID dieses Servers in der Datenbank des Fern-Servers. Wenn Fehler entdeckt werden, erfolgt automatisch der Versuch, die Server-IDs zu reparieren.

Bei dieser Operation bleibt der Zugriff auf die NDS-Datenbank erhalten. Daher können Sie sie als erste Fehlerbehebungsmaßnahme ausführen, wenn Sie in der Ansicht Partitionsdiagnose NDS-Fehler festgestellt haben.

Übersicht zum Reparieren einer Reproduktion

Beim Reparieren einer Reproduktion werden die Informationen zum Reproduktionsring auf jedem Server überprüft, auf dem sich eine Reproduktion befindet, und die Informationen zu Fern-IDs validiert. Mit dieser Operation wird nur die gewählte Reproduktion repariert.

Wenn Sie die Operation Lokale Datenbank reparieren nicht innerhalb der letzten 30 Minuten ausgeführt haben, sollten Sie dies vor dem Ausführen dieser Operation nachholen.

Übersicht zum Reparieren von Netzwerkadressen

Sie können Netzwerkadressen reparieren, um zu gewährleisten, daß die Server im Netzwerk die richtigen Adressen übermitteln.

Bei dieser Operation werden die Netzwerkadressen aller Server in der lokalen Datenbank überprüft, indem das System in den lokalen SAP-Tabellen nach dem Server-Namen sucht.

In SAP gefundene Adressen werden mit der IPX-Netzwerkadresseneigenschaft des NetWare* Server-Objekts und den Adressen in jeder Reproduktionseigenschaft aller Partitionsstammobjekte verglichen.

Weicht die gefundene Adresse davon ab, wird sie aktualisiert. Wenn dem SAP-Namen keine Adressen zugeordnet werden können, finden keine Reparaturen am Server statt.

Wenn DS-Fehler wegen Kommunikationsstörungen zwischen Servern auftreten, können Sie zur Fehlerbehebung die Netzwerkadressen reparieren, da der Zugriff auf die NDS-Datenbank erhalten bleibt.

Übersicht zum Reparieren der lokalen Datenbank

Sie können die Datensätze Ihrer lokalen Datenbank reparieren, wenn Ihre NDS-Datenbank beschädigt ist. Dadurch werden Inkonsistenzen in der lokalen Verzeichnisdatenbank behoben. Danach kann die Datenbank geöffnet und auf sie zugegriffen werden.

Nach Beendigung der Reparatur wird ein Protokoll angezeigt, in dem Sie die vollständige Durchführung der Reparatur überprüfen können.

Wenn Objekte in einer Reproduktion beschädigt sind, löschen Sie die Reproduktion, und fügen Sie sie wieder hinzu. Sie können auch eine Aktualisierung durch die Hauptreproduktion durchführen, damit eine Synchronisation mit den anderen Reproduktionen in der Partition sichergestellt ist.

Wenn Sie diese Operation durchführen, ist der Benutzerzugriff auf die Ressourcen des entsprechenden Servers kurzzeitig eingeschränkt.

Übersicht zum Zuweisen einer neuen Hauptreproduktion

Wichtiger Hinweis: Diese Funktion dient nicht dem Ändern eines Reproduktionstyps. Sie sollte nur zu Reparaturzwecken verwendet werden, wenn die aktuelle Hauptreproduktion beschädigt oder verlorengegangen ist.

Weisen Sie eine neue Hauptreproduktion zu, wenn die aktuelle Hauptreproduktion beschädigt ist oder der zugehörige Server an Datenintegrität verliert oder einen Hardware-Fehler aufweist.

Sie benötigen eine Hauptreproduktion zur Durchführung von Partitionsoperationen. Wenn Sie eine neue Hauptreproduktion zuweisen, können Sie eine bestehende Reproduktion in die Hauptreproduktion konvertieren und somit Partitionsoperationen durchführen.

Übersicht zum Entfernen eines Servers aus einer Reproduktionsliste

Warnung:  Der falsche Gebrauch dieser Operation kann zu nicht behebbaren Schäden im NDS-Baum führen.

Wenn ein Server im Reproduktionsring erscheint, der entweder nicht länger Bestandteil des Baums oder auf dem keine Reproduktion mehr vorhanden ist, sollten Sie nicht den Server entfernen, sondern das Server-Objekt löschen.

Das Server-Objekt wird für einen bestimmten Zeitraum gelöscht, der Minuten oder mehrere Stunden dauern kann, und der Reproduktionsring wird entsprechend aktualisiert.

Sie sollten den Server entfernen, wenn es beim Löschen von Server-Objekten wegen starker Beschädigung des NDS-Baums zu Problemen kommt.

Entfernen Sie einen Server von der Reproduktionsliste, wenn eine Synchronisation anderer Server mit einem Server stattfinden soll, auf dem sich keine Reproduktionen der Partition befinden.

Beispiel: Sie entdecken in der Ansicht Partitionsdiagnose oder beim Ausführen des DSTRACE-Programms auf dem Server Fehler, die besagen, daß sich auf dem Server Informationen über einen anderen Server in seiner Reproduktionsliste befinden, der zweite Server jedoch nicht über eine Reproduktion der in Frage kommenden Partition verfügt. Verwenden Sie die Funktion "Server entfernen", um den zweiten Server aus der Reproduktionsliste des ersten Servers zu entfernen.

Hinweis: Der NDS-Manager versucht, eine zuverlässigere Löschoperation für die Reproduktion auszuführen, wenn eine Anforderung zur Entfernung des Servers ausgegeben wird. Kann die Reproduktion nicht gelöscht werden, wird der Benutzer durch den NDS-Manager aufgefordert, fortzufahren. Bei Bestätigung wird der Löschvorgang für den Server ausgeführt. Kann der NDS-Manager den Löschvorgang für die Reproduktion ausführen, wird dieser Vorgang in der Titelleiste dargestellt und keine Protokolldatei danach angezeigt. Wurde der Löschvorgang für den Server erfolgreich ausgeführt, dann zeigt der NDS-Manager nach Beendigung der Operation eine Protokolldatei an.

Übersicht zum Reparieren von Volume-Objekten

Mit dieser Operation können Sie die Verbindung aller aktivierten Volumes mit Volume-Objekten im Verzeichnis überprüfen.

Wenn das Volume nicht mit einem Volume-Objekt verbunden ist, sucht diese Operation nach einem Volume im Kontext des NetWare Server-Objekts. Ist das Volume gefunden worden, wird das Volume-Objekt an das Volume angefügt.

Andernfalls wird versucht, eines zu erstellen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zur Synchronisierung der NDS-Datenbank
Übersicht zur Synchronisierung der NDS-Databank

Wenn Sie durch dieses Thema  navigieren möchten, ohne einen Bildlauf durchzuführen,  klicken Sie auf Siehe auch.

Übersicht zur sofortigen Synchronisierung einer Partition

Obwohl die Verzeichnisdaten der Reproduktionen von den Novell Directory Services* (NDS*) automatisch synchronisiert werden (damit jede Reproduktion die zuletzt aktualisierten Daten erhält), können Sie die Verzeichnisdaten der Reproduktionen auch manuell  synchronisieren, falls einige Reproduktionen nicht mehr  synchron sind.

Wenn Sie sich für die sofortige Synchronisierung entscheiden, wird jeder Server, auf dem eine Reproduktion der von Ihnen gewählten Partition gespeichert ist, seine Reproduktionsdaten mit den Reproduktionsdaten auf den anderen Servern synchronisieren.

Sie können diese Operation zur Synchronisierung von Änderungen durchführen, die Sie zuvor an den Verzeichnisdaten vorgenommen haben. Wenn Sie beispielsweise System- oder Benutzeranmeldeskripts geändert haben, können Sie diese Änderungen synchronisieren, damit Benutzer unmittelbar beim Netzwerk beglaubigt werden können.

Übersicht zum Empfangen von Aktualisierungen von der Hauptreproduktion

Durch diese Operation muß die Reproduktion auf dem gewählten Server alle NDS-Objekte von der Hauptreproduktion der Partition empfangen. Während der Verarbeitung werden die Reproduktionen auf dem gewählten Server als neue Reproduktionen markiert (der Status der Reproduktionen ist aus der Reproduktionsliste des Servers in der Baumanzeige oder aus der Liste der Partitionen und Server ersichtlich).

Die aktuellen Daten der Reproduktion werden mit den Daten der Hauptreproduktion überschrieben.

Obwohl die Verzeichnisdaten der Reproduktionen von den Novell Directory Services* (NDS*) automatisch synchronisiert werden (damit jede Reproduktion die zuletzt aktualisierten Verzeichnisobjekte erhält), können Sie mit dieser Operation die Verzeichnisobjekte der Reproduktionen auch manuell synchronisieren, falls einige Nicht-Hauptreproduktionen nicht mehr synchron sind.

Diese Operation muß durchgeführt werden, wenn eine Reproduktion beschädigt ist oder die aktualisierten Daten über einen längeren Zeitraum nicht erhalten hat.

In der Ansicht Partitionsdiagnose können Sie mit den Daten der Hauptreproduktion festlegen, welche Reproduktionen nicht synchron sind. Sie werden im Partitionsraster mit einem Ausrufezeichen (!) auf dem Reproduktionssymbol dargestellt. Eine Schreib-/Lesereproduktion mit einem Synchronisierungsfehler wird beispielsweise im Raster als [image] dargestellt.

Sind Reproduktionen vorhanden, die nicht synchron sind, so sollten Sie von der Hauptreproduktion Aktualisierungen empfangen.

Diese Option kann nicht in einer Hauptreproduktion gewählt werden. Die Hauptreproduktion soll die aktuellste und genaueste Kopie der Partition sein. Ist dies nicht der Fall, so muß eine der anderen Reproduktionen zur Hauptreproduktion werden. Verwenden Sie dazu die Operation Reproduktionstyp ändern. Die aktuelle Hauptreproduktion wird dann automatisch mit dem Schreib-/Leseattribut versehen.

Anmerkung: Durch diese Operation entsteht unter Umständen starker Netzwerkverkehr. Daher ist es empfehlenswert, diese Operation durchzuführen, wenn das Netzwerk kaum beansprucht wird.

Übersicht zum Senden von Aktualisierungen von einer Reproduktion

Wenn Sie Aktualisierungen von einer Reproduktion senden, so werden die Verzeichnisobjekte dieser Reproduktion vom Server, auf dem die Reproduktion gespeichert ist, an alle anderen Reproduktionen der Partition einschließlich der Hauptreproduktion gesendet.

Die anderen Reproduktionen der Partition verbinden diese neuen Objekte, die sie erhalten haben, mit denen, die bereits vorhanden sind. Wenn die anderen Reproduktionen abgesehen von den Daten, die an sie gesendet wurden, weitere Daten beinhalten, dann werden diese Daten beibehalten.

Obwohl die Verzeichnisdaten der Reproduktionen von den Novell Directory Services* (NDS*) automatisch synchronisiert werden (damit jede Reproduktion die zuletzt aktualisierten Verzeichnisobjekte erhält), können Sie mit dieser Operation die Verzeichnisobjekte der Reproduktionen auch manuell synchronisieren, falls einige Reproduktionen nicht mehr synchron sind.

Übersicht zur Ansicht der Synchronisierungsfehler

Wenn die gewählte Partition in der Ansicht Partitionsdiagnose Synchronisierungsfehler enthält, dann werden diese Fehler als Ausrufezeichen auf den Reproduktionssymbolen dargestellt. Ein Fehler in einer Schreib-/Lesereproduktion würde im Partitionsraster beispielsweise als [image] dargestellt.

Wenn Sie mehr über einen Synchronisierungsfehler erfahren möchten (mögliche Fehlerursachen und Lösungsmöglichkeiten), klicken Sie zweimal auf das Reproduktionssymbol und wählen Sie aus dem Feld Aktueller Synchronisierungsfehler die Hilfeschaltfläche [image].

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Anzeigen und Aktualisieren der NDS-Version

Übersicht zum Anzeigen der NDS-Version auf Servern in einem Behälter

Lassen Sie sich die NDS*-Version anzeigen, die auf den Servern im Verzeichnisbaum läuft, um festzustellen, ob die neueste DS.NLM-Version für diese Betriebssystemausgabe verwendet wird.

Wenn Sie feststellen, daß auf bestimmten Servern des Baums die NDS-Version 463 läuft (eine NetWare 4.1 Version von DS.NLM), während auf anderen Servern die Version 496 läuft (eine aktualisierte NetWare 4.1 Version von DS.NLM), dann sollten Sie den Server, auf dem die Version 463 läuft, aktualisieren. Verwenden Sie dazu den Server, auf dem die Version 496 läuft, als Quelle.

Sie können die für ein bestimmtes Betriebssystem aktuellste Version von NDS über NetWire, das elektronische Forum von Novell, oder über die Home Page von Novell auf dem World Wide Web ermitteln.

Übersicht zur Aktualisierung der NDS-Version auf einem Server

Sobald Sie eine aktualisierte DS.NLM. erhalten, sollten Sie die NDS-Version auf einem Server aktualisieren. Die aktualisierten Versionen der DS.NLM sind regelmäßig über NetWire (das elektronische Forum von Novell) erhältlich.

Mit jeder Aktualisierung von NDS werden Probleme gelöst und die Leistungsfähigkeit gesteigert. Wird eine neue NDS-Version herausgegeben, dann sind die neuen Funktionen in NDS erst dann verfügbar, wenn alle Server im Reproduktionsring einer Partition die gleiche Version von NDS verwenden.

Wichtiger Hinweis: Durch das Aktualisieren einer Version wird keine Aktualisierung des Betriebssystems durchgeführt. Daher wird die NDS-Version eines NetWare 4.1 nicht mit der Version NetWare 4.11 von NDS aktualisiert. Dagegen wird die alte NDS-Version eines NetWare 4.1 Servers, (z. B. 463) mit der neueren Version von NDS für NetWare 4.1 (z. B. 489) aktualisiert.

Wenn eine neue Version von NDS für NetWare 4.11 über NetWire herausgegeben wird, so können Sie die NetWare 4.11 Server mit der neuen Version aktualisieren.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Anzeigen von Partitionsdaten

Wenn Sie durch dieses Thema navigieren möchten, ohne einen Bildlauf durchzuführen,  klicken Sie auf Siehe auch.

Übersicht zum Überprüfen des Synchronisationsstatus einer Partition

Führen Sie diese Operation als Diagnose auf niedriger Ebene durch, da diese jederzeit problemlos durchgeführt werden kann. Der NDS*-Manager ermittelt Synchronisierungsfehler, indem er das Statusattribut jeder Partition liest.

Mit dieser Operation können Sie den Synchronisationsstatus der Partitionen in Ihrem Baum prüfen. Wenn Sie diese Operation in der Baumanzeige ausführen, dann können Sie lediglich den Status der gewählten Partition überprüfen. Wenn Sie diese Operation von der Liste der Partitionen und Server aus durchführen, können Sie den Synchronisationsstatus aller Partitionen im Verzeichnisbaum anzeigen lassen.

Die Ergebnisse der Synchronisierungsüberprüfung werden vom NDS-Manager in einem Dialogfenster angezeigt. Daraufhin können Sie die Partitionskontinuität jeder Partition überprüfen, die Fehler aufgewiesen hat, und die Reparaturoperationen in den entsprechenden Partitionen ausführen.

Diese Operation bietet unter Umständen unvollständige Informationen, da sie nur den ersten Server in der Reproduktionsliste, der auf die Anforderung antwortet, auf Synchronisierungsfehler überprüft. (Synchronisierungsfehler können auch auf anderen Servern in der Reproduktionsliste auftreten).

Wenn Sie alle Server, die eine Reproduktion der gewählten Partition enthalten, auf Synchronisierungsfehler überprüfen möchten, verwenden Sie die Ansicht Partitionsdiagnose.

Übersicht zum Überprüfen der Partitionskontinuität

Die Überprüfung der Partitionskontinuität besteht in der Überprüfung aller Server, die Reproduktionen einer ausgewählten Partition beinhalten, und in der Überprüfung, ob jeder Server für die Reproduktionsliste (oder den Reproduktionsring) der Partition die gleichen Informationen enthält.

Wenn nicht jeder Server, der eine Reproduktion der gewählten Partition beinhaltet, eine identische Reproduktionsliste hat, oder wenn eine Reproduktion aus irgendeinem Grund nicht mit dem Verzeichnisbaum synchronisiert werden kann, dann werden in der Ansicht Partitionsdiagnose ein oder mehrere Fehler angezeigt.

Fehler werden als Ausrufezeichen in den Reproduktionssymbolen angezeigt und sehen folgendermaßen aus:

Um kontextabhängige Hilfe zu einem Fehler zu erhalten, klicken Sie zweimal auf das Symbol und wählen im Dialogfeld Reproduktionsinformationen die Schaltfläche "Hilfe" [image], die sich beim Feld Aktueller Synchronisierungsfehler befindet.

Anmerkung: Es können auch Symbole vorkommen, die unlesbare Reproduktionen darstellen. Diese Symbole bedeuten nicht unbedingt, daß die Server nicht kommunizieren können, sondern daß der Client aus irgend einem Grund keine Verbindung mit dem Server aufnehmen kann.

Übersicht zum Anzeigen der Partitionen auf einem Server

Sie können ein NetWare* Server-Objekt wählen und sich anzeigen lassen, welche Partitionen Reproduktionen darauf gespeichert haben und um welchen Reproduktionstyp es sich bei den einzelnen Partitionen handelt. Jede Partition ist durch den vollständigen Namen des Behälterobjekts der Partition im Hauptverzeichnis gekennzeichnet.

Sie können feststellen, wie viele der Server-Ressourcen von den Reproduktionen der Partition verwendet werden. Außerdem ist ersichtlich, welche und wie viele Partitionen auf dem Server gespeichert sind.

Möglicherweise möchten Sie sich die Partitionen, die auf einem Server gespeichert sind, anzeigen lassen, wenn Sie beabsichtigen, ein NetWare Server-Objekt aus dem Verzeichnisbaum zu entfernen. Bevor Sie das Objekt entfernen, könnten Sie sich die Reproduktionen anzeigen lassen, die Sie vor dem Server-Objekt entfernen müssen.

Übersicht zum Anzeigen der Reproduktionen einer Partition

Wählen Sie eine Partition, und lassen Sie sich die Reproduktionsliste anzeigen. Mit dieser Operation können Sie folgende Fragen klären:

Auf welchen Servern befinden sich die Reproduktionen der Partition?

Auf welchem Server befindet sich die Hauptreproduktion der Partition?

Auf welchen Servern sind Schreib-/Lese-Reproduktionen, Nur-Lese-Reproduktionen und untergeordnete Referenz-Reproduktionen der Partition gespeichert?

Übersicht zum Anzeigen der Informationen zu einer Partition

Es können folgende Einzelheiten zu einer Partition angezeigt werden:

Der vollständige Name einer Partition

Der Server, auf dem die Hauptreproduktion gespeichert ist. Diese Angabe beinhaltet den vollständigen Namen.

Die Anzahl der Schreib-/Lese-Reproduktionen, Nur-Lese-Reproduktionen, Hauptreproduktionen und untergeordneten Referenz-Reproduktionen der Partition

Der Zeitpunkt der letzten erfolgreichen Synchronisierung.

Der Zeitpunkt der letzten versuchten Synchronisierung.

Sie müssen die Hauptansicht, in der Sie arbeiten, nicht verlassen/schließen, um Informationen zu einer Partition anzuzeigen. Wenn Sie eine Partition im Browser wählen, so werden Reproduktionsinformationen zur Partition im Reproduktionsfenster rechts vom Browser angezeigt.

Informationen zu einer Partition werden vor allem angezeigt, um Synchronisierungsinformationen zu erhalten. Wenn beispielsweise der Zeitpunkt der letzten erfolgreichen Synchronisierung einer Partition vor dem Zeitpunkt der letzten versuchten Synchronisierung liegt, so können Sie daraus folgern, daß die Partition möglicherweise Synchronisierungsfehler aufweist. (Informationen zum Zeitpunkt der Synchronisierung sind für Vorgängerversionen zur 489-Version von NDS nicht verfügbar).

Übersicht zum Anzeigen der Partitionshierarchie

In der Baumanzeige kann die Hierarchie der Partitionen im Verzeichnisbaum angezeigt werden. In dieser Ansicht können Sie die physische Struktur der Partitionen im Verzeichnisbaum durchsuchen, indem Sie Behälterobjekte erweitern und komprimieren. Daraus können Sie ersehen, welche Partitionen übergeordnet und welche untergeordnet sind.

Übersicht zum Anzeigen einer Liste aller Partitionen im Baum

Sie können sich eine Flachliste der Partitionen im Verzeichnisbaum aus der Liste der Partitionen und Server anzeigen lassen.

Sollen nur die Partitionen im Baum aufgeführt werden (aus einem bestimmten Kontext heraus), so verwenden Sie diese Ansicht. Wenn Sie wissen möchten, welche Partitionen über- und untergeordnet sind (Partitionshierarchie), dann verwenden Sie die Baumanzeige.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Anzeigen von Reproduktionsdaten

Übersicht zum Anzeigen der Reproduktionsliste einer Partition

In der Baumanzeige oder der Liste der Partitionen und Server können Sie eine Partition wählen und folgendes anzeigen:

Die Reproduktionen dieser Partition

Den Reproduktionstyp

Den Reproduktionsstatus

Den Server, auf dem die Reproduktionen gespeichert sind.

In keiner dieser zwei Ansichten erhalten Sie eine vollständige Liste der Ansichten jedes Servers. Die angezeigte Reproduktionsliste ist die Ansicht des ersten Servers, der auf die Anforderung antwortet. Über das Feld Gelesener Server auf der Informationsleiste erfahren Sie, von welchem Server gelesen wurde.

Andere Server, die eine Reproduktion der gewählten Partition enthalten, können unterschiedliche Ansichten zur Speicheradresse der Reproduktionen der Partition haben.

In der Ansicht Partitionsdiagnose erhalten Sie eine vollständige Ansicht der Reproduktionsliste einer Partition. In dieser Ansicht werden alle Server angezeigt, auf denen eine Reproduktion der gewählten Partition gespeichert ist, als auch die Ansicht des Servers, in der die Reproduktionen der gewählten Partition gespeichert sind.

Übersicht zum Anzeigen von Reproduktionsinformationen

Diese Operation können Sie jederzeit problemlos ausführen.

Informationen zu einer Reproduktion werden vor allem angezeigt, um Synchronisierungsinformationen zu erhalten. Sie müssen die Hauptansicht, in der Sie arbeiten, nicht schließen, um Informationen zu einer Reproduktion anzuzeigen.

Mit dieser Operation werden folgende Einzelheiten zu einer Reproduktion angezeigt:

Die Partition, von der die Reproduktion kopiert wurde

Der Server, auf dem die Reproduktion gespeichert ist

Die Reproduktionsnummer

Der Reproduktionstyp

Der Reproduktionsstatus

Der Zeitpunkt der letzten erfolgreichen Synchronisierung

Die Bezugsadresse

Die aktuellen Synchronisierungsfehler

Wenn Sie zusätzliche Hilfe zu einem bestimmten Synchronisierungsfehler benötigen, so drücken Sie auf das blaue Fragezeichen am Ende der Fehlernummernzeile.


Übersicht zum Anzeigen von Serverinformationen und Löschen eines Servers
Übersicht zum Anzeigen von Server-Informationen und Löschen eines Servers

Informationen zu einem Server anzeigen

Sie müssen die Hauptansicht, in der Sie arbeiten, nicht verlassen, um Informationen zu einem Server anzuzeigen. Wenn Sie einen Server wählen, dann werden die Reproduktionsinformationen im Reproduktionsfenster rechts angezeigt.

Informationen zu einem Server werden vor allem angezeigt, um Synchronisierungsinformationen zu erhalten.

Informationen zu einem Server erhalten Sie in der Baumanzeige, in der Liste der Partitionen und Server oder in der Ansicht Partitionsdiagnose.

Liste der Server im Verzeichnis anzeigen

Aus der Liste der Partitionen und Server kann eine Liste der Server angezeigt werden, die sich im und unter dem aktuellen Kontext im Verzeichnisbaum befinden. Sie können also den Kontext auf den Stamm des Baums einstellen und sich jeden Server anzeigen lassen, der im Baum vorhanden ist, ohne dazu den Verzeichnisbaum durch Erweitern von Behältern in der Baumanzeige zu durchsuchen.

Das Erstellen dieser Liste dauert länger als die Methode über die Baumanzeige.

Übersicht zum Löschen eines NetWare Server-Objekts

Warnung: Wenn Sie ein NetWare* Server-Objekt löschen, wird es dauerhaft aus dem Novell Directory Services*-Baum entfernt (der Server verfügt weiterhin über SAP-Funktionen, sofern er nicht dauerhaft vom Netz genommen wird).

Ebenso werden die Daten und Ressourcen des Servers dauerhaft entfernt.

Das Löschen eines NetWare Server-Objekts kann zu einer Beschädigung Ihrer NDS*-Datenbank führen, insbesondere, wenn das NetWare Server-Objekt im Zusammenhang mit der NDS-Datenbank eingesetzt wird (z. B. für das Speichern von Reproduktionen).

Löschen Sie mit Hilfe des NDS-Managers die Reproduktionen vom NetWare Server und achten Sie darauf, daß Sie keinen NetWare Server löschen, der die einzige Reproduktion einer Partition des Verzeichnisbaums enthält.

Bevor Sie das NetWare Server-Objekt löschen können, müssen Sie den Server herunterfahren. Ein gelöschtes NetWare Server-Objekt kann nur wiederhergestellt werden, indem Sie NDS erneut auf dem Server installieren. Verwenden Sie hierzu das INSTALL.NLM-Programm der Server-Konsole. Sie können das Objekt auch nochmals erstellen, nachdem der Server wieder hochgefahren wurde. Davon wird allerdings abgeraten.

Die bevorzugte Methode zum Löschen eines Servers besteht darin, das NetWare Server-Objekt mit dem NetWare Administrator in einen anderen Kontext zu verschieben. (Sie müssen das Server-Objekt nicht löschen und dann in einem anderen Kontext erneut erstellen).

Mit dem NetWare Administrator können Sie auch die entsprechenden Volume-Objekte zum gelöschten NetWare Server-Objekt löschen.

Es gibt folgende Gründe für das Löschen eines Servers:

Es gibt Probleme mit dem Festplattenlaufwerk, und Sie möchten den Server neu installieren.

Ihr Unternehmen wird verkleinert, und der Server wird im Baum nicht mehr benötigt.

Sie haben verschiedene Möglichkeiten, ein NetWare Server-Objekt zu löschen:

Ein (nicht empfehlenswerter) Weg wäre, einen NetWare Server herunterzufahren und sein Objekt zu löschen. Dann müßte NDS auf dem Server mit der dort vorhandenen Datei INSTALL.NLM neu installiert bzw. das Objekt nach dem erneuten Hochfahren des Server neu erstellt werden. Mit dem NetWare Server-Objekt verbundene Volume-Objekte müssen mit dem NetWare Administrator gelöscht werden.

Löschen Sie einen Server nicht, wenn er nur in einen neuen Kontext verschoben werden soll. Verschieben Sie das Server-Objekt und die entsprechenden Volume-Objekte statt dessen mit Hilfe des NetWare Administrators in den neuen Kontext.

Wenn der Server problemlos läuft, führen Sie vor dem Löschen folgende Schritte aus:

Ändern Sie die Hauptreproduktionen auf dem Server in Schreib-/Lese-Reproduktionen, und löschen Sie anschließend alle Reproduktionen auf dem NetWare Server. Sobald diese Schritte ausgeführt wurden, können Sie das NetWare Server-Objekt löschen.

Entfernen Sie mit dem INSTALL.NLM-Programm NDS vom Server. Dadurch wird verhindert, daß Services in der NDS-Datenbank verlorengehen. Dieser Vorgang löscht automatisch den Server.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Arbeiten mit Partitionen

Mit dem NDS*-Manager können Sie die Partitionen im Verzeichnisbaum verwalten. Sie können den Standort der Partitionsgrenzen im Verzeichnisbaum verwalten und die Partitionsdaten anzeigen lassen.

Beim Ausführen von Partitionsoperationen sind einige Richtlinien zu beachten:

Vor dem Verschieben einer Partition müssen Sie sicherstellen, daß der Verzeichnisbaum ordnungsgemäß synchronisiert wird.

Bevor Sie Operationen ausführen, sollten Sie den Synchronisationsstatus einer Partition überprüfen. Wenn Synchronisierungsfehler auftreten, so sollten Sie diese beheben, bevor Sie mit der Operation fortfahren.

Führen Sie Partitionsoperationen möglichst immer mit der neuesten Version von DS.NLM aus.

Nach dem Ausführen einer Partitionsoperation müssen Sie warten, bis die entsprechenden Vorgänge im Verzeichnis abgeschlossen sind. Erst dann können mit dieser Partition wieder Operationen durchgeführt werden.

Selbst wenn eine Partitionsoperation im NDS-Manager als abgeschlossen angezeigt wird, benötigt NDS eine gewisse Zeit, um die Änderungen an einer Partition mit den Reproduktionen der Partition zu synchronisieren.

Bei vielen Partitionsoperationen dauert es unter Umständen lange, bis die Synchronisierung im Netz vollständig abgeschlossen ist. Partitionsoperationen sind im allgemeinen innerhalb einiger Stunden abgeschlossen. Dagegen hängt die Zeitdauer, die NDS zur Synchronisierung der Änderungen im Verzeichnis benötigt, von folgenden Faktoren ab:

Die Anzahl der Objekte in der Partition

Die Anzahl der Reproduktionen, die synchronisiert werden müssen

Der Standort der Reproduktionen (die beispielsweise auf einem Server in einem WAN gespeichert sein können)

Die Sichtbarkeit der beteiligten Server

Die Auslastung des Netzwerks

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Arbeiten mit Präferenzen und Druckoptionen

Wie mit den meisten Programmen, die über eine grafische Benutzeroberfläche verfügen, können Sie mit dem NDS-Manager Einstellungen vornehmen, durch die festgelegt wird, wie die Informationen bei jeder Ausführung des NDS-Managers angezeigt werden.

Sie können die im NDS*-Manager angezeigten Informationen auch ausdrucken.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Arbeiten mit Reparaturoperationen

Wenn Synchronisierungsfehler oder andere Probleme in der NDS*-Datenbank auftreten, dann sollten Sie Reparaturoperationen durchführen.

Für die meisten Reparaturoperationen wird das DSREPAIR.NLM-Programm auf dem Server ausgeführt. Alle bei einer Reparaturoperation ermittelten Fehler werden in einer Protokolldatei gespeichert und nach Abschluß der Operation angezeigt.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Arbeiten mit Reproduktionen

Mit dem NDS*-Manager können Sie Partitionsreproduktionen verwalten. Sowohl die Anzahl als auch der Typ der Reproduktionen auf einem Server können verwaltet werden. Ebenso können die Informationen zu Reproduktionen angezeigt werden. Dadurch können Sie sowohl den Synchronisationsstatus überwachen als auch Fehler suchen und beseitigen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Übersicht zum Arbeiten mit Servern

Sie haben folgende Möglichkeiten:

Informationen zu einem Server anzeigen

Einen Server löschen

Die NDS*-Version auf einem Server anzeigen und aktualisieren

Da die Reproduktionen der Partitionen auf Servern gespeichert sind, beeinflussen Sie die Informationen, die auf einem Server gespeichert sind, sobald Sie eine Operation ausführen, die eine Partition oder eine Reproduktion betrifft.

Eine Liste dieser Operationen finden Sie unter Arbeiten mit Reparaturoperationen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Objektinformationen drucken

Zweck

Sie können die Informationen zu einer Partition, Reproduktion oder zu einem Server drucken.

Sie können Objektinformationen entweder in der Baumanzeige oder der Liste der Partitionen und Server drucken.

Objektinformationen drucken

1.	Im Objektmenü die Option Drucken wählen.

Wählen Sie Hilfe, wenn Sie Informationen und Anweisungen zur Auswahl bestimmter Optionen benötigen.


Reproduktionsliste einer Partition drucken

Zweck

Sie können die Reproduktionsliste (den Reproduktionsring) einer Partition drucken. In der Reproduktionsliste wird jeder Server, der eine Reproduktion der gewählten Partition beinhaltet, und die Reproduktionstabelle der Server angezeigt.

Sie drucken die Reproduktionsliste einer Partition vom Bildschirm Partitionsdiagnose.

Reproduktionsliste einer Partition drucken

1.	Im Dateimenü die Option Drucken wählen.

Wählen Sie Hilfe, wenn Sie Informationen und Anweisungen zur Auswahl bestimmter Optionen benötigen.


Aktualisierungen von der Hauptreproduktion empfangen

Zweck

Mit dieser Operation werden die Verzeichnisdaten einer Reproduktion gelöscht und mit Daten von der Hauptreproduktion der Partition ersetzt. Wählen Sie diese Option, wenn eine Reproduktion beschädigt ist oder die aktualisierten Daten über einen längeren Zeitraum nicht erhalten hat.

Aktualisierungen erhalten Sie von der Hauptreproduktion in der Baumanzeige, in der Liste der Partitionen und Server oder in der Ansicht Partitionsdiagnose.

Aktualisierungen von der Hauptreproduktion empfangen

1.	Den Server (die Zeile) wählen, dessen Reproduktionen Aktualisierungen empfangen.

Hinweis: Diese Option kann nicht in einer Hauptreproduktion gewählt werden. Eine Hauptreproduktion kann keine Aktualisierungen von sich selbst empfangen.

2.	Aktualisierungen empfangen [image] wählen.

3.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Empfangen von Aktualisierungen von der Hauptreproduktion.


Server aus einer Reproduktionsliste entfernen

Zweck

Warnung: Die fehlerhafte Ausführung dieser Operation kann unwiderrufliche Beschädigungen am NDS*-Baum zur Folge haben.

Wenn ein im Baum nicht mehr vorhandener Server im Reproduktionsring erscheint und Sie nicht die Funktion "Server entfernen" ausgeführt haben, benutzen Sie die Funktion "Server löschen", um das entsprechende Server-Objekt zu löschen.

Innerhalb einer bestimmten Zeitspanne wird das Server-Objekt gelöscht und der Reproduktionsring aktualisiert. (Bei dieser Zeitspanne kann es sich um einige Minuten bis hin zu einigen Stunden handeln.)

Ist der NDS-Baum bereits soweit beschädigt, daß die Funktion "Server löschen" nicht mehr vollständig ausgeführt werden kann, oder existiert ein Server in der Reproduktionsliste, auf dem keine Reproduktion der Partition mehr vorhanden ist, so müssen Sie die Operation ausführen.

Entfernen Sie einen Server aus einer Reproduktionsliste, wenn andere Server versuchen, sich mit einem Server zu synchronisieren, der nicht über eine Reproduktion der Partition verfügt.

In der Ansicht "Partitionsdiagnose" - oder nach Ausführung von DSTRACE auf dem Server - werden Ihnen Fehler angezeigt, die besagen, daß sich auf dem Server Informationen über einen anderen Server in seiner Reproduktionsliste befinden, der zweite Server jedoch nicht über eine Reproduktion der in Frage kommenden Partition verfügt. Verwenden Sie die Funktion "Server entfernen", um den zweiten Server aus der Reproduktionsliste des ersten Servers zu entfernen.

Hinweis: Der NDS-Manager versucht, einen zuverlässigeren Löschvorgang für die Reproduktion auszuführen, wenn eine Anforderung zur Entfernung des Servers ausgegeben wird. Kann die Reproduktion nicht gelöscht werden, wird der Benutzer durch den NDS-Manager aufgefordert, fortzufahren. Bei Bestätigung wird der Löschvorgang für den Server ausgeführt. Kann der NDS-Manager den Löschvorgang für die Reproduktion ausführen, wird diese Operation in der Titelleiste dargestellt und keine Protokolldatei danach angezeigt. Wurde der Löschvorgang für den Server erfolgreich ausgeführt, dann zeigt der NDS-Manager nach Beendigung der Operation eine Protokolldatei an.

Server aus einer Reproduktionsliste entfernen

1.	In der Ansicht Partitionsdiagnose den Server (die Zeile) wählen, auf dem (auf der) eine Reproduktion in der Liste gespeichert ist, die Sie entfernen möchten.

2.	Im Menü Reparieren die Option Server entfernen wählen.

Wenn Sie eine andere Reproduktionen angeben möchten, dann verwenden Sie das Drop-down-Listenfeld im Feld Reproduktion.

3.	Anforderung bestätigen.

Die Option Protokoll anzeigen wird angezeigt, sobald die Operation beendet ist.

Weitere Informationen finden Sie unter Übersicht zum Entfernen eines Servers aus einer Reproduktionsliste.


Volume-Objekte reparieren

Zweck

Mit dieser Operation können Sie die Verbindung aller aktivierten Volumes mit Volume-Objekten im Verzeichnis überprüfen.

Wenn das Volume nicht mit einem Volume-Objekt verbunden ist, dann sucht diese Operation nach einem Volume im Kontext des NetWare* Server-Objekts. Ist das Volume gefunden worden, so wird das Volume-Objekt an das Volume angefügt.

Wenn das Volume nicht gefunden wird, dann versucht die Operation, ein Volume zu erstellen.

Volume-Objekte reparieren

1.	In der Ansicht Partitionsdiagnose den Server (die Zeile) wählen, dessen Volume-Objekte Sie reparieren möchten.

2.	Auf Volume-Objekte reparieren [image] klicken.

Aktivieren Sie die Option Trustee-IDs prüfen, wenn der NDS Manager Trustee-Zuordnungen auf dem Dateisystem mit Benutzerobjekt-IDs validieren soll, wobei alle ungültigen Zuordnungen aufgelöst werden. Eventuell möchten Sie diese Operation durchführen, wenn Sie viele Benutzerobjekte gelöscht haben, die Trustee-Zuordnungen auf diesem Volume hatten. Dadurch werden die Trustee-Zuordnungen der nicht mehr länger existierenden Baumobjekte entfernt.

3.	Anforderung bestätigen.

Die Option Protokoll anzeigen wird angezeigt, sobald die Operation beendet ist.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Reproduktion reparieren

Zweck

Eine Reproduktion wird repariert, indem die Informationen in bezug auf den Reproduktionsring auf jedem Server, auf dem eine Reproduktion gespeichert ist, überprüft und die Fern-ID validiert werden. Durch diese Operation werden nur die von Ihnen ausgewählten Reproduktionen repariert.

Wenn Sie die Operation Lokale Datenbank reparieren nicht während der letzten 30 Minuten ausgeführt haben, sollten Sie dieses vor dem Ausführen dieser Operation nachholen.

Reproduktion reparieren

1.	In der Ansicht Partitionsdiagnose den Server (die Zeile) wählen, dessen Reproduktionen Sie repariert werden sollen.

2.	Die Option Reproduktion reparieren [image] wählen.

3.	Anforderung bestätigen.

Die Option Protokoll anzeigen wird angezeigt, sobald die Operation beendet ist.


Lokale Datenbank reparieren

Zweck

Sie können die Datensätze Ihrer lokalen Datenbank reparieren, wenn Ihre NDS*-Datenbank beschädigt ist. Mit dieser Operation werden Inkonsistenzen in der lokalen Verzeichnisdatenbank gelöst. Danach kann die Datenbank geöffnet und auf sie zugegriffen werden.

Lokale Datenbank reparieren

1.	In der Ansicht Partitionsdiagnose den Server (die Zeile) wählen, dessen lokale Datenbank repariert werden soll.

2.	Die Option Lokale Datenbank reparieren [image] wählen.

3.	Anforderung bestätigen.

Die Option Protokoll anzeigen wird angezeigt, sobald die Operation beendet ist.

Weitere Informationen finden Sie unter Übersicht zum Reparieren der lokalen Datenbank.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Netzwerkadressen  reparieren

Zweck

Sie können Netzwerkadressen reparieren, um zu gewährleisten, daß die Server im Netzwerk die richtigen Adressen versenden.

Netzwerkadressen reparieren

1.	In der Ansicht Partitionsdiagnose den Server (die Zeile) wählen, dessen Netzwerkadressen repariert werden sollen.

2.	Die Option Netzwerkadressen reparieren [image] wählen.

3.	Anforderung bestätigen.

Die Option Protokoll anzeigen wird angezeigt, sobald die Operation beendet ist.

Weitere Informationen finden Sie unter Übersicht zum Reparieren von Netzwerkadressen.


Siehe auch Übersicht zum Arbeiten mit dem NDS-Manager
Verwandte Themen

Arbeiten mit Partitionen

Arbeiten mit Reproduktionen

Arbeiten mit Servern

Arbeiten mit Reparaturoperationen

Arbeiten mit Präferenzen und Druckoptionen


Siehe auch Übersicht zum Arbeiten mit Partitionen
Verwandte Themen

Übersicht zum Erstellen und Zusammenführen von Partitionen

Übersicht zum Verschieben einer Partition und Abbrechen einer Partitionsoperation

Übersicht zum Anzeigen von Partitionsdaten


Siehe auch IDH Reproduktion reparieren
Verwandte Themen

Fern-Server-IDs prüfen

Netzwerkadressen reparieren

Lokale Datenbanken reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch IDH Volume-Objekte reparieren
Verwandte Themen

Fern-Server-IDs prüfen

Reproduktion reparieren

Netzwerkadressen reparieren

Lokale Datenbanken reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen


Siehe auch NDS-Version auf einem Server aktualisieren
Verwandte Themen

NDS-Version auf Servern in einem Behälter anzeigen


Siehe auch NDS-Version auf Servern anzeigen
Verwandte Themen

Übersicht zum Anzeigen der NDS-Version auf Servern in einem Behälter

NDS-Version auf einem Server aktualisieren


Siehe auch Partitionsoperation abbrechen
Verwandte Themen

Übersicht zum Abbrechen einer Partitionsoperation

Partition erstellen

Partition zusammenführen

Partition verschieben


Siehe auch Reproduktion hinzufügen
Verwandte Themen

Übersicht zum Hinzufügen einer Reproduktion

Reproduktion löschen

Reproduktionstyp ändern

Richtlinien für das Partionieren und Reproduzieren Ihres Baums


Siehe auch Neue Hauptreproduktion zuweisen
Verwandte Themen

Reproduktionstyp ändern


Siehe auch Dialogfeld Neue Hauptreproduktion zuweisen
Verwandte Themen

Reproduktionstyp ändern


Siehe auch Dialogfeld Reproduktionstyp ändern
Verwandte Themen

Übersicht zum Ändern des Reproduktionstyps

Beschreibung der Reproduktionstypen


Siehe auch Reproduktionstyp ändern
Verwandte Themen

Übersicht zum Ändern des Reproduktionstyps

Reproduktion hinzufügen

Reproduktion löschen

Neue Hauptreproduktion zuweisen


Siehe auch Partitionskontinuität überprüfen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Partitionen auf einem Server anzeigen

Reproduktionen einer Partition anzeigen

Informationen zu einer Partition anzeigen

Partitionshierarchie anzeigen

Liste der Partitionen im Baum anzeigen


Siehe auch Synchronisierungsstatus überprüfen
Verwandte Themen

Übersicht zum Überprüfen des Synchronisationsstatus einer Partition

Partitionen auf einem Server anzeigen

Reproduktionen einer Partition anzeigen

Informationen zu einer Partition anzeigen

Partitionshierarchie anzeigen

Liste der Partitionen im Baum anzeigen


Siehe auch Partition erstellen
Verwandte Themen

Übersicht zum Erstellen einer Partition

Partition (mit übergeordneter Partition) zusammenführen

Partition (Behälter) verschieben


Siehe auch Reproduktion löschen
Verwandte Themen

Übersicht zum Löschen einer Reproduktion

Reproduktion hinzufügen

Reproduktionstyp ändern

Neue Hauptreproduktion zuweisen


Siehe auch IDH Aktualisierungen senden
Verwandte Themen

Übersicht zum  Senden von Aktualisierungen von einer Reproduktion

Partition sofort synchronisieren

Aktualisierungen von der Hauptreproduktion empfangen

Synchronisierungsfehler anzeigen


Siehe auch IDH Server-Informationen
Verwandte Themen

Informationen zu einer Partition anzeigen

Informationen zu einer Reproduktion anzeigen


Siehe auch IDH Fern-Server-IDs prüfen
Verwandte Themen

Reproduktion reparieren

Netzwerkadressen reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server von einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch Partition zusammenführen
Verwandte Themen

Übersicht zum Zusammenführen einer Partition

Partition erstellen

Partition (Behälter) verschieben

Partitionsoperation abbrechen


Siehe auch Partition verschieben
Verwandte Themen

Übersicht zum Verschieben einer Partition

Partition erstellen

Partition zusammenführen


Siehe auch Übersicht zum Hinzufügen und Löschen
Themenüberblick

Beschreibung der Reproduktionstypen

Übersicht zum Hinzufügen einer Reproduktion

Übersicht zum Löschen einer Reproduktion

Übersicht zum Ändern des Reproduktionstyps


Siehe auch Übersicht zum Reparieren der NDS-Datenbank
Themenüberblick

Übersicht zum Überprüfen der Fern-Server-IDs

Übersicht zum Reparieren einer Reproduktion

Übersicht zum Reparieren von Netzwerkadressen

Übersicht zum Reparieren der lokalen Datenbank

Übersicht zum Zuweisen einer neuen Hauptreproduktion

Übersicht zum Entfernen eines Servers aus einer Reproduktionsliste

Übersicht zum Reparieren von Volume-Objekten


Siehe auch Übersicht zur Synchronisierung der NDS-Datenbank
Themenüberblick

Beschreibung des Reproduktionsstatus

Übersicht zur sofortigen Synchronisierung

Übersicht zum Empfangen von Aktualisierungen von der Hauptreproduktion

Übersicht zum Senden von Aktualisierungen von einer Reproduktion


Siehe auch Übersicht zum Anzeigen von Partitionsdaten
Themenüberblick

Übersicht zum Überprüfen des Synchronisationsstatus einer Partition

Übersicht zum Überprüfen der Partitionskontinuität

Übersicht zum Anzeigen der Partitionen auf einem Server

Übersicht zum Anzeigen der Reproduktionen einer Partition

Übersicht zum Anzeigen der Informationen zu einer Partition

Übersicht zum Anzeigen der Partitionshierarchie

Übersicht zum Anzeigen einer Liste aller Partitionen im Baum


Siehe auch Übersicht zum Arbeiten mit Reparaturoperationen
Verwandte Themen

Übersicht zur Synchronisierung der NDS-Datenbank

Übersicht zum Reparieren der NDS-Datenbank


Siehe auch Übersicht zum Arbeiten mit Reproduktionen
Verwandte Themen

Übersicht zum Hinzufügen, Löschen und Ändern des Reproduktionstyps

Übersicht zum Anzeigen von Reproduktionsinformationen


Siehe auch Übersicht zum Arbeiten mit Servern
Verwandte Themen

Übersicht zum Anzeigen von Server-Informationen und Löschen eines Servers

Übersicht zum Anzeigen und Aktualisieren einer NDS-Version


Siehe auch Partitionsinformationen
Verwandte Themen

Beschreibung der Reproduktionstypen


Siehe auch Aktualisierungen von der Hauptreproduktion empfangen
Verwandte Themen

Übersicht zum Empfangen von Aktualisierungen von der Hauptreproduktion

Partition sofort synchronisieren

Aktualisierungen von einer Reproduktion senden

Synchronisierungsfehler anzeigen


Siehe auch Server aus einer Reproduktionsliste entfernen
Verwandte Themen

Übersicht zum Entfernen eines Servers aus einer Reproduktionsliste

Fern-Server-IDs prüfen

Reproduktion reparieren

Netzwerkadressen reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Volume-Objekte reparieren


Siehe auch Reproduktion reparieren
Verwandte Themen

Fern-Server-IDs prüfen

Netzwerkadressen reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch Lokale Datenbank reparieren
Verwandte Themen

Übersicht zum Reparieren der lokalen Datenbank

Fern-Server-IDs prüfen

Reproduktion reparieren

Netzwerkadressen reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch Netzwerkadressen reparieren
Verwandte Themen

Übersicht zum Reparieren von Netzwerkadressen

Fern-Server-IDs prüfen

Reproduktion reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch Volume-Objekte reparieren
Verwandte Themen

Fern-Server-IDs prüfen

Reproduktion reparieren

Netzwerkadressen reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen


Siehe auch Aktualisierungen von einer Reproduktion senden
Verwandte Themen

Übersicht zum Senden von Aktualisierungen von einer Reproduktion

Partition sofort synchronisieren

Aktualisierungen von der Hauptreproduktion empfangen

Synchronisierungsfehler anzeigen


Siehe auch Partition sofort synchronisieren
Verwandte Themen

Aktualisierungen von der Hauptreproduktion empfangen

Aktualisierungen von einer Reproduktion senden

Synchronisierungsfehler anzeigen


Siehe auch Fern-Server-IDs prüfen
Verwandte Themen

Übersicht zum Überprüfen der Fern-Server-IDs

Reproduktion reparieren

Netzwerkadressen reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch Reproduktionen einer Partition anzeigen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Partitionen auf einem Server anzeigen

Informationen zu einer Partition anzeigen

Partitionshierarchie anzeigen

Liste der Partitionen im Baum anzeigen


Siehe auch Informationen zu einer Reproduktion anzeigen
Verwandte Themen

Informationen zu einer Partition anzeigen

Informationen zu einem Server anzeigen


Siehe auch Informationen zu einer Partition anzeigen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Partitionen auf einem Server anzeigen

Reproduktionen einer Partition anzeigen

Partitionshierarchie anzeigen

Liste der Partitionen im Baum anzeigen


Siehe auch Informationen zu einem Server anzeigen
Verwandte Themen

Liste der Server im Verzeichnis anzeigen

NetWare Server-Objekt löschen

NDS-Version auf Servern in einem Behälter anzeigen

NDS-Version auf einem Server aktualisieren


Siehe auch Liste aller Partitionen im Verzeichnisbaum anzeigen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Partitionen auf einem Server anzeigen

Reproduktionen einer Partition anzeigen

Informationen zu einer Partition anzeigen

Partitionshierarchie anzeigen


Siehe auch NDS-Version auf Servern in einem Behälter anzeigen
Verwandte Themen

NDS-Version auf einem Server aktualisieren


Siehe auch Partitionshierarchie anzeigen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Partitionen auf einem Server anzeigen

Reproduktionen einer Partition anzeigen

Informationen zu einer Partition anzeigen

Liste der Partitionen im Baum anzeigen


Siehe auch Reproduktionsliste einer Partition anzeigen
Verwandte Themen

Informationen zu einer Reproduktion anzeigen


Siehe auch Synchronisierungsfehler anzeigen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Partitionskontinuität überprüfen


Siehe auch Partitionen auf einem Server anzeigen
Verwandte Themen

Synchronisationsstatus einer Partition überprüfen

Reproduktionen einer Partition anzeigen

Informationen zu einer Partition anzeigen

Partitionshierarchie anzeigen

Liste der Partitionen im Baum anzeigen


Aktualisierungen von einer Reproduktion senden

Zweck

Wenn Sie Aktualisierungen von einer Reproduktion senden, so werden die Verzeichnisdaten in dieser Reproduktion vom Server, auf dem die Reproduktion gespeichert ist, an alle anderen Reproduktionen der Partition, einschließlich der Hauptreproduktion, gesendet. Die anderen Reproduktionen verbinden die neuen Informationen, die Sie gesendet haben, mit den bereits vorhandenen Informationen. Wenn die Reproduktionen abgesehen von den Daten, die an sie gesendet wurden, weitere Daten enthalten, dann werden diese Daten beibehalten.

Wählen Sie diese Option, wenn Reproduktionen  beschädigt sind oder die aktualisierten Daten über einen längeren Zeitraum nicht erhalten haben.

Aktualisierungen erhalten Sie von der Hauptreproduktion in der Baumanzeige, in der Liste der Partitionen und Server oder in der Ansicht Partitionsdiagnose.

Aktualisierungen von einer Reproduktion senden

1.	Wählen Sie den Server (die Zeile), von dessen Reproduktion Informationen gesendet werden sollen.

2.	Aktualisierungen senden [image] wählen.

3.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zum Senden von Aktualisierungen von einer Reproduktion.


Präferenzen einstellen

Zweck

Mit den Präferenzen definieren Sie folgende Voreinstellungen:

Die Art der Informationsanzeige des NDS*-Managers

Die Verarbeitungsweise von Aktualisierungen der NDS-Version

Die Angabe, an welcher Stelle die Protokolldatei nach einer Aktualisierung der NDS-Version gespeichert wird

Einstellungen werden in der Baumanzeige oder der Liste der Partitionen und Server vorgenommen.

Präferenzen einstellen

1.	Im Objektmenü Einstellungen wählen.

Wählen Sie Hilfe, wenn Sie Informationen und Anweisungen zur Auswahl bestimmter Optionen benötigen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Partition sofort synchronisieren

Zweck

Wenn Sie sich für die sofortige Synchronisierung entscheiden, versucht jeder Server, auf dem eine Reproduktion der von Ihnen gewählten Partition gespeichert ist, seine Reproduktionsdaten mit den Reproduktionsdaten auf den anderen Servern  zu synchronisieren.

Partition sofort synchronisieren

1.	Die zu synchronisierende Partition in der Baumanzeige oder der Liste der Partitionen und Server wählen.

2.	Partitionskontinuität [image] wählen.

3.	Sofort synchronisieren  [image] wählen.

4.	Anforderung bestätigen.

Weitere Informationen finden Sie unter Übersicht zur sofortigen Synchronisierung einer Partition .


Marken

Copyright © 1994-1996, Novell, Inc.  Alle Rechte vorbehalten.  Patent angemeldet.

Novell Marken.

Client 32 ist eine Marke von Novell Inc.

GroupWise ist eine Marke von Novell Inc.

IPX ist eine Marke von Novell Inc.

IPX/SPX ist eine Marke von Novell Inc.

NetWare ist eine eingetragene Marke von Novell Inc. in den Vereinigten Staaten und anderen Ländern.

NetWare 3 ist eine Marke von Novell Inc.

NetWare 4 ist eine Marke von Novell Inc.

NetWare Client ist eine Marke von Novell Inc.

NetWire ist eine eingetragene Marke von Novell Inc. in den Vereinigten Staaten und anderen Ländern.

Novell ist eine eingetragene Marke von Novell Inc. in den Vereinigten Staaten und anderen Ländern.

Novell Directory Services und NDS sind Marken von Novell Inc.

Novell Labs ist eine Marke von Novell Inc.

Novell Network Registry ist eine Service-Marke von Novell, Inc.

Transaction Tracking System ist eine Marke von Novell Inc.

Marken von Fremdherstellern

Apple ist eine eingetragene Marke von Apple Computer Inc.

ARCNet ist eine eingetragene Marke von DataPoint Corporation.

COMPAQ ist eine eingetragene Marke von Compaq Computer Corporation

CompuServe ist eine eingetragene Marke von CompuServe Inc.

DS Migrate ist eine Marke von Preferred Systems, Inc.

Excel ist eine Marke von Microsoft Corporation.

Hayes ist eine eingetragene Marke von of Hayes Microcomputer Products, Inc

IBM ist eine eingetragene Marke der International Business Machines Corporation.

Lotus Notes ist eine eingetragene Marke von Lotus Development Corporation.

Macintosh ist eine eingetragene Marke von Apple Computer, Inc.

NFS ist eine eingetragene Marke von Sun Microsystems, Inc.

OS/2 ist eine eingetragene Marke von International Business Machines Corporation.

PageMarq ist eine eingetragene Marke von Compaq Computer Corporation.

PCL ist eine eingetragene Marke von Hewlett-Packard Company.

PerfectOffice ist eine Marke von Corel Corporation Limited.

PostScript ist eine eingetragene Marke der Adobe Systems Incorporated.

PowerPoint ist eine eingetragene Marke von Microsoft Corporation.

Preferred Systems und PSI sind Marken von Preferred Systems, Inc.

Quattro Pro ist eine eingetragene Marke von Corel Corporation Limited.

The Assistant ist eine Marke von Preferred Systems, Inc.

UNIX ist in den Vereinigten Staaten und anderen Ländern eine eingetragene Marke und wird exklusiv durch X/Open Company, Ltd lizenziert.

Windows ist eine eingetragene Marke der Microsoft Corporation.

Windows 95 ist eine Marke der Microsoft Corporation.

Windows NT ist eine Marke der Microsoft Corporation.

WNIM ist eine eingetragene Marke von Gateway Communications, Inc.

WordPerfect ist eine eingetragene Marke von Corel Corporation Limited.

WordPerfect Presentations ist eine eingetragene Marke von Corel Corporation Limited.


NDS-Version auf einem Server aktualisieren

Zweck

Sobald Sie ein aktualisiertes DS.NLM erhalten, sollten Sie die NDS-Version auf Servern im Verzeichnisbaum aktualisieren. Die aktualisierten Versionen des DS.NLM werden regelmäßig über NetWire (das elektronische Forum von Novell) versendet.

Mit jeder NDS-Aktualisierung werden Probleme behoben und die Funktionalität gesteigert. Nach der Aktualisierung sind die neuen Funktionen in NDS erst dann verfügbar, wenn alle Server im Reproduktionsring einer Partition dieselbe NDS-Version verwenden.

Hinweis: Nach der ordnungsgemäßen Aktualisierung der Server kann es u. U. vorkommen, daß Ihre Client-Arbeitsstation ihre Aktualisierung erst 15 bis 30 Minuten später registriert.

Wichtig: Durch das Aktualisieren einer Version wird keine Aktualisierung des Betriebssystems durchgeführt. Daher wird die NDS-Version eines NetWare* 4.1 Servers nicht mit der NDS-Version eines NetWare 4.11 Servers aktualisiert. Dagegen wird die alte NDS-Version eines NetWare 4.1 Servers (z. B. 463) mit der neueren NDS-Version für NetWare 4.1 (z. B. 489) aktualisiert.

Wenn eine neue Version von NDS für NetWare 4.11 über NetWire herausgegeben wird, können Sie NetWare 4.11 Server mit der neuen Version aktualisieren.

Sie können die NDS-Version auf einem Server entweder in der Baumanzeige oder der Liste von Partitionen und Servern aktualisieren.

NDS-Version auf einem Server aktualisieren

1.	Das NetWare Server-Objekt, das als Quelle für die aktualisierte Version dienen soll, wählen (der Server, der eine Kopie des DS.NLM an andere Server sendet).

2.	Im Objektmenü zunächst NDS Version und danach Aktualisieren wählen.

In einem Dialogfenster erhalten Sie Informationen dazu, ob in und unter dem aktuellen Kontext des Verzeichnisbaums Server vorhanden sind, die nicht aktualisiert werden können. Diese werden in der Liste abgeblendet.

3.	Links in der Liste der Server die Server wählen, deren NDS-Version aktualisiert werden soll. Diese Server mit dem rechten Pfeil unter Zu aktualisierende Ziel-Server verschieben.

4.	OK wählen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Fern-Server-IDs prüfen

Zweck

Folgendes wird mit dieser Operation geprüft:

Der Name des Fern-Servers

Die ID des Fern-Servers in der Datenbank des Servers

Die Fern-ID, die die Server-ID in der Datenbank des Fern-Servers darstellt

Wenn Fehler entdeckt werden, erfolgt automatisch der Versuch, die Server-IDs zu reparieren.

Fern-Server-IDs prüfen

1.	In der Ansicht Partitionsdiagnose den Server (die Zeile) wählen, für den die Fern-Server-IDs geprüft werden sollen.

2.	Fern-IDs prüfen [image] wählen.

3.	Anforderung bestätigen.

Die Option Protokoll anzeigen wird angezeigt, sobald die Operation beendet ist.

Weitere Informationen finden Sie unter Übersicht zum Überprüfen der Fern-Server-IDs.


Reproduktionen einer Partition anzeigen

Zweck

Wählen Sie eine Partition und lassen Sie die Reproduktionsliste anzeigen. Mit dieser Operation können Sie folgende Fragen klären:

Auf welchen Servern befinden sich die Reproduktionen der Partition?

Auf welchem Server befindet sich die Hauptreproduktion der Partition?

Auf welchen Servern sind Schreib-/Lese-Reproduktionen, Nur-Lese-Reproduktionen und untergeordnete Referenz-Reproduktionen der Partition gespeichert?

Welchen Status haben die Reproduktionen der Partition?

Sie können die Reproduktionen einer Partition  entweder in der Baumanzeige  [image] oder der Liste der Partitionen und Server [image] anzeigen lassen.

Reproduktionen einer Partition anzeigen

1.	Partition wählen.

Die Server, auf denen die Reproduktionen der gewählten Partition gespeichert sind, werden im Fenster rechts vom Browser angezeigt.


Informationen zu einer Partition anzeigen

Zweck

Diese Operation können Sie jederzeit problemlos ausführen.

Informationen zu einer Partition werden vor allem angezeigt, um Synchronisierungsinformationen zu erhalten. Sie müssen die Hauptansicht, in der Sie arbeiten, nicht verlassen, um Informationen zu einer Partition anzuzeigen.

Informationen zu einer Partition erhalten Sie in der Baumanzeige, in der Liste der Partitionen und Server oder in der Ansicht Partitionsdiagnose.

Informationen zu einer Partition in der Baumanzeige oder in der Liste der Partitionen und Server anzeigen

1.	Die Partition wählen, zu der Informationen angezeigt werden sollen.

2.	Mit der rechten Maustaste klicken und Informationen wählen.

Informationen zu einer Partition in der Partitionskontinuität anzeigen

1.	Im Menü Reparieren zunächst Informationen, danach Partition wählen.


Informationen zu einer Reproduktion anzeigen

Zweck

Diese Operation können Sie jederzeit problemlos ausführen.

Informationen zu einer Reproduktion werden vor allem angezeigt, um Synchronisierungsinformationen zu erhalten. Sie müssen die Hauptansicht, in der Sie arbeiten, nicht verlassen, um Informationen zu einer Reproduktion anzuzeigen.

Informationen zu einer Reproduktion anzeigen

1. 	In der Baumanzeige oder der Liste der Partitionen und Server eine Partition oder ein NetWare* Server-Objekt wählen.

2.	Mit der rechten Maustaste auf eine Reproduktion klicken und Informationen wählen.

Wenn Reproduktionsinformationen in der Ansicht Partitionsdiagnose angezeigt werden sollen, klicken Sie mit der rechten Maustaste auf eine Reproduktion im Raster und wählen Informationen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Informationen zu einem Server anzeigen

Zweck

Sie müssen die Hauptansicht, in der Sie arbeiten, nicht verlassen, um Informationen zu einem Server anzuzeigen. Wenn Sie einen Server wählen, dann werden die Reproduktionsinformationen im Reproduktionsfenster rechts angezeigt.

Informationen zu einem Server werden vor allem angezeigt, um Synchronisierungsinformationen zu erhalten.

Informationen zu einem Server erhalten Sie in der Baumanzeige, in der Liste der Partitionen und Server oder in der Ansicht Partitionsdiagnose.

Informationen zu einem Server in der Baumanzeige oder in der Liste der Partitionen und Server anzeigen

1.	Das NetWare Server-Objekt wählen, zu dem Informationen angezeigt werden sollen.

Hinweis: Von der Liste der Partitionen und Server können  Sie am schnellsten auf Informationen zum Server zugreifen. In der Baumanzeige dagegen müssen Sie den Baum durch Erweitern der Stammobjekte der Partition durchblättern, bis Sie das NetWare Server-Objekt, zu dem Sie die Informationen benötigen, gefunden haben.

2.	Informationen [image] wählen.

Informationen zu einem Server in der Ansicht Partitionsdiagnose anzeigen

1.	Mit der rechten Maustaste auf einen Server-Namen (in der äußersten linken Spalte) klicken und Informationen wählen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Informationen über ein Alias anzeigen

Zweck

Sie können den Ursprung eines Alias anzeigen.

Informationen über ein Alias anzeigen

1.	Auf ein Aliasobjekt doppelklicken, um das Objekt mit Alias anzuzeigen.


Liste der Partitionen im Baum anzeigen

Zweck

Mit dieser Operation können Sie eine Liste aller Partitionen des Verzeichnisbaums in und unter dem aktuellen Kontext anzeigen.

Wenn der Verzeichnisbaum groß ist (und aus Hunderten von Partitionen besteht) und die Operation vom Stamm des Baums aus durchgeführt wird, so müssen Sie möglicherweise einige Minuten warten, bis die Liste erstellt ist.

Zur Vermeidung langer Wartezeiten sollte diese Operation von einem gegebenen Kontext aus durchgeführt werden.

Liste aller Partitionen im Verzeichnisbaum anzeigen

1.	Baumanzeige [image] wählen.

2.	Zum Stammverzeichnis des aktuellen Baums navigieren und es markieren.

3.	Partitionen und Server [image] wählen.

4.	Die Liste der Partitionen im aktuellen Kontext wird (in alphabetischer Reihenfolge) unter der Überschrift Partitionen erstellt.

Partitionen in einem gegebenen Kontext anzeigen

1.	Baumanzeige [image] wählen.

2.	Zum Behälter, der als neuer Kontext definiert werden soll, navigieren und ihn markieren.

3.	Mit der rechten Maustaste auf Kontext einstellen klicken.

4.	Partitionen und Server [image] wählen.


Liste der Server im Verzeichnis anzeigen

Zweck

Mit dieser Operation können Sie eine Liste der Server im Verzeichnisbaum in und unter dem aktuellen Kontext anzeigen.

Wenn der Verzeichnisbaum groß ist (und aus Hunderten von Partitionen und Servern besteht) und die Operation vom Stamm des Baums durchgeführt wird, so müssen Sie möglicherweise einige Minuten warten, bis der NDS-Manager eine Liste aller Server im Verzeichnisbaum erstellt hat.

Zur Vermeidung langer Wartezeiten sollte diese Operation von einem gegebenen Kontext aus durchgeführt werden. Die Vorgehensweise wird unten beschrieben.

Die Erstellung der Liste dauert länger als die der hierarchischen Baumanzeige.

Liste aller Server im Verzeichnisbaum anzeigen

1.	Baumanzeige [image] wählen.

2.	Zum Stammverzeichnis des aktuellen Baums navigieren und es markieren.

3.	Partitionen und Server [image] wählen.

Die Liste der Server im aktuellen Kontext wird (in alphabetischer Reihenfolge) unter der Überschrift Server erstellt.

Server in einem gegebenen Kontext anzeigen

1.	Baumanzeige [image] wählen.

2.	Zum Behälter, der als neuer Kontext definiert werden soll, navigieren und ihn markieren.

3.	Mit der rechten Maustaste auf Kontext einstellen klicken.

4.	Partitionen und Server [image] wählen.

Die Liste der Server im aktuellen Kontext wird (in alphabetischer Reihenfolge) unter der Überschrift Server erstellt.


Partitionshierarchie anzeigen

Zweck

In der Baumanzeige kann die Hierarchie der Partitionen im Verzeichnisbaum angezeigt werden. Im Browser links in der Baumanzeige können Sie die Behälter-Objekte erweitern, um zu sehen, welche Partitionen übergeordnet und welche untergeordnet sind.

Partitionshierarchie im Verzeichnisbaum anzeigen

1.	Zur Erweiterung eines Stammobjekts einer Partition auf das Objekt doppelklicken.

Hinweis: Das Partitionssymbol [image] stellt ein Stammobjekt einer Partition dar.

Doppelklicken Sie erneut auf das Objekt, um den Unterbaum zu komprimieren.


Reproduktionsliste einer Partition anzeigen

Zweck

Die Reproduktionsliste einer Partition kann in jeder Ansicht des NDS*-Managers angezeigt werden.

Reproduktionsliste einer Partition anzeigen

1.	In der Baumanzeige oder der Liste der Partitionen und Server eine Partition wählen.

Die Server, auf denen die Reproduktionen der gewählten Partition gespeichert sind, werden im Fenster rechts vom Browser angezeigt.

Wenn Sie alle Server, auf denen Reproduktionen einer gewählten Partition gespeichert sind, überprüfen und sicherstellen möchten, daß jeder Server eine ähnliche Ansicht von der Reproduktionsliste (des Reproduktionsrings) der Partition hat, so müssen Sie die Partitionskontinuität überprüfen.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Synchronisierungsfehler anzeigen

Zweck

Wenn Sie sich in der Ansicht Partitionsdiagnose befinden, entdecken Sie möglicherweise einen Fehler in einer der Reproduktionen im Raster. Ein Fehler wird als Ausrufezeichen (!) in einem Reproduktionssymbol dargestellt.

Ein Fehler in einer Nur-Lese-Reproduktion würde im Partitionsraster beispielsweise als [image] dargestellt.

Sie können sich kontextabhängige Hilfe zum Fehler in der Reproduktion anzeigen lassen. In der Hilfe finden Sie mögliche Fehlerursachen und Hinweise zur Fehlerbehebung.

Synchronisierungsfehler anzeigen

1.	Auf die Reproduktion mit dem Fehler doppelklicken.

2.	Im Dialogfenster Reproduktionsinformationen auf Hilfe [image] neben dem Feld Aktueller Synchronisierungsfehler klicken.


Partitionen auf einem Server anzeigen

Wenn Sie wissen möchten, welche Partitionen einem Server zugeordnet sind, dann wählen Sie ein NetWare* Server-Objekt aus und lassen die dazugehörige Reproduktionsliste anzeigen. Diese Routineoperation können Sie jederzeit problemlos ausführen.

Sie können die Partitionen auf einem Server entweder in der Baumanzeige  [image] oder der Liste der Partitionen und Server [image] anzeigen lassen.

Partitionen auf einem Server anzeigen

1.	Ein NetWare Server-Objekt wählen.

Wenn Sie sich in der Baumanzeige befinden, dann müssen Sie möglicherweise den Verzeichnisbaum durchsuchen, bis Sie das NetWare Server-Objekt finden, dessen Partitionen angezeigt werden sollen.

Ist das NetWare Server-Objekt markiert, so werden die Partitionen, die auf dem gewählten Server gespeichert sind, sowie der Reproduktionstyp der Partition im Reproduktionsfenster rechts neben dem Browser angezeigt.

Weitere Informationen finden Sie unter Übersicht zum Anzeigen der Partitionen auf einem Server.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


NDS-Version auf Servern in einem Behälter anzeigen

Zweck

Zeigen Sie die NDS*-Version (DS.NLM) auf allen Servern in einem Behälter-Objekt an, um festzustellen, ob die DS.NLM auf einem Server aktualisiert werden muß.. Wenn die NDS-Version auf einem Server nicht die neueste Version im Baum ist, sollten Sie die DS.NLM des Servers mit der Version von einem anderen Server aktualisieren.

Sie können die NDS-Version auf Servern in einem Behälter entweder in der Baumanzeige oder der Liste der Partitionen und Servern anzeigen.

NDS-Version auf Servern in einem Behälter anzeigen

1.	Den Behälter, mit dem Sie beginnen möchten, wählen.

Hinweis: Wenn Sie diese Operation von der Liste der Partitionen und Server aus durchführen, können Sie die Beziehungen zwischen den Partitionen im Verzeichnisbaum nicht sehen. Daher ist diese Operation leichter in der Baumanzeige auszuführen.

2.	Im Objektmenü zunächst NDS Version und danach Anzeigen wählen.

Server, die Vorgängerversionen von NetWare 4* sind, werden als Unbekannt angezeigt (da sie Bindery-Server ohne NDS sind).

Weitere Informationen finden Sie unter Übersicht zum Anzeigen der NDS-Version auf Servern in einem Behälter.

Hinweis: Zur Anzeige der NDS-Version auf einem gewählten Server markieren Sie den Server und klicken auf der Tastenleiste die Schaltfläche Informationen [image] an.

* Novell Marken.  ** Marken eines Fremdherstellers.  Weitere Informationen finden Sie unter Marken.


Arbeiten mit Präferenzen und Druckoptionen

Übersicht

Übersicht zum Arbeiten mit Präferenzen und Druckoptionen

Präferenzen und Druckoptionen einstellen

Übersicht

Präferenzen einstellen

Objektinformationen drucken

Reproduktionsliste einer Partition drucken


Arbeiten mit Partitionen

Übersicht

Übersicht zum Arbeiten mit Partitionen

Erstellen und Zusammenführen

Übersicht

Partition erstellen

Partition (mit übergeordneter Partition) zusammenführen

Verschieben und Abbrechen

Übersicht

Partition (Behälter) verschieben

Partitionsoperation abbrechen

Partitionsdaten anzeigen

Übersicht

Synchronisationsstatus einer Partition überprüfen

Partitionskontinuität überprüfen

Partitionen auf einem Server anzeigen

Reproduktionen einer Partition anzeigen

Informationen zu einer Partition anzeigen

Informationen über ein Alias anzeigen

Partitionshierarchie anzeigen

Liste der Partitionen im Baum anzeigen


Arbeiten mit Reparaturoperationen

Übersicht

Übersicht zum Arbeiten mit Reparaturoperationen

Synchronisierung der NDS-Datenbank

Übersicht

Partition sofort synchronisieren

Aktualisierungen von der Hauptreproduktion empfangen

Aktualisierungen von einer Reproduktion senden

Synchronisierungsfehler anzeigen

Reparieren der NDS-Datenbank

Übersicht

Fern-Server-IDs prüfen

Netzwerkadressen reparieren

Zu aktualisierende Ziel-Server

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Arbeiten mit Reproduktionen

Übersicht

Übersicht zum Arbeiten mit Reproduktionen

Hinzufügen, Löschen und Ändern des Typs

Übersicht

Reproduktion hinzufügen

Reproduktion löschen

Reproduktionstyp ändern

Reproduktionsdaten anzeigen

Übersicht

Reproduktionsliste einer Partition anzeigen

Informationen zu einer Reproduktion anzeigen


Arbeiten mit Servern

Übersicht

Übersicht zum Arbeiten mit Servern

Anzeigen und Löschen

Übersicht

Informationen zu einem Server anzeigen

Liste der Server im Verzeichnis anzeigen

NetWare Server-Objekt löschen

Anzeigen und Aktualisieren der NDS-Version

Übersicht

NDS-Version auf Servern in einem Behälter anzeigen

NDS-Version auf einem Server aktualisieren


CS Reproduktionsstatus: Typ 0 ändern
Der Reproduktionstyp wird geändert. Wenn Sie die laufende Operation abbrechen möchten, dann wählen Sie im Objektmenü die Option Partition und anschließend Operation abbrechen.


CS Reproduktionsstatus: Typ 1 ändern
Der Reproduktionstyp ist beinahe vollständig geändert. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: Läuft ab
Die Reproduktion wird gerade gelöscht. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: 0 verbinden
Die Reproduktion wird zusammengeführt. Zum Abbrechen dieses Vorgangs die Option Partition abbrechen wählen.


CS Reproduktionsstatus: 1 verbinden
Die Reproduktion ist im Wartezustand, bis die übergeordnete Reproduktion der Partition die Zusammenführung beendet hat. Wenn Sie die laufende Operation abbrechen möchten, wählen Sie im Objektmenü die Option Partition | Operation abbrechen.


CS Reproduktionsstatus: 2 verbinden
Die Reproduktion ist beinahe vollständig zusammengeführt. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: Gesperrt
Die Reproduktion ist gesperrt, da eine Partition verschoben werden soll. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: 0 verschieben
Ein Behälter soll von der Reproduktion verschoben werden. Zum Abbrechen dieses Vorgangs die Operation Partition abbrechen wählen.


CS Reproduktionsstatus: 1 verschieben
Die Reproduktion ist im Wartezustand, bis die übergeordnete Reproduktion der Partition den Behälter vollständig verschoben hat. Wenn Sie die laufende Operation abbrechen möchten, dann wählen Sie im Objektmenü die Option Partition und anschließend Operation abbrechen.


CS Reproduktionsstatus: 2 verschieben
Ein Behälter wird von der Reproduktion verschoben. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: Neu
Die Reproduktion wird dem ausgewählten Server hinzugefügt. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: Ein
Die Reproduktion hat alle Vorgänge, die im Hintergrund ausgeführt wurden, abgeschlossen. Daher kann kein Vorgang mehr abgebrochen werden.

Hinweis: Wenn sich eine Reproduktion im Status Ein befindet, so kann sie dennoch Synchronisierungsfehler haben; der Status Ein bedeutet nur, daß gerade keine Operation von der Reproduktion ausgeführt wird.


CS Reproduktionsstatus: 0 teilen
Eine neue Partition wurde von der Reproduktion fast vollständig erstellt. Wenn Sie die laufende Operation abbrechen möchten, dann wählen Sie im Objektmenü die Option Partition und anschließend Operation abbrechen.


CS Reproduktionsstatus: Übergangsverschiebung
Ein Objekt soll von der Reproduktion verschoben werden. Wenn Sie die laufende Operation abbrechen möchten, dann wählen Sie im Objektmenü die Option Partition und anschließend Operation abbrechen.


CS Reproduktionsstatus: Übergang Ein
Der Status der Reproduktion wird in Ein geändert. Es kann kein Vorgang mehr abgebrochen werden.


CS Reproduktionsstatus: Übergangsaufteilung
Eine neue Partition wird von der Reproduktion erstellt. Wenn Sie die laufende Operation abbrechen möchten, dann wählen Sie im Objektmenü die Option Partition und anschließend Operation abbrechen.


CS Reproduktionsstatus: 1 teilen
Eine neue Partition wurde von der Reproduktion fast vollständig erstellt. Es kann kein Vorgang mehr abgebrochen werden.


CS Baumanzeige Kontextbereich
In diesem Feld wird der Name des Behälter-Objekts angezeigt, das sich zuoberst im Browser befindet. Als Kontext ist der Kontext voreingestellt, in dem Sie sich befunden haben, als Sie den NDS-Manager aufgerufen haben.

Dieses Feld kann nur gelesen werden. Wenn Sie den Kontext ändern und einen anderen Zweig im Verzeichnisbaum anzeigen möchten, dann wählen Sie einen Behälter im Browser, klicken mit der rechten Maustaste und wählen anschließend Kontext einstellen.


CS Baumanzeige Partitionsbereich
In diesem Feld wird der Name der Partition angezeigt, die Sie im hierarchischen Browser gewählt haben. Sie können das Feld ändern, indem Sie eine andere Partition aus dem Browser auswählen.

Die Reproduktionen dieser Partition, die Reproduktionstypen und der jeweilige Reproduktionsstatus werden unten angezeigt.


CS Baumanzeige Server Lesebereich
Hiermit wird der Name des Servers angezeigt, von dem Reproduktionsinformationen gelesen und angezeigt werden.

Wenn Sie im Browser eine Partition wählen, sucht NDS im Netzwerk den nächsten Server, auf dem eine Reproduktion dieser Partition gespeichert ist. Danach zeigt der NDS-Manager die Reproduktionen der gewählten Partition, den Reproduktionstyp und Reproduktionsstatus aus der Sicht dieses bestimmten Servers an.

Hinweis: Wenn Sie überprüfen möchten, ob alle Reproduktionen der gewählten Partition ordnungsgemäß synchronisieren, dann können Sie die Option Partitionskontinuität wählen und die Ansicht der Reproduktionen jedes Servers anzeigen lassen.


CS Baumanzeige Statusbereich
Der Status jeder Reproduktion wird angezeigt.

Weitere Informationen finden Sie unter Beschreibung des Reproduktionsstatus


CS Baumanzeige Baumbereich
Dieser Bereich stellt einen hierarchischen Browser dar, der alle Behälter und Server im aktuellen Kontext anzeigt. Zur Anzeige der Hierarchie der Behälter im Verzeichnisbaum können Sie Behälter-Objekte ein- und ausblenden.


cs addrep Browser-Schaltfläche
Klicken Sie auf diese Schaltfläche, wenn Sie den Verzeichnisbaum für das NetWare Server-Objekt suchen, auf dem Sie die neue Reproduktion speichern möchten.


cs addrep Partitionsbereich
Hiermit wird der vollständige Name der Partition angezeigt, die reproduziert werden soll.


cs addrep Reproduktionstypbereich
Der Reproduktionstyp und das dazugehörige Symbol werden angezeigt.

Weitere Informationen zu Reproduktionen finden Sie unter Beschreibung der Reproduktionstypen.


cs addrep Server-Name-Bereich
Hiermit wird der vollständige Name des NetWare Server-Objekts angezeigt.

Hinweis: Klicken sie auf die Schaltfläche für Durchsuchen, wenn Sie einen Server wählen möchten, auf dem die hinzugefügte Reproduktion gespeichert werden soll.


cs Alias-information Alias-Bereich
Hiermit wird der Name des ausgewählten Aliasobjekts angezeigt.


cs Alias-Information Bereich mit Alias
Hiermit wird das Originalobjekt angezeigt, auf das das ausgewählte Aliasobjekt verweist.


cs Reproduktionstyp Partitionsbereich ändern
Die Reproduktion, deren Typ Sie ändern, ist eine Reproduktion dieser Partition.


cs Reproduktionstyp Reproduktionstyp-Bereich ändern
Der Reproduktionstyp und das dazugehörige Symbol werden angezeigt.

Der Reproduktionstyp der Reproduktion, die geändert werden soll, ist ausgewählt. Diese Wahl ist jedoch nicht zulässig. Sie müssen eine der anderen beiden Optionen wählen.

Weitere Informationen finden Sie unter Beschreibung der Reproduktionstypen.


cs Reproduktionstyp Server-Name-Bereich ändern
Der vollständige Name des Servers wird angezeigt, auf dem die Reproduktion gespeichert ist, deren Typ Sie ändern.


cs idh Reproduktionsinformationen Aktuelle Synchronisierung
Wenn die gewählte Reproduktion Synchronisierungsprobleme hat, wird eine Fehlermeldung angezeigt.

Hinweis: Mit der Hilfeschaltfläche [image] haben Sie Zugriff auf Informationen zum Synchronisierungsfehler.


cs idh Reproduktionsinformationen Hilfeschaltfläche
Klicken Sie auf diese Schaltfläche, wenn Sie Informationen zu Synchronisierungsfehlern aufrufen möchten.


cs idh Reproduktionsinformationen Letzte erfolgreiche Synchronisierung
Hiermit wird der Zeitpunkt angezeigt, zu dem die gewählte Reproduktion zuletzt mit anderen Reproduktionen der Partition synchronisiert wurde.


cs idh Reproduktionsinformationen Partition
Hiermit wird der vollständige Name der Partition angezeigt, die von der gewählten Reproduktion bezeichnet wird.


cs idh Reproduktionsinformationen Referenzadresse
Hiermit wird die interne Nummer angezeigt, durch die die Reproduktion in der NDS-Datenbank gekennzeichnet ist.


cs idh Reproduktionsinformationen Reproduktionsnummer
Hiermit wird die Reproduktionsnummer angezeigt, die die gewählte Reproduktion in der NDS-Datenbank eindeutig kennzeichnet.


cs idh Reproduktionsinformationen Reproduktionsstatus
Hiermit wird der aktuelle Aktivitätsstatus der Reproduktion angezeigt.

Weitere Informationen finden Sie unter Beschreibung des Reproduktionsstatus.


cs idh Reproduktionsinformationen Reproduktionstyp
Der Reproduktionstyp wird angezeigt.

Weitere Informationen finden Sie unter Beschreibung der Reproduktionstypen.


cs idh Reproduktionsinformationen Serverabruf
Hiermit wird der abgerufene Server angezeigt. Dies kann eine beliebige Reproduktion sein.


cs idh Reproduktionsinformationen Speicheradresse
Hiermit wird der vollständige Name des NetWare Servers angezeigt, auf dem die gewählte Reproduktion gespeichert ist.


cs idh Server-Informationen Vollständiger Name
Hiermit wird der vollständige Name des NetWare Server-Objekts angezeigt.


cs idh Server-Informationen NDS-Version
Hiermit wird die NDS-Version auf dem ausgewählten Server angezeigt.

Es wird dringend empfohlen, die neueste NDS-Version auf allen Servern im Verzeichnisbaum zu verwenden.


cs idh Server-Informationen Netzwerkadresse
Hiermit wird die Netzwerkadresse angezeigt, die den Server in den Tabellen anderer NetWare Server im Verzeichnisbaum kennzeichnet.


cs idh Serverinformationen Reproduktionen auf Server
Hiermit wird die Gesamtanzahl der auf dem Server befindlichen Reproduktionen angezeigt.


cs idh Server-Informationen Server-Name
Hiermit wird der vollständige Name des NetWare Server-Objekts angezeigt.


cs idh Server-Informationen Server-Version
Hiermit wird die Version des NetWare Betriebssystems angezeigt, die auf dem gewählten NetWare Server verwendet wird.


cs idh Server-Informationen Zeitpunkt der Synchronisierung
Hiermit wird der Zeitpunkt angezeigt, zu dem der gewählte Server seine Reproduktionsinformationen zuletzt mit anderen Servern im Verzeichnisbaum synchronisiert hat.


cs idh Synchronisierungsstatus Partition aktualisieren
Wählen Sie diese Option, wenn Sie den Synchronisationsstatus der Partition auf allen Servern aktualisieren möchten, auf denen Reproduktionen der gewählten Partition gespeichert sind.


cs idh Synchronisierungsstatus Partitionsnamen aktualisieren
Hiermit wird der aktuell ausgewählte Server angezeigt.


cs idh Synchronisierungsstatus nur des Servers aktualisieren
Wählen Sie diese Option, wenn Sie den Synchronisationsstatus der gewählten Partition nur auf dem Server, der im Textfeld unten definiert ist, aktualisieren möchten.


cs Ansicht Tastenleistenbereich aufführen
Mit der Tastenleiste im NDS-Manager können Sie Partitions- und Reproduktionsoperationen durch Klicken auf eine Schaltfläche ausführen.

Je nachdem, ob Sie eine Partition, eine Reproduktion oder einen Server wählen, werden bestimmte Schaltflächen aktiviert. Wenn Sie beispielsweise eine Partition aus der Liste links ausgewählt haben, dann ist die Schaltfläche Partition erstellen deaktiviert [image] (da der Behälter bereits eine Partition darstellt).


cs Ansicht Kontextbereich aufführen
Hiermit wird der aktuelle Kontext im Verzeichnisbaum angezeigt.


cs Ansicht Unterer Partitionsbereich aufführen
Hiermit werden alle Partitionen angezeigt, die auf dem von Ihnen gewählten Server gespeichert sind.


cs Ansicht Partitionsbereich aufführen
Hiermit wird die Partition angezeigt, die in der Liste der Partitionen aktuell ausgewählt ist.


cs Ansicht Partitionsbereich aufführen
Hiermit werden alle Partitionen in und unter dem aktuellen Kontext im Verzeichnisbaum angezeigt.

Ist das Stammverzeichnis des aktuellen Baums der aktuelle Kontext, so werden alle Partitionen in und unter dem Stammverzeichnis aufgeführt.


cs Ansicht Server-Lesebereich aufführen
Hiermit wird der Name des Servers angezeigt, von dem Reproduktionsinformationen gelesen und angezeigt werden.

Wenn Sie im Browser eine Partition wählen, sucht NDS im Netzwerk den nächsten Server, auf dem eine Reproduktion dieser Partition gespeichert ist. Danach zeigt der NDS-Manager die Reproduktionen der gewählten Partition, den Reproduktionstyp und Reproduktionsstatus aus der Sicht dieses bestimmten Servers an.

Hinweis: Wenn Sie überprüfen möchten, ob alle Reproduktionen der gewählten Partition ordnungsgemäß synchronisieren, dann können Sie die Option Partitionskontinuität wählen und die Ansicht der Reproduktionen jedes Servers anzeigen lassen.


cs Ansicht Server-Bereich aufführen
Hiermit wird der vollständige Name jedes Servers angezeigt, auf eine Reproduktion der Partition gespeichert ist, die Sie in der Liste Partitionen ausgewählt haben.


cs Ansicht Server-Bereich aufführen
Hiermit werden alle Server in und unter dem aktuellen Kontext im Verzeichnisbaum angezeigt.

Ist das Stammverzeichnis des aktuellen Baums der aktuelle Kontext, so werden alle Server in und unter dem Stammverzeichnis aufgeführt.


cs Ansicht Baumname in Überschrift aufführen
Hiermit wird der Name des Verzeichnisbaums angezeigt.


CS Baumanzeige Typbereich
Der Reproduktionstyp wird angezeigt.

 stellt eine Hauptreproduktion dar.

 stellt eine Schreib-/Lese-Reproduktion dar.

 stellt eine Nur-Lese-Reproduktion dar.

 stellt eine untergeordnete Referenz-Reproduktion dar.

Weitere Informationen finden Sie unter Beschreibung der Reproduktionstypen


cs Protokolldateifehler Schaltfläche für Durchsuchen
Suchen Sie mit der Schaltfläche für Durchsuchen nach einer anderen Datei, die Sie als die neue Protokolldatei zur Aktualisierung von Versionen definieren möchten.


cs log file error cancel update
Wählen Sie diese Operation, wenn Sie die laufende Aktualisierung der NDS-Version abbrechen möchten.


cs log file error create region
Wählen Sie diese Option, wenn Sie einen neuen Speicherplatz für die Protokolldatei der Versionsaktualisierung festlegen möchten.

Der in den Präferenzen festgelegte Name der aktuellen Protokolldatei wird im Textfeld angezeigt.


cs nds Aktualisierungsfehler im Server-Bereich
Wählen Sie diese Operation, wenn Sie die laufende Aktualisierung der Version abschließen möchten. Die Aktualisierung der NDS-Version wird fortgesetzt. Fehler, die in einer Protokolldatei auftreten, werden jedoch nicht aufgezeichnet.


cs nds Aktualisierungsfehler im Server-Bereich
Hiermit wird der vollständige Name der zu verschiebenden Partition angezeigt.

Hinweis: Wenn Sie die zu verschiebende Partition ändern möchten, dann wählen Sie zunächst Nein und anschließend eine andere Partition.


cs move partition create alias region
Aktivieren Sie dieses Feld, damit sich die Benutzer weiterhin beim Netzwerk anmelden und Objekte in ihrem ursprünglichen Verzeichnis suchen können.

Das erstellte Aliasobjekt erhält den gleichen Objektnamen wie der aktuelle Behälter und verweist auf das Objekt als neuen Behälter.

Warnung: Wenn Sie eine Partition verschieben, ohne sie durch ein Aliasobjekt zu ersetzten, haben andere Benutzer eventuell Schwierigkeiten, die Partitionsobjekte im Verzeichnisbaum zu finden, da sie im ursprünglichen Verzeichnis danach suchen werden.

Das kann auch dazu führen, daß Client-Arbeitsstationen sich nicht mehr anmelden können, wenn der Parameter für den Namenskontext der Arbeitsstation auf das ursprüngliche Verzeichnis im Baum verweist, in dem sich der Behälter befand.

Da sich durch das Verschieben der Kontext eines Objekts ändert, müssen Benutzer, deren Namenskontext auf das verschobene Objekt verweist, den Parameter für den Namenskontext der Arbeitsstation aktualisieren, damit dieser auf den neuen Objektnamen verweist.

(Wenn Sie nach dem Verschieben eines Behälterobjekts den Namenskontext der Arbeitsstation automatisch aktualisieren möchten, verwenden Sie das NCUPDATE-Dienstprogramm. Anweisungen finden Sie unter "NCUPDATE" im Handbuch "Dienstprogramme".


cs Partition in Kontextbereich verschieben
Hiermit wird der vollständige Name des Behälters angezeigt, in den Sie die Partition verschieben.

Hinweis: Klicken Sie auf die Schaltfläche für Durchsuchen, wenn Sie einen Behälter wählen möchten, in den die Partition verschoben werden soll.


cs nds Aktualisierungsfehler im Server-Bereich
Hiermit wird der Name des Servers angezeigt, auf den der NDS-Manager nicht zugreifen kann.


cs nds Aktualisierungsfehler im Meldungsbereich
Eine Fehlermeldung wird angezeigt, mit der Sie die Ursache des Fehlers feststellen können.


cs NDS-Version Aktualisierung nicht versucht
Hiermit wird die Anzahl der Server angezeigt, mit denen der NDS-Manager nicht kommunizieren konnte beim Versuch, die NDS-Version der Server zu aktualisieren.

Sie können aus der Protokolldatei ersehen, welche Server nicht aktualisiert wurden und warum sie nicht aktualisiert wurden.


cs NDS-Version Aktualisierung nicht erfolgt
Hiermit wird die Anzahl der Server angezeigt, die nicht mit einer neuen NDS-Version aktualisiert wurden.

Sie können aus der Protokolldatei ersehen, welche Server nicht aktualisiert wurden und warum sie nicht aktualisiert wurden.


cs NDS-Version Erfolgreiche Aktualisierung
Hiermit wird die Anzahl der Server angezeigt, die auf eine neuere NDS-Version aktualisiert wurden.


cs nds version update to be updates
Hiermit wird die Anzahl der Server angezeigt, die Sie zur Aktualisierung ausgewählt hatten.


cs nds version update view log
Klicken Sie auf diese Schaltfläche, wenn Sie die vom NDS-Manager erstellte Protokolldatei anzeigen möchten.

Anhand dieser Protokolldatei können Sie möglicherweise feststellen, warum Fehler aufgetreten sind.


cs partinfo-lastattempted
Hiermit wird angezeigt, wann (Datum und Zeit) NDS zuletzt die Reproduktionen dieser Partition zu synchronisieren versucht hat.

Da NDS automatisch in regelmäßigen Abständen synchronisiert, stimmt die angezeigte Zeit nicht unbedingt mit der aktuellen Zeit überein. Die Synchronisierung in einem Verzeichnisbaum (ohne Aktivität) ist auf alle 30 Minuten voreingestellt. Sie können diese Parameter jedoch auf dem Server definieren. Wenn Sie die Voreinstellung nicht geändert haben, dann wurde die letzte Synchronisierung in den letzten 30 Minuten versucht.

Hinweis: Wenn Sie Änderungen im Verzeichnis vorgenommen haben, versucht NDS sofort, die Änderungen bei allen Reproduktionen zu synchronisieren.


cs partinfo-lastsuccessfulsync
Hiermit wird angezeigt, wann (Datum und Zeit) die letzte erfolgreiche Synchronisierung der Reproduktionen dieser Partition erfolgt ist.

Hinweis: Wenn das Datum und die Zeit, die angezeigt werden, nicht mit dem Datum und der Zeit übereinstimmen, die im Bereich Letzte versuchte Synchronisierung angezeigt werden, dann weist dies auf Synchronisierungsfehler hin. Überprüfen Sie dies, indem Sie Partitionskontinuität wählen [image].


cs partinfo-master replica
Der vollständige Name des Servers wird angezeigt, auf dem die Hauptreproduktion der Partition gespeichert ist.


cs partinfo-partition region
Hiermit wird der vollständige Name der gewählten Partition angezeigt.


cs partinfo-rwroandm
Die Anzahl der Schreib-/Lese-, Nur-Lese- und Hauptreproduktionen dieser Partition wird angezeigt. Anhand dieser Informationen können Sie die Gesamtzahl der von Ihnen erstellten Reproduktionen dieser Partition ermitteln.


cs partinfo-Serverabruf
Hiermit wird der gelesene Server angezeigt. Dies kann eine beliebige Reproduktion sein.


cs partinfo-subref
Hiermit wird die Anzahl der untergeordneten Referenzen der gewählten Partition angezeigt.


cs partition aktuellen Namen umbenennen
Hiermit wird der Name der Partition angezeigt, die bei Beginn der Partitionsverschiebung markiert war.


cs partition neuen Namen umbenennen
Geben Sie hier den neuen Namen der verschobenen Partition ein.


cs partition nicht umbenennen
Wenn Sie Nein wählen, wird das Verschieben abgebrochen. Sie kehren dann zum Hauptbildschirm des NDS-Managers zurück. Die Partition wird nicht umbenannt.


cs partition umbenennen
Wenn Sie Ja wählen, wird die Partition umbenannt und anschließend verschoben.


cs partitions synchronization check all processed region
Hiermit werden allgemeine Synchronisierungsinformationen zu Partitionen im Verzeichnisbaum angezeigt.

Wenn alle geprüften Partitionen synchronisieren (fehlerfrei), dann entspricht die Anzahl der geprüften Partitionen der Anzahl von Alle verarbeitet = Ja.

Die Anzahl von Alle verarbeitet = Nein entspricht der Anzahl der Partitionen, die Synchronisierungsfehler beinhalten.

Die Anzahl von Lesen nicht möglich  entspricht der Anzahl der aus bestimmten Gründen, z. B. wegen Serverausfall, nicht gelesenen Partitionen.


cs partitions synchronization check continuity button
Der Bildschirm Partitionsdiagnose wird aufgerufen und die Reproduktionsliste der von Ihnen gewählten Partition wird angezeigt.


cs partitions synchronization check information button
Das Dialogfeld Partitionsinformationen wird für die von Ihnen gewählte Partition angezeigt.


cs partitions synchronization check partitions region
Der vollständige Name jeder geprüften Partition wird angezeigt. Ein Symbol links stellt den Synchronisationsstatus jeder Partition dar.

Bei Alle verarbeitet = Ja für eine Partition wird links das Symbol für Partitionen [image] angezeigt. Das bedeutet, daß bei der Synchronisierung keine sichtbaren Probleme aufgetreten sind.

Bei Alle verarbeitet = Nein für eine Partition wird links [image] angezeigt. Das bedeutet, daß für diese Partition ein Synchronisierungsfehler aufgetreten ist.

Bei Lesen nicht möglich wird links [image] angezeigt. Das bedeutet, daß eine Partition zum gegenwärtigen Zeitpunkt nicht gelesen werden kann.

Hinweis: Bei Alle verarbeitet = Nein für eine Partition markieren Sie die Partition und wählen Kontinuität, um die Synchronisierungsinformationen für die Partition anzuzeigen.


cs pc Tastenleiste
Über die Tastenleiste können Sie Reparaturen ausführen, ohne die Menüs verwenden zu müssen.


cs pc error info partition region
Der vollständige Name der Partition, die Reproduktionen mit Synchronisierungsfehlern enthält, wird angezeigt.

Die Reproduktionsliste dieser Partition wird gerade in Partitionsdiagnose angezeigt.


cs pc error info replica region
Der vollständige Name des Servers wird angezeigt, auf dem sich die Reproduktion mit den Synchronisierungsfehlern befindet.


cs pc Fehlerinformationen Server-Bereich
Der vollständige Name des Servers wird angezeigt, auf dem die Reproduktion mit Synchronisierungsfehlern gespeichert ist.


cs pc Partitionsname
Hiermit wird der vollständige Name der gewählten Partition angezeigt. Die im Partitionsraster angezeigten Reproduktionen sind Reproduktionen dieser Partition.


cs pc repinfo drop down box
Hiermit wird das Drop-down-Listenfeld ausgewählt, in dem Sie eine andere Reproduktion wählen können.


cs pc Partitionsbereich
Hiermit wird der vollständige Name der von Ihnen ausgewählten Partition angezeigt.


cs pc  Reproduktion
Hiermit wird der Name der Reproduktion angezeigt, zu der Sie Informationen anfordern möchten. Wenn Sie Informationen zu einer anderen Reproduktion (Spalte) möchten, so wählen Sie zunächst das Drop-down-Listenfeld rechts neben diesem Feld und anschließend die neue Reproduktion.


cs pc  Serverbereich
Hiermit wird der vollständige Name des von Ihnen ausgewählten Servers (Zeile) angezeigt.


cs pc Reproduktionsspalte
In diesem Partitonsraster wird angezeigt, an welcher Stelle die Reproduktionen der gewählten Partitionen in der Ansicht jedes Servers gespeichert sind.

Folgende Fehler können in Reproduktionen mit Synchronisierungsfehlern auftreten:

 Ein Synchronisierungsfehler in einer Hauptreproduktion.

 Ein Synchronisierungsfehler in einer Schreib-/Lese-Reproduktion.

 Ein Synchronisierungsfehler in einer Nur-Lese-Reproduktion.

 Ein Synchronisierungsfehler in einer untergeordneten Referenz-Reproduktion.

Ebenso kann der Fehler "Konnte nicht gelesen werden" bei allen Reproduktionen eines Servers aus folgenden Gründen auftreten:

Die Anmeldung ist auf diesem Server deaktiviert.

Der Server befindet sich an einer Verbindungsstelle im WAN, auf die Sie nicht zugreifen können.

NDS ist auf diesem Server gesperrt.

Der Server ist heruntergefahren.

Sie verwenden VLMs und haben versucht, die maximal erlaubte Anzahl von Verbindungen zu überschreiten


cs pc Server
Die Namen der Server werden angezeigt, auf denen die Reproduktionen der gewählten Partition gespeichert sind.


cs Präferenzen Standardansicht
Die aktuelle Standardansicht wird beim Starten des NDS-Managers angezeigt.

Bei der Installation des NDS-Managers ist die Baumanzeige die Standardansicht. Wenn Sie zukünftig den NDS-Manager aufrufen, dann können Sie Liste wählen, und die Liste der Partitionen und Server wird beim Starten des NDS-Managers angezeigt.

Der Vorteil bei der Wahl von Baum besteht darin, daß der NDS-Manager die Partitionen im aktuellen Kontext im Verzeichnisbaum problemlos anzeigen kann. Wenn Sie dagegen Liste wählen, so erstellt der NDS-Manager eine Liste aller Partitionen in und unter dem aktuellen Kontext. Ist das Verzeichnis umfangreich (Hunderte von Partitionen), so müssen Sie möglicherweise mehrere Minuten warten, bis die Liste erstellt ist.


cs Präferenzen Anzeige
Mit dieser Option können Sie festlegen, wie Informationen beim Aufrufen des NDS-Managers angezeigt werden.


cs Präferenzen Protokoll
Mit dieser Option können Sie festlegen, wo der NDS-Manager standardmäßig die Protokolldatei nach einer NDS-Versionsaktualisierung speichert und wie er Daten an die Protokolldatei anhängt.


cs Präferenzen Protokoll angehängt
Wenn Sie diese Option auswählen, öffnet der NDS-Manager bei jeder NDS-Versionsaktualisierung die Protokolldatei und hängt die neuen Daten an anstatt die alte Protokolldatei zu überschreiben.

Hinweis: Die nach einer Reparatur angezeigte Protokolldatei ist schreibgeschützt mit begrenztem Anzeigebereich. Sie können in dieser Anzeige keine Kommentare zur Protokolldatei hinzufügen oder sie bearbeiten. Zum Bearbeiten der Protokolldatei müssen Sie einen Texteditor verwenden.


cs Präferenzen Protokoll durchsuchen
Mit dieser Schaltfläche wird ein Fenster zum Browser geöffnet, so daß Sie eine neue Aktualisierungsprotokolldatei auswählen können. Wenn Sie die Protokolldatei verschoben haben, können Sie das Speichermedium durchsuchen und die Datei an der neuen Speicherposition auswählen.


cs Präferenzen Protokoll-Dateiname
Hiermit wird der Name und die Speicherposition der aktuellen Aktualisierungsprotokolldatei gemäß Ihren Angaben in den Standardeinstellungen angezeigt.

Klicken Sie rechts auf die Schaltfläche zum Durchsuchen, um den Namen oder die Position dieser Datei zu ändern, oder ändern Sie Ihre Angaben in den Standardeinstellungen.


cs Präferenzen Reproduktion Ansicht
Wenn Sie Bild wählen, werden die Reproduktionssymbole ohne Text dargestellt.

Soll der Reproduktionstyp unter dem Symbol gekennzeichnet sein, müssen Sie Mit Text wählen.


cs preferences update
Mit dieser Option können Sie Präferenzen zu den NDS-Aktualisierungsoptionen einstellen.


cs preferences update log
Hiermit wird der Name und die Speicheradresse der aktuellen Protokolldatei zur Aktualisierung so angezeigt, wie unter Präferenzen definiert.

Wenn Sie den Namen oder die Speicheradresse dieser Datei ändern möchten, so klicken Sie auf die Schaltfläche für Durchsuchen, die sich rechts befindet, oder ändern Sie die Präferenzen.


cs preferences update no notification
Wenn Sie diese Option wählen, benachrichtigt der NDS-Manager Sie nicht, wenn nicht kritische Fehler auftreten.

Tritt bei einer NDS-Versionsaktualisierung ein kritischer Fehler auf, wird der Vorgang vom System abgebrochen.

Wenn die Versionsaktualisierung z. B. eine Datei nicht kopieren und den Server nicht auf den alten Zustand wiederherstellen konnte, zeigt die Aktualisierung an, daß sich der Server in einem inkonsistenten Zustand befindet.

In diesem Fall müssen Sie manuell zu diesem Server wechseln und die Sicherungskopien von DS.NLM und DSREPAIR.NLM wiederherstellen. Benennen Sie dazu einfach DSREPAIR.BAK in DSREPAIR.NLM und DS.BAK in DS.NLM um.


cs preferences update search for nds
Zeigt die aktuelle Einstellung an, wie die NDS-Versionsaktualisierung Server sucht.

Standardmäßig sucht die Versionsaktualisierung nur die Server in Ihrem aktuellen Kontext und zeigt sie in der Serverliste an.

Wenn Sie die Option Gesamter Teilbaum verwenden, sucht die NDS-Versionsaktualisierung alle Server in und unter Ihrem aktuellen Kontext und zeigt diese in der Serverliste an.


cs preferences update unload
Wenn Sie diese Option auswählen, entlädt der NDS-Manager DSREPAIR vom Zielserver und kopiert eine neue NDS-Version (die eine neue Datei DSREPAIR enthält) auf den Zielserver.

Wählen Sie diese Option aus, wenn Sie die NDS-Versionsaktualisierung unbeaufsichtigt ausführen lassen wollen. Wenn Sie diese Option nicht auswählen, werden Sie aufgefordert, DSREPAIR von jedem Zielserver (jedem Server, der aktualisiert werden soll) zu löschen, auf dem DSREPAIR geladen ist.


cs Nur Druckinformationen
Wählen Sie diese Option, um Informationen zu dem ausgewählten Objekt zu drucken.


cs print partition grid replica info
Mit dieser Option können Sie folgendes drucken:

Die Reproduktionsliste jedes Servers im Raster

Den Reproduktionstyp

Die Reproduktionsnummer

Den aktuellen Status der einzelnen Reproduktionen

Datum und Zeit der letzten erfolgreichen Synchronisierung der Reproduktionen


cs print partition grid synchronization errors
Mit dieser Option können Sie folgendes drucken:

Die Reproduktionsliste jedes Servers im Raster

Den Reproduktionstyp in der Reproduktionsliste der Server

Den Fehlercode der Synchronisierung (falls vorhanden) für jede Reproduktion im Raster


cs print printer region
Hiermit wird der Name des Systemdruckers angezeigt.


cs Ausgewählten Objektbereich drucken
Der Objekttyp wird angezeigt, den Sie entweder in der Baumanzeige oder der Liste der Partitionen und Server ausgewählt haben.


cs print tree only
Mit dieser Option wird nur der Verzeichnisbaum gedruckt, so wie er im Browser angezeigt wird.


cs print two column
Wählen Sie diese Option, wenn die Informationen in zwei Spalten auf dem Papier gedruckt werden sollen. Mit dieser Funktion können Sie Papier sparen.


cs print with replica data
Wählen Sie die Option, wenn Reproduktionsdaten zu der von Ihnen gewählten Partition oder zu dem von Ihnen gewählten Server gedruckt werden sollen.


cs select object acme
Hiermit wird der aktuelle Kontext im Verzeichnisbaum angezeigt.


cs select object available objects
In diesem Begrenzungsfeld können Sie die Objekte, die in der Liste angezeigt werden, begrenzen.

Sollen beispielsweise nur Objekte angezeigt werden, die mit dem Buchstaben Y beginnen, geben Sie Y* ein.


cs select object available objects list
Hiermit werden Objekte im aktuellen Kontext, den Sie wählen können, angezeigt.


cs select object browse context
In diesem Begrenzungsfeld können Sie die Objekte, die in der Liste angezeigt werden, begrenzen.

Sollen beispielsweise nur Objekte angezeigt werden, die mit dem Buchstaben Y beginnen, geben Sie Y* ein.


cs select object browse context list
Sie können durch das Verzeichnis blättern, indem Sie auf Behälter doppelklicken und sich so im Baum nach unten bewegen. Wenn Sie sich im Baum nach oben bewegen möchten, wählen Sie die Aufwärts-Pfeiltaste oben im Feld.


cs select object change context button
Mit dieser Schaltfläche geben Sie manuell den neuen Kontext ein, in dem gesucht werden soll.


cs Baumanzeige Browserbereich
Die hierarchischen Beziehungen zwischen den Behältern und Servern im Verzeichnisbaum werden angezeigt, d. h. Sie können ersehen, welche Partitionen übergeordnet und welche untergeordnet sind (Partitionshierarchie).


cs Baumanzeige Kontextbereich
Hiermit wird der aktuelle Kontext im Verzeichnisbaum angezeigt.


cs Baumanzeige Server-Bereich
Dieses Feld ist das Reproduktionsinformationsfenster.

Wenn Sie links im Browser eine Partition gewählt haben, wird in diesem Feld jeder Server angezeigt, auf dem eine Reproduktion der Partition gespeichert ist.

Wenn Sie links im Browser einen Server gewählt haben, wird in diesem Feld jede Partition angezeigt, deren Reproduktion auf dem Server gespeichert ist.

Wenn Sie links im Browser ein Behälterobjekt gewählt haben, für das keine Partition erstellt wurde, so wird in diesem Feld nichts angezeigt.


cs Baumanzeige Baumname
Hiermit wird der Name des Verzeichnisbaums angezeigt.


cs NDS-Version Aktualisierung Schaltfläche für Durchsuchen
Mit der Schaltfläche für Durchsuchen wählen Sie einen anderen Kontext.


cs version update context region
Hiermit wird der aktuelle Kontext im Verzeichnisbaum angezeigt.


cs version update select all
Mit dieser Option können Sie alle Server wählen, deren NDS-Version älter als die des Ursprungs-Servers ist.


cs version update server name region
Hiermit wird der vollständige Name aller Server im aktuellen Kontext angezeigt.

Einige Server in dieser Liste sind im NDS-Manager möglicherweise abgeblendet, da sie keine kompatiblen Ziele für den Ziel-Server darstellen.

Hinweis: Sie können die Einstellungen für die NDS-Versionsaktualisierung so ändern, daß der NDS-Manager den gesamten Unterbaum durchsucht und alle Server in und unter dem aktuellen Kontext anzeigt. Wählen Sie die Option Einstellungen.


cs version update source
Der vollständige Name des Ursprungs-Servers und die NDS-Version auf diesem Server werden angezeigt. Dieser Server sendet seine NDS-Version an die anderen Server.


cs version update target server name
Alle Ziel-Server werden angezeigt (die Server, die mit der NDS-Version des Ursprungs-Servers aktualisiert werden).


cs version update target server version
Hiermit wird die NDS-Version auf dem Ziel-Server angezeigt.


cs version update version region
Hiermit wird die NDS-Version auf dem Server angezeigt.


Siehe auch IDH Aktualisierungen empfangen
Verwandte Themen

Partition sofort synchronisieren

Aktualisierungen von einer Reproduktion senden

Synchronisierungsfehler anzeigen


Siehe auch IDH Server entfernen
Verwandte Themen

Fern-Server-IDs prüfen

Reproduktion reparieren

Netzwerkadressen reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Volume-Objekte reparieren


Siehe auch IDH Lokale Datenbank reparieren
Verwandte Themen

Fern-Server-IDs prüfen

Reproduktion reparieren

Netzwerkadressen reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch IDH Netzwerkadressen reparieren
Verwandte Themen

Fern-Server-IDs prüfen

Reproduktion reparieren

Lokale Datenbank reparieren

Neue Hauptreproduktion zuweisen

Server aus einer Reproduktionsliste entfernen

Volume-Objekte reparieren


Siehe auch NetWare Server-Objekt löschen
Verwandte Themen

Informationen zu einem Server anzeigen

Liste der Server im Verzeichnis anzeigen


Siehe auch Liste der Partitionen und Server
Verwandte Themen

Partitionskontinuität

Baumanzeige


Siehe auch Baumanzeige
Verwandte Themen

Liste der Partitionen und Server

Partitionskontinuität


Siehe auch Liste der Server im Verzeichnis anzeigen
Verwandte Themen

Informationen zu einem Server anzeigen

NetWare Server-Objekt löschen