 Contents for UltraCD help

1. UltraCD Overview

2. System requirement

3. UltraCD installation

4. UltraCD in Windows

5. UltraCD command syntax

6. Copyright


 UltraCD Overview :

UltraCD is a professional CD-ROM cache driver that enhances the access speed of CD-ROM drives up to 30 times, and it can be installed in 30 seconds.

UltraCD supports MS-DOS and Windows, compatible to AT-BUS, SCSI-BUS and all double speed CD-ROM drives. It incorporated a Windows control panel, an easy-to-use installation program, an on-line help facility, a status reporter, unload and other capabilities.


 System requirement :

To get the benefit from UltraCD, you need :

1. A CD-ROM drive. (AT-bus, SCSI-bus or double speed drives)

2. MS-DOS 3.0 or above

3. At least 256 KB of extended memory.


 UltraCD installation :

To install UltraCD, use next command at MS-DOS :

A:\>  UltraCD  /SETUP

Follow UltraCD to complete the installation.


 Run UltraCD in Windows :

UltraCD can be executed from Program Manager or File Manager of Windows. Please refer to Windows user guide for more information.


 UltraCD command syntax :

  1.   > UltraCD /SETUP	: Install UltraCD.

  2.   > UltraCD [size]	: Load UltraCD into system.

  3.   > UltraCD /UN	: Unload UltraCD from system.

  4.   > UltraCD /?	: Display UltraCD help messages.

  5.   > UltraCD /ST	: Display status and statistical report.

  6.   > UltraCD /ON	: Turn on UltraCD function.

  7.   > UltraCD /OFF	: Turn off UltraCD function.

  8.   > UltraCD /MAX	: Set to MAX caching mode.

  9.   > UltraCD /MIN	: Set to Min caching mode.

10.   > UltraCD /FLUSH	: Flush UltraCD.


   AZTECH  SYSTEMS  PTE  LTD

UltraCD CD-ROM cache driver V 2.10

(C) Copyright 1993,    Far Stone Tech. Corp.